Windows NT Hardware Compatibility List

    Windows 95 Hardware Compatibility List  (Last updated: September 13, 1996)

The Windows 95 Hardware Compatibility List (HCL) contains products that have been tested and have passed compatibility testing with Windows 95. Please note that we have not tested every computer and/or device in all possible configurations; and that some computers may be sold with peripherals that are not yet supported by Windows 95, or that require a device driver supplied by the manufacturer.  For information on downloading and installing drivers for the hardware listed, or for getting your hardware listed in the HCL, please visit the Microsoft Windows Hardware Quality Labs web site at http://www.microsoft.com/hwtest/.

To view the HCL, click on one of the following hardware categories:

Communication Devices	Input Devices	Output Devices	Storage Devices	Systems	Miscellaneous Hardware


Communication Devices
Windows 95 Hardware Compatibility List

Communication Devices

 Modem/ISDN

 Network/ISDN

 Modem/Analog

 Network/ATM

 Network/LAN

 Network/WAN

Communication Devices	Input Devices	Output Devices	Storage Devices	Systems	Miscellaneous Hardware


Input Devices
Windows 95 Hardware Compatibility List

Input Devices

 Game

 Keyboard

 Pointing Drawing

Communication Devices	Input Devices	Output Devices	Storage Devices	Systems	Miscellaneous Hardware


Output Devices
Windows 95 Hardware Compatibility List

Output Devices

 Audio

 Display Adapter

 Display Monitor

 Imaging

 Motion Video

 Printer

 Printer/WPS

Communication Devices	Input Devices	Output Devices	Storage Devices	Systems	Miscellaneous Hardware


Storage Devices
Windows 95 Hardware Compatibility List

Storage Devices

 CD-ROM Drive

 Hard Drive

 IDE Controller

 Removable Drive

 SCSI Controller

 Tape Drive

Communication Devices	Input Devices	Output Devices	Storage Devices	Systems	Miscellaneous Hardware


Systems
Windows 95 Hardware Compatibility List

Systems

 Processors Upgrade

 System/Desktop

 System/Mobile

Communication Devices	Input Devices	Output Devices	Storage Devices	Systems	Miscellaneous Hardware


Miscellaneous Hardware
Windows 95 Hardware Compatibility List

Miscellaneous Hardware

 German Network Adapter

 Japanese 3MOD floppy drives

 Japanese CD-ROM drives

 Japanese modems

 Japanese network adapters

 Japanese printers

 Japanese removable drives

 Korean printers

 PRC printers

 Taiwanese printers

 Miscellaneous

 UPS

Communication Devices	Input Devices	Output Devices	Storage Devices	Systems	Miscellaneous Hardware


Logo Audio

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Audio

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Acer	Acer Magic S23	ISA	WDL
Acer	AcerMagic S23A	ISA	Box
Acer	Magic S23	ISA	WDL
AdLib Multimedia	ASB 16	ISA	WDL
Aztech Systems	Sound Galaxy WaveRider Pro 32-3D (I) PnP	ISA	WDL
Aztech Systems	Sound-3 288FSP	ISA	WDL
Aztech Systems	Sound-3 336FSP	ISA	WDL
Behavior Tech Computer	BTC Sound Card	ISA	WDL
Boca Research	SENS 810	EISA	WDL
Boca Research	Sound Expression 14.4 SRS	EISA	WDL
Boca Research	Sound Expression V.34 SRS	EISA	WDL
Creative Labs	CT1920 AWE Upgrade	ISA	Box
Creative Labs	CT2270 Sound Blaster 16 PnP	ISA	WDL
Creative Labs	CT2890 Sound Blaster 16 / Vibra PnP	ISA	Box
Creative Labs	CT2891	ISA	Box
Creative Labs	CT2892	ISA	Box
Creative Labs	CT2920 Sound Blaster 16 Pro w/ 3D	ISA	Box
Creative Labs	CT2940 SB 16 PnP	ISA	WDL
Creative Labs	CT2941	ISA	WDL
Creative Labs	CT2942	ISA	WDL
Creative Labs	CT2943	ISA	WDL
Creative Labs	CT2945	ISA	WDL
Creative Labs	CT2950 Sound Blaster 16 PnP	ISA	Box
Creative Labs	CT2951	ISA	Box
Creative Labs	CT2960	ISA	WDL
Creative Labs	CT3600 Sound Blaster SB 32	ISA	WDL
Creative Labs	CT3601	ISA	WDL
Creative Labs	CT3604	ISA	WDL
Creative Labs	CT3620 SoundBlaster AWE32 PnP	ISA	WDL
Creative Labs	CT3960 Sound Blaster AWE32	ISA	Box
Creative Labs	CT3980 Sound Blaster AWE32 w/ 3D	ISA	Box
Creative Labs	CT3990 Sound Blaster AWE32	ISA	Box
Creative Labs	CT4100	ISA	WDL
Crystal Semiconductor Corp.	CRD4232-3 Reference Design	ISA	WDL
Crystal Semiconductor Corp.	CRD4236-3 Reference Design	ISA	WDL
ESS Technology	ES1868 PNP w/CD interface	ISA	Box
Everex	3D Sound Express Plus	ISA	WDL
GVC Corporation	S-WP/L SoundCard	ISA	Box
OPTi	MAD16 PnP Audio Device	ISA	WDL
Orchid	NuSound PnP 32	ISA	WDL
Philips	PCA70PS	ISA	WDL
Philips	PCA75WT Sound Card	ISA	WDL
Rockwell Semiconductor Systems	WaveArtist	ISA	WDL
SGS-Thomson	STG2000 Multimedia Accelerator	PCI	WDL
SGS-Thomson	STG2000 Multimedia Accelerator	PCI	Box
SIC Resource	CrystalWave 32 3D	ISA	WDL
Yamaha	OPL3-SA Sound Board	ISA	Box

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo CPU

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : CPU

Hardware Vendor	Device Name	Device Bus	Driver BIOS
AMD	Am5x86-P75	Chip	Box
AMD	AMD-K5-Pr100	chip	Box
AMD	AMD-K5-Pr75	Chip	Box
AMD	AMD-K5-Pr90	Chip	Box
AMD	Enhanced Am486DX4-100	Chip	Box
Cyrix	5X86 33/100 MHZ	?	Box
Cyrix	6X86 50/100 MHZ (ECS-AIO)	ISA/PCI	Box
Cyrix	6X86 50/100 MHZ (ECS-V10)	ISA/PCI	Box
IBM	6X86 50/100 MHZ (ECS-V10)	ISA/PCI	Box
NexGen	Nx586 Processor P100	Chip	Box
SGS-Thomson	6X86 50/100 MHZ (ECS-V10)	ISA/PCI	Box
SGS-Thomson	ST 486 DX4-100	n/a	Box
Texas Instruments	TI 486DX2-80	COM	Box
Texas Instruments	TI 486DX4-75	COM	Box

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Display Adapter

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Display Adapter

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Acer	P264CT	PCI	WDL
Acer	P30	PCI	Box
Acer	P50E	PCI	Box
Acer	P60	PCI	Box
Acer	PV60	PCI	WDL
Alliance Semiconductor	ProMotion	PCI	WDL
ARK Logic	1000PV	PCI	WDL
ARK Logic	2000PV	PCI	WDL
ATI	Graphics Pro Turbo PCI Mach64	PCI	WDL
ATI	Graphics Xpression PCI Mach64	PCI	WDL
Avance Logic	ALG 2301 PCI	PCI	WDL
Avance Logic	ALG 2302 PCI	PCI	WDL
Boca Research	SuperX VGA	PCI	Box
Boca Research	Voyager 64	PCI	Box
California Graphics Italia	Terminator 64	PCI	WDL
California Graphics Italia	Terminator 68	PCI	WDL
Chips & Technologies	F65548 PCI	PCI	WDL
Cirrus Logic	GD5430 Demo Board Kit	PCI	Box
Cirrus Logic	GD5434 PCI Demo Board Kit	PCI	Box
Cirrus Logic	GD5436 PCI Demo Board Kit	PCI	Box
Cirrus Logic	GD54M30 PCI Demo Board Kit	PCI	Box
Diamond Multimedia Systems	Stealth 64 Graphics 2120XL	PCI	WDL
Diamond Multimedia Systems	Stealth 64 Graphics 2200XL	PCI	WDL
Diamond Multimedia Systems	Stealth 64 Video 2120XL	PCI	WDL
Diamond Multimedia Systems	Stealth 64 Video 2200XL	PCI	WDL
Diamond Multimedia Systems	Stealth 64 Video 3200XL	PCI	WDL
Diamond Multimedia Systems	Stealth 64 Video 3240XL	PCI	WDL
Diamond Multimedia Systems	Stealth 64 Video 3400XL	PCI	WDL
ELSA	WINNER 2000AVI	PCI	Box
ELSA	WINNER 2000PRO/X	PCI	Box
Matrox	MGA Millennium	PCI	WDL
Miro Computer Products	miroVIDEO 20SD	PCI	WDL
Miro Computer Products	miroVIDEO 20SV	PCI	WDL
Miro Computer Products	miroVIDEO 22SD	PCI	Box
Miro Computer Products	miroVIDEO 40SV ergo	PCI	WDL
Number Nine Computer	#9GXE64 - PCI	PCI	Box
Number Nine Computer	9FX Motion 531 - PCI	PCI	Box
Number Nine Computer	9FX Motion 771 - PCI	PCI	Box
Number Nine Computer	9FX Vision 330 - PCI	PCI	Box
Number Nine Computer	Imagine 128	PCI	WDL
NVIDIA Corporation	Multimedia Accelerator	PCI	WDL
Oak Technology	Spitfire 64107D2	PCI	WDL
Oak Technology	Spitfire OTI 64111	PCI	WDL
Prolink Microsystems	MVGA-CLM30P	PCI	WDL
S3	S3 Trio64	PCI	WDL
S3	Trio64V+	PCI	WDL
Samsung	SVB-6170	PCI	Box
SGS-Thomson	STG2000 Multimedia Accelerator	PCI	Box
SGS-Thomson	STG2000 Multimedia Accelerator	PCI	Box
Silicon Integrated Systems	sis6202	PCI	WDL
Silicon Integrated Systems	sis6205	PCI	WDL
SPEA Software AG	V7-Mercury P-64V	PCI	Box
SPEA Software AG	V7-Mirage P-64	PCI	Box
SPEA Software AG	V7-Mirage P-64 V Turbo	PCI	Box
SPEA Software AG	V7-Vega Video	PCI	WDL
STB Systems	PowerGraph 64 Video	PCI	WDL
Trident Microsystems	TGUI 9660 XGi - PCI	PCI	WDL
Trident Microsystems	TGUI 9680	PCI	WDL
VideoLogic	GrafixStar 300	PCI	WDL
VideoLogic	GrafixStar 700	PCI	WDL
VLSI Technology	GraphiCore VL82C975	PCI	WDL

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Display Monitor

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Display Monitor

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Acer	AcerView 76i	DDC	Box
AOC International	Spectrum 4V LR	DDC	WDL
AOC International	Spectrum 5Vlr	DDC	WDL
AOC International	Spectrum 7 DlrA	DDC	WDL
Daewoo Electronics	CMC-1423B1	DDC	WDL
Daewoo Electronics	CMC-1427X1	DDC	WDL
Daewoo Electronics	CMC-1502B1	DDC	WDL
Daewoo Electronics	CMC-1505X	DDC	WDL
Daewoo Electronics	CMC-1507X1	DDC	WDL
Daewoo Electronics	CMC-1703B	DDC	WDL
Daewoo Electronics	CMC-1704C	DDC	WDL
Hitachi	CM600	DDC	WDL
Hitachi	CM701	DDC	WDL
Hitachi	CM800	DDC	WDL
Hitachi	CM801	DDC	WDL
Hitachi	CM802	DDC	WDL
Hitachi	CM803	DDC	WDL
Hitachi	HM-4721	DDC	Box
Hitachi	HM-4921	DDC	Box
Hitachi	SuperScan Elite 21	DDC	WDL
Hitachi	SuperScan Pro 21	DDC	WDL
Hitachi	SuperScan Supreme 21	DDC	WDL
Hyundai Electronics	HL2882 (DeluxScan 21)	DDC	WDL
Hyundai Electronics	HL4848F (DeluxScan 14S)	DDC	WDL
Hyundai Electronics	HL5848F (DeluxScan 15B)	DDC	WDL
Hyundai Electronics	HL5864E (DeluxScan 15 Pro)	DDC	WDL
Hyundai Electronics	HL5864F (DeluxScan 15G)	DDC	WDL
Hyundai Electronics	HL7682A (DeluxScan 17Pro)	DDC	WDL
Hyundai Electronics	HL7864 (DeluxScan 17)	DDC	WDL
Hyundai Electronics	HL7864F (DeluxScan 17B)	DDC	WDL
IBM	G200 Colour	DDC	WDL
IBM	G41 Colour	DDC	WDL
IBM	G50 Colour	DDC	WDL
IBM	G70 Colour	DDC	WDL
IBM	P200 Colour	DDC	WDL
IBM	P50 Colour	DDC	WDL
IBM	P70 Colour	DDC	WDL
LG Electronics	1505S	DDC	WDL
LG Electronics	StudioWorks 20i	DDC	WDL
LG Electronics	StudioWorks 44M	DDC	WDL
LG Electronics	StudioWorks 56M	DDC	WDL
LG Electronics	StudioWorks 78i	DDC	WDL
MAG Technology	DX-1595	DDC	WDL
MAG Technology	DX-15T	DDC	WDL
MAG Technology	DX-1795	DDC	WDL
Mitac	1450FD	DDC	WDL
Mitac	1450FV	DDC	WDL
Mitac	1564FS/D	DDC	WDL
Mitsubishi	Diamond Pro 17TX	DDC	Box
Mitsubishi	Diamond Pro 20H	DDC	Box
Mitsubishi	Diamond Pro 21TX	DDC	Box
Mitsubishi	Diamond Pro 87TXM (TFM8705)	DDC	WDL
Mitsubishi	Diamond Scan 15HX	DDC	Box
Mitsubishi	Diamond Scan 15VX (SD5800)	DDC	WDL
Mitsubishi	Diamond Scan 17HX	DDC	WDL
Mitsubishi	RD15G	DDC	Box
Mitsubishi	RD15M	DDC	WDL
Mitsubishi	RD17F	DDC	WDL
Mitsubishi	RD17GH	DDC	Box
Mitsubishi	RD21G	DDC	Box
Nanao	FlexScan F2.15/33F/F351	DDC	Box
Nanao	FlexScan F2.17/52F/F553	DDC	Box
Nanao	FlexScan F2.17EX/F563	DDC	Box
Nanao	FlexScan F2.21/77F/F764	DDC	Box
Nanao	FlexScan FX2-21 / 88F / F784	DDC	Box
Nanao	FlexScan T2.17/56T/T563	DDC	Box
Nanao	FlexScan T2.17TS/54T/T562	DDC	Box
Nanao	FlexScan T2.20/68T/T662	DDC	Box
NEC	MultiSync C400	DDC	WDL
NEC	MultiSync C500	DDC	WDL
NEC	MultiSync M500	DDC	WDL
NEC	MultiSync M700	DDC	WDL
NEC	MultiSync XE15	DDC	Box
NEC	MultiSync XE17	DDC	Box
NEC	MultiSync XP15	DDC	Box
NEC	MultiSync XP17	DDC	Box
NEC	MultiSync XP21	DDC	Box
NEC	MultiSync XV14	DDC	Box
NEC	MultiSync XV15	DDC	Box
NEC	MultiSync XV15+	DDC	WDL
NEC	MultiSync XV17	DDC	Box
NEC	MultiSync XV17+	DDC	WDL
Nokia Monitors	445R	DDC	WDL
Nokia Monitors	447K	DDC	WDL
Nokia Monitors	447KA	DDC	WDL
Nokia Monitors	447KC	DDC	WDL
Nokia Monitors	447M	DDC	WDL
Nokia Monitors	447W	DDC	WDL
Nokia Monitors	447X	DDC	WDL
Nokia Monitors	447Xav	DDC	WDL
Nokia Monitors	449M	DDC	WDL
Nokia Monitors	449X	DDC	WDL
Pixie Technologies	PBC-1450 (RH-1450)	DDC	WDL
Pixie Technologies	PBC-1564 (DL-1564)	DDC	WDL
Pixie Technologies	PGC-1764 (DH-1764)	DDC	WDL
Princeton Graphic Systems	EO40	DDC	WDL
Princeton Graphic Systems	EO50	DDC	WDL
Princeton Graphic Systems	EO70	DDC	WDL
Princeton Graphic Systems	EO75	DDC	WDL
Princeton Graphic Systems	Princeton Graphic Systems EO15	DDC	WDL
Princeton Graphic Systems	Princeton Graphic Systems EO17	DDC	WDL
Princeton Graphic Systems	Ultra 40	DDC	WDL
Princeton Graphic Systems	Ultra 50	DDC	WDL
Samsung	15GLsi	DDC	WDL
Samsung	17Gli	DDC	WDL
Samsung	17Glsi	DDC	WDL
Samsung	Samtron SC-208DXL+	DDC	WDL
Samsung	Samtron SC-428PT/PTL	DDC	WDL
Samsung	Samtron SC-528MXLJ	DDC	WDL
Samsung	Samtron SC-726GXL	DDC	WDL
Samsung	Samtron SC-728FXL	DDC	WDL
Samsung	SC-528TXL	DDC	WDL
Samsung	SC-528UXL	DDC	WDL
Samsung	SyncMaster 15GLe	DDC	Box
Samsung	SyncMaster 15GLi	DDC	Box
Samsung	SyncMaster 15M	DDC	WDL
Samsung	SyncMaster 15Me	DDC	WDL
Samsung	SyncMaster 17GLi	DDC	Box
Samsung	SyncMaster 17GLsi	DDC	Box
Samsung	SyncMaster 20GLsi	DDC	WDL
Samsung	SyncMaster 21GLs	DDC	WDL
Samsung	SyncMaster 3Ne	DDC	WDL
Samsung	SyncMaster 4S	DDC	WDL
Samsung	SyncMaster 6NE	DDC	WDL
Samtron	SC-528MDL	DDC	WDL
Samtron	SC-728FXLJ	DDC	WDL
Tatung	Intelliscan TM442x series	DDC	WDL
Tatung	Intelliscan TM452x series	DDC	WDL
Tatung	Intelliscan TM651x series	DDC	WDL
Tatung	Intelliscan TM671x series	DDC	WDL
ViewSonic	14 ES	DDC	WDL
ViewSonic	14ES	DDC	WDL
ViewSonic	15 GA	DDC	WDL
ViewSonic	15ES-2	DDC	WDL
ViewSonic	15G-2	DDC	WDL
ViewSonic	17 EA	DDC	WDL
ViewSonic	17GA	DDC	WDL
ViewSonic	17GS	DDC	WDL
ViewSonic	17GS-2	DDC	WDL
ViewSonic	17PS	DDC	WDL
ViewSonic	17PS-2	DDC	WDL
ViewSonic	21 PS	DDC	WDL
ViewSonic	GT770	DDC	WDL
ViewSonic	GT800	DDC	WDL
ViewSonic	Optiquest 1000S	DDC	WDL
ViewSonic	OptiQuest 1562A-2	DDC	WDL
ViewSonic	Optiquest 1769DC	DDC	WDL
ViewSonic	OptiQuest V655	DDC	WDL
ViewSonic	OptiQuest V775	DDC	WDL
ViewSonic	PT770	DDC	WDL
ViewSonic	PT810	DDC	WDL
ViewSonic	PT810-2	DDC	WDL

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Imaging

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Imaging

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Input/Game

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Input/Game

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Logitech	WingMan Extreme Joystick	Game	WDL
Logitech	WingMan Joystick	Game	WDL
Microsoft	SideWinder 3D Pro	Game	WDL
SGS-Thomson	STG2000 Multimedia Accelerator	PCI	Box
SGS-Thomson	STG2000 Multimedia Accelerator	PCI	Box
STD Electronic	Flight Force	Game	Box
STD Electronic	PC GamePad 6	Game	WDL
STD Electronic	PC Programpad	Game	Box
STD Electronic	PC ProPad 6	Game	WDL

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Input/Keyboard

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Input/Keyboard

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Acer	6511/Win, 6311/Win	Keyboard	Box
Bits Technical	KME KB-4501R+9	Keyboard	Box
BJMT Technology	Nimble Color-Coded Keyboard	Keyboard	Box
Can Technology	105 Keyboard for Windows-95	Keyboard	Box
Cherry Mikroschalter	RS6000/NTK	Keyboard	Box
Fellowes	104 Enhanced	Keyboard	Box
Fellowes	104 Ergonomic Keyboard	Keyboard	Box
Jing Mold Enterprise	Keyboard	Keyboard	Box
Key Tronic	ConnectKey-C & E061 XXXX XXXX XXXX-C	Keyboard	Box
Key Tronic	EuroTech	Keyboard	Box
Key Tronic	KB101 Plus-C	Keyboard	Box
Key Tronic	KB101-C	Keyboard	Box
Key Tronic	LT TouchPadXXXX	Keyboard	Box
Key Tronic	LT TrackBallXXX and E0621X XXXX XXXX-C	Keyboard	Box
Key Tronic	LT TrackBallXXX and E0621X XXXX XXXX-C	PS/2	Box
Key Tronic	LT WirelessXXX and E0620X XXXX XXXX-C	DIN	Box
Key Tronic	LT WirelessXXX and E0620X XXXX XXXX-C	PS/2	Box
Key Tronic	LT WLS TBALLXXX and E0622X XXXX XXXX-C	DIN	Box
Key Tronic	LT WLS TBALLXXX and E0622X XXXX XXXX-C	PS/2	Box
Key Tronic	LT WLS TPADXXX	COM/PS/2	Box
Lite-On Peripherals	Magic Touch Keyboard SK-1100W	COM	Box
Microsoft	Natural Keyboard	Keyboard	Box
Mitsumi	ZW 104 Keyboard	Keyboard	Box
NMB Technologies	Cypress Keyboard	Keyboard	Box
NMB Technologies	Maple Keyboard	COM	Box
NMB Technologies	RT-49xxxx MTN7	Keyboard	Box
NMB Technologies	RT-66xxxw	Keyboard	Box
NMB Technologies	RT-82xxxx Oak	Keyboard	Box
NMB Technologies	RT-91xxx Multimedia	Keyboard	Box
Qtronix	Scorpius Keyboard	Keyboard	Box
Sejin America	SKR-2033	Keyboard	Box
Sejin America	SKR-2083	DIN/PS/2	Box
Sejin America	SKR-2083	Keyboard	Box
Sejin America	SKR-2233	Keyboard	Box
Sejin America	SKR-2283	DIN/PS/2	Box
Sejin America	SKR-2283	Keyboard	Box
Sejin America	SWK-8695W	COM	Box
Solid Year	ACK-210	Keyboard	Box
Solid Year	ACK-295	PS/2	Box
Tai-Hao Enterprise	Soft Key Keyboard	Keyboard	Box

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Input/Pointing Drawing

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Input/Pointing Drawing

Hardware Vendor	Device Name	Device Bus	Driver BIOS
CalComp	DrawingSlate II	COM	Box
Fellowes	Best PS/2	PS/2	Box
Fellowes	Gulliver	PS/2	Box
Fellowes	IR MousePen	PS/2	Box
Fellowes	Mini-Trackball	PS/2	Box
Fellowes	MousePen Pro	PS/2	Box
Gyration	Gyropoint Desk	PS/2	Box
ITAC Systems	Mouse-Trak Mouse Port Trackball	PS/2	Box
Kensington Microware	Mouse-in-a-Box	PS/2	Box
Key Tronic	LT_Mouse_PS2xxx and 3HW73-@EP XXXXXX	PS/2	Box
Logitech	CQ38 MouseMan II	COM	Box
Logitech	M-RD37 TrackMan Live	COM	Box
Logitech	M-S34 OEM/First Mouse	PS/2	Box
Logitech	ML38 MouseMan II	COM	Box
Logitech	ML38 MouseMan Sensa	COM	Box
Logitech	MM34 First Mouse	COM	Box
Logitech	MM35 Pilot Mouse	COM	Box
Logitech	MouseMan Bus	ISA	Box
Logitech	RC33 MouseMan Cordless	COM	Box
Logitech	SN35 Pilot Mouse	PS/2	Box
Logitech	T-CE2 TrackMan II	COM	Box
Logitech	T-CE3 TrackMan Portable	COM	Box
Logitech	T-CF9 TrackMan Voyager	COM	Box
Logitech	T-CG10 TrackMan Vista	COM	Box
Logitech	T-CH11 TrackMan III	COM	Box
Microsoft	EasyBall	COM	Box
Microsoft	PS/2 OEM Mouse	PS/2	Box
Microsoft	Serial Mouse	COM	Box
Microsoft	Serial OEM Mouse	COM	Box
Mitsumi	PS/2 Mouse (3902/PS2)	PS/2	Box
Mitsumi	PS/2 Serial Mouse (S3102)	PS/2	Box
Mouse Systems	PC Trackball II	COM	WDL
Truedox Technology	TrueMouse PS/2-401	PS/2	Box
Wacom Technology	ArtPad II	COM	Box

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo International/German Network Adapter

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/German Network Adapter

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Eicon Technology	DIVA German	ISA	WDL
Eicon Technology	DIVA PCM German	PCMCIA	WDL

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo International/Japanese 3Mode Floppy Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese 3Mode Floppy Drive

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo International/Japanese CD-ROM Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese CD-ROM Drive

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo International/Japanese Modem

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese Modem

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo International/Japanese Network Adapter

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese Network Adapter

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo International/Japanese Printer

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese Printer

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo International/Japanese Removable Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese Removable Drive

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo International/Korean Printer

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Korean Printer

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo International/PRC Printer

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/PRC Printer

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo International/Taiwanese Printer

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Taiwanese Printer

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Miscellaneous

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Miscellaneous

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Development Concepts	DCI 5250 PC Card	PCMCIA	Box
Development Concepts	DCI 5250 Plug n Play adapter	ISA/VL	Box
National Instruments	AT-GP1B/TNT (PnP)	ISA/VL	Box
National Instruments	AT-GP1B/TNT+	ISA/VL	Box
National Instruments	PCI-GP1B	PCI	Box
National Instruments	PCMCIA -GP1B	PCMCIA	Box
National Instruments	PCMCIA-GP1B+	PCMCIA	Box
O2MICRO	OZ6722-R1.1	PCMCIA	Box
O2MICRO	OZ6729-1.0LV	PCMCIA	Box
O2MICRO	OZ6730-1.0LV	PCMCIA	Box
Parallel Technology	DirectParallel 4BIT Cable	LPT	Box
Parallel Technology	DirectParallel Universal Cable	LPT	Box
Socket Communications	SL0700 Serial I/O	PCMCIA	Box
U.S. Robotics/Megahertz	AllPoints Wireless PC Card	PCMCIA	Box

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Modem/Analog

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Modem/Analog

Hardware Vendor	Device Name	Device Bus	Driver BIOS
3Com	Etherlink III PC Card (Modem)	PCMCIA	Box
Apex Data	ClipperCom V.34	PCMCIA	Box
Apex Data	Clippercom Worldmodem	PCMCIA	Box
Apex Data	Mobile Direct V.32	PCMCIA	Box
Apex Data	Mobile Plus Cellular V.34	PCMCIA	Box
Askey Computer	1428VQC-R PCMCIA Card	PCMCIA	WDL
Askey Computer	1428VQC-T Data+Fax PCMCIA Modem	PCMCIA	Box
AT&T	3825 Plus	COM	WDL
AT&T	KeepInTouch 28.8 Data Fax	PCMCIA	Box
Aztech Systems	MM AT3300 (Europe)	ISA	Box
Aztech Systems	Sound-3 288FSP	ISA	WDL
Aztech Systems	Sound-3 336FSP	ISA	Box
Boca Research	SENS 810	EISA	WDL
Boca Research	Sound Expression 14.4 SRS	EISA	WDL
Boca Research	Sound Expression V.34 SRS	EISA	WDL
Cardinal Technologies	MVP 144IV2	ISA	WDL
Cardinal Technologies	MVP 288 XV	COM	WDL
Cardinal Technologies	MVP288C2	PCMCIA	WDL
Cardinal Technologies	MVP288I2	COM	WDL
Cardinal Technologies	MVP288IS	ISA	WDL
Cardinal Technologies	MVP288IV	ISA	WDL
Cardinal Technologies	MVP288IV2	COM	WDL
Cardinal Technologies	MVPV341	ISA	Box
Cardinal Technologies	MVPV34ISP	ISA	Box
Creative Labs	CT5410	ISA	Box
Creative Labs	CT5590	ISA	Box
Diamond Multimedia Systems	Supra 288i SP	ISA	WDL
Diamond Multimedia Systems	SupraExpress 288i Multinational	ISA	WDL
Diamond Multimedia Systems	SupraExpress 288i Sp	COM	WDL
EXP Computer	ThinFax 1414i	PCMCIA	Box
EXP Computer	ThinFax 288c	PCMCIA	WDL
EXP Computer	ThinFax 288i	PCMCIA	Box
Garnet Systems	GTM288PC3	ISA	WDL
Grey Cell Systems Ltd	3400 Series Fax/Modem/Ethernet Card	PCMCIA	WDL
Hayes Microcomputer	Optima288 V.34+Fax+Voice	COM	WDL
Hayes Microcomputer	Optima288 V.34+Fax+Voice	COM	Box
Megahertz	CC3144 14.4/14.4 PCCard Modem	PCMCIA	Box
Megahertz	CC3288 28.8/14.4 PCCard Modem	PCMCIA	Box
Megahertz	XJ1144 14.4/14.4 PCCard Modem	PCMCIA	Box
Megahertz	XJ2144 14.4/14.4 PCCard Modem	PCMCIA	Box
Megahertz	XJ2288 28.8/14.4 PCCard Modem	PCMCIA	Box
Microcom	DeskPorte FAST	COM/LPT	Box
Motorola	Lifestyle 28.8 Internal	ISA	Box
NovaLink Technologies	Novamodem 28.8 Data-Fax-Voice	PCMCIA	WDL
NTT Intelligent Technology	ThunderCard AVF288 Data-Fax-Voice	PCMCIA	WDL
Olicom	ET/Modem Go-Card	PCMCIA	WDL
Option International	GSM Ready PCCard	PCMCIA	WDL
Ositech	TR14401 Trumpcard Jack of Diamonds 14.4	PCMCIA	Box
Ositech	TR14403 Trumpcard Jack of Diamonds 28.8	PCMCIA	Box
Philips	PCA33EM/IM PnP Fax Modem	ISA	Box
Psion Dacom	Gold Card V.34	PCMCIA	WDL
RNS	RCV144ACF	ISA	WDL
Sierra Semiconductor	28.8 PnP Data/Fax/Voice Speaker Phone	ISA	WDL
Sierra Semiconductor	SQ3465	ISA	WDL
Simple Technology	28.8 Communicator	COM	WDL
Supra	SupraExpress 144i PnP	ISA	WDL
Supra	SupraExpress 288 PnP	COM	WDL
Supra	SupraExpress 288i PnP	COM	Box
Supra	SupraFAXModem 288i PnP	ISA	WDL
TDK	DF2814 Global Class Data/Fax Modem	PCMCIA	Box
TDK	DF2814 V.34 Data/Fax Modem	PCMCIA	Box
Tron B.V. Datacommunicatie	arx28800tf	COM	Box
Tron B.V. Datacommunicatie	Quatron FM 28.8	COM	Box
U.S. Robotics/Megahertz	Megahertz XJ-CC4288 Data/Fax Modem	COM	WDL
U.S. Robotics/Megahertz	Sportster 14400 External FaxModem	COM	WDL
U.S. Robotics/Megahertz	Sportster 14400 Internal FaxModem	ISA	WDL
U.S. Robotics/Megahertz	Sportster 28.8 PC Card Faxmodem w/ Dataview I	PCMCIA	Box
Xircom	CreditCard Modem 28.8	PCMCIA	WDL

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Modem/ISDN

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Modem/ISDN

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Motion Video

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Motion Video

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Core Dynamics	DynaMax Hi-Rez Plus	ISA	WDL
Miro Computer Products	miroVIDEO DC20	PCI	WDL

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Network/ATM

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Network/ATM

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Network/ISDN

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Network/ISDN

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Eicon Technology	(G. Diehl ISDN) DIVA/PCM Adapter	PCMCIA	WDL
Eicon Technology	DIVA PCM	PCMCIA	WDL
Eicon Technology	DIVA Pro	ISA	WDL

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Network/LAN

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Network/LAN

Hardware Vendor	Device Name	Device Bus	Driver BIOS
3Com	3C339 Tokenlink Velocity	PCI	WDL
3Com	3C509B EtherLink III PnP	ISA	Box
3Com	3C509B PnP	ISA	Box
3Com	3C509B-C Etherlink III (REV 01)	ISA	WDL
3Com	3C509B-C Etherlink III (REV A)	ISA	WDL
3Com	3C509B-C Etherlink III (REV YY)	ISA	WDL
3Com	3C509B-TPO Etherlink III (REV 3A)	ISA	WDL
3Com	3C509B-TPO Etherlink III (REV B)	ISA	WDL
3Com	3C562 Etherlink III LAN+Modem PC Card	PCMCIA	WDL
3Com	3C589 EtherLink III PCMCIA	PCMCIA	Box
3Com	3C589 PCMCIA	PCMCIA	Box
3Com	3C589B EtherLink III PCMCIA	PCMCIA	Box
3Com	3C589B PCMCIA	PCMCIA	Box
3Com	3C589C EtherLink III PCMCIA	PCMCIA	Box
3Com	3C590-C Etherlink III (REV 4A)	PCI	WDL
3Com	3C590-TPO Etherlink III (REV 5A)	PCI	WDL
3Com	3C590-TPO Etherlink III (REV A)	PCI	WDL
3Com	3C595 Fast Etherlink PCI	PCI	WDL
3Com	3C689 TokenLink III PCMCIA	PCMCIA	Box
3Com	Fast Etherlink PCI	PCI	WDL
Accton Technology	EN1660 ISA PnP LAN	ISA	Box
Accton Technology	EN1660 PnP LAN	ISA	Box
Accton Technology	EN2216 PCMCIA Ethernet	PCMCIA	Box
Acer	AcerLAN/p	PCI	Box
Allied Telesis	CentreCOM LA-ISA	ISA	WDL
Allied Telesis	CentreCOM LA-PCI	PCI	Box
Allied Telesis	CentreCOM LA-PCM	PCMCIA	WDL
Allied Telesyn	a	PCI	WDL
Allied Telesyn	AT-1500 Pnp	ISA	Box
Allied Telesyn	AT-1500 PNP Ethernet Network	ISA	WDL
Allied Telesyn	AT-1700 PNP Ethernet Network	ISA	WDL
Allied Telesyn	AT-2450	PCI	Box
Allied Telesyn	AT-2450 Ethernet Network	PCI	WDL
Allied Telesyn	AT-2560 10/100	PCI	WDL
Allied Telesyn	AT-2560 Series PCI/100 Ethernet	PCI	WDL
Allied Telesyn	AT1510 Series	ISA	Box
Allied Telesyn	c	PCI	WDL
AMD	PCnet ISA+	ISA	Box
AMD	PCnet PCI	PCI	Box
AMD	PCnet-ISA II	ISA	WDL
AMD	PCnet-PCI II	PCI	WDL
Boca Research	BE 100/10 BocaLAN Card	PCI	Box
Boca Research	BEN120 BocaLAN Card	ISA	Box
Boca Research	BEN1PI BocaLAN Card	PCI	Box
Cabletron	E2200 Series	ISA	Box
Cabletron	E2210	ISA	Box
Cabletron	E2219 Dual Chip Series Ethernet	ISA	Box
Cabletron	E2219 Single Chip Series Ethernet	ISA	Box
Cogent Data Technologies	EM110 PCI 10/100 Fast Ethernet Adapter	PCI	WDL
Compaq	NetFlex3/P	PCI	WDL
Compaq	TC4048 Token Ring PCI Controller	PCI	WDL
Compex	ENET32-PCI Ethernet	PCI	Box
Compex	Freedom Line 16 PNP Ethernet	ISA	Box
Contec	Ethernet LAN Adapter C-NET(AT)P	ISA/VL	WDL
Contec	Ethernet LAN Adapter C-NET(PI)	PCI	Box
Contec	Ethernet PC Card C-NET(PC)C	PCMCIA	WDL
D-Link	DE-220 PCT ISA Ethernet	ISA	Box
D-Link	DE-220PCT ISA Ethernet	ISA	Box
D-Link	DE-530CT PCI Ethernet	PCI	Box
D-Link	DE-650CT	PCMCIA	Box
D-Link	DE-650CT PCMCIA Ethernet	PCMCIA	Box
Digital Equipment	DE500	PCI	Box
Farallon	EtherWave ISA Card	ISA	Box
Fujitsu ICL	EtherTeam ISA Ethernet Adapter	ISA	Box
Fujitsu ICL	EtherTeam PCI Ethernet Adapter	PCI	Box
Grey Cell Systems Ltd	2200 Series Ethernet Card	PCMCIA	WDL
Hewlett-Packard	DeskDirect (J2573A) 10/100VG ISA LAN	ISA	WDL
Hewlett-Packard	DeskDirect (J2585A) 10/100VG PCI LAN	PCI	WDL
Hewlett-Packard	DeskDirect (J2585B) 10/100VG PCI LAN	PCI	WDL
Hewlett-Packard	DeskDirect (J2970A) 10BaseT/2 PCI LAN	PCI	WDL
Hewlett-Packard	HP 10/100TX PCI Lan	PCI	WDL
IBM	10/100 PCI Ethernet	PCI	WDL
IBM	Auto 16/4 Token Ring Credit Card Adapter	PCMCIA	WDL
IBM	Auto LANStreamer PCI	PCI	WDL
IBM	Etherjet 10-BaseT ISA  Adapter	ISA	WDL
Intel	EtherExpress PRO 100 ISA LAN	ISA	WDL
Intel	EtherExpress Pro/10 LAN (PCLA8200B)	ISA	WDL
Intel	EtherExpress Pro/10 LAN (PCLA8200B)	ISA	WDL
Intel	EtherExpress Pro/10 LAN (PCLA8205B)	ISA	WDL
Intel	EtherExpress Pro/10 LAN (PCLA8205B)	ISA	WDL
Intel	EtherExpress Pro/10 LAN (PCLA8210B)	ISA	WDL
Intel	EtherExpress Pro/10 LAN (PCLA8210B)	ISA	WDL
Intel	EtherExpress Pro/10 LAN (PCLA8215B)	ISA	WDL
Intel	EtherExpress Pro/10 LAN (PCLA8215B)	ISA	WDL
Intel	EtherExpress Pro/10+ LAN Adapter	ISA	WDL
Intel	EtherExpress Pro/10+ LAN Adapter	ISA	WDL
Intel	EtherExpress PRO/100 PCI	PCI	Box
Intel	EtherExpress PRO/100 PCI LAN Adapter for TX (PILA8465B)	PCI	WDL
Intel	EtherExpress PRO/100B PCI LAN	PCI	WDL
Intel	EtherExpress(TM) PRO/100B PCI LAN (NDIS 3.x)	PCI	WDL
Kingston Technology	KNE40 EtherX PCI Ethernet	PCI	WDL
LinkSys	Combo PCMCIA Ethernet	PCMCIA	Box
LinkSys	EtherPCI LAN Card	PCI	Box
MACNICA	ME1 for JEIDA	PCMCIA	Box
Madge	Smart 16/4 AT Plus Ringnode (Rev 2)	ISA	Box
Madge	Smart 16/4 ISA PnP Ringnode	ISA	Box
Madge	Smart 16/4 ISA PnP Ringnode (Rev 1)	ISA	Box
Madge	Smart 16/4 PCI Rev 3	PCI	WDL
Madge	Smart 16/4 PCI Ringnode	PCI	Box
Madge	Smart 16/4 PCI Ringnode (Rev 3)	PCI	Box
Madge	Smart 16/4 PCMCIA Ringnode	PCMCIA	Box
Microdyne	IrmaTrac PNP 4/16 Token Ring Adapter	ISA	WDL
Microdyne	NE 10/100 PCI Fast Ethernet	PCI	WDL
NDC Communications	Instant-Link Ethernet PnP Adapter	ISA	Box
Olicom	ET/Modem Go-Card	PCMCIA	WDL
Olicom	Ethernet Go-Card	PCMCIA	WDL
Olicom	Ethernet ISA 10/100 (OC-2375)	ISA	WDL
Olicom	Ethernet PCI 10/100 Adapter	PCI	WDL
Olicom	Ethernet PCI/II 10/100 (OC-2325)	PCI	WDL
Olicom	OC-2173 Ethernet	ISA	WDL
Olicom	OC-2220 Ethernet PCMCIA	PCMCIA	WDL
Olicom	OC-3118 ISA 16/4 Token Ring	ISA	Box
Olicom	OC-3118 ISA 16/4 Token Ring Adapter	ISA	Box
Olicom	OC-3136 PCI 16/4 Token Ring	PCI	Box
Olicom	OC-3136 PCI 16/4 Token Ring Adapter	PCI	Box
Olicom	Token-Ring ISA 16/4 Adapter	ISA	WDL
Olicom	Token-Ring PCI 16/4 Adapter	PCI	WDL
Ositech	TR14401 Trumpcard Jack of Diamonds	PCMCIA	Box
Ositech	TR14403 Trumpcard Jack of Diamonds	PCMCIA	Box
PureData	PDI9025Plus-4/16	ISA	Box
PureData	PDMCIA9025Plus-4/16	PCMCIA	WDL
PureData	PDP9025-4/16	PCI	Box
Racal Guardata	EtherBlaster TP/TPO/T2	ISA	Box
Racal Guardata	PCI T2/TP/TPO	PCI	WDL
Realtek	RTL8019 PnP LAN	ISA	Box
Realtek	RTL8029 PCI Ethernet	PCI	WDL
Samsung	MagicLink (SEB-2100T)	ISA	WDL
Silicom	Ethernet PCMCIA	PCMCIA	Box
SMC	8016 EliteCard PCMCIA	PCMCIA	Box
SMC	8416 EtherEZ	ISA	WDL
SMC	8432 EtherPower PCI	PCI	WDL
SMC	8432 EtherPower with ROM socket	PCI	WDL
SMC	8434 EtherPower2 PCI	PCI	WDL
SMC	9332 EtherPower 10/100 PCI	PCI	WDL
Socket Communications	Socket EA/EA+	PCMCIA	Box
SVEC	FD0421P EtherPlug Adapter	ISA	Box
SVEC	FD0421P EtherPlug-ISA	ISA	Box
SVEC	FD0455 EtherBoard-PCI	PCI	Box
SysKonnect	SK-NET Flash	ISA	Box
SysKonnect	SK-NET Flash Ethernet	ISA	Box
Tektronix	3C595-TX Fast Etherlink III (REV C)	PCI	WDL
Texas Instruments	ThunderLAN-based Ethernet	PCI	WDL
Tulip	NCC-16 PnP	ISA	Box
Tulip	P60 Onboard Ethernet	PCI	Box
Tulip	Tulip 486/100 onboard ethernet	ISA	Box
Tulip	Tulip P60 Onboard Ethernet	PCI	Box
United Microelectronics Corp.	UM9008	ISA/VL	Box
Xircom	CE-10 CreditCard Ethernet	PCMCIA	Box
Xircom	CE-10/A Corporate CreditCard Ethernet	PCMCIA	Box
Xircom	CEM2 CreditCard Ethernet+Modem II	PCMCIA	Box
Xircom	Credit Card Ethernet Adapter CE3-10/100	PCMCIA	WDL
Xircom	CreditCard Ethernet (CE-10/A)	PCMCIA	Box
Xircom	CreditCard Ethernet (CE-10BT)	PCMCIA	Box
Xircom	CreditCard Ethernet Adapter IIps	PCMCIA	WDL
Xircom	CreditCard Ethernet IIps (PS-CE2-10)	PCMCIA	Box
Xircom	CreditCard Ethernet+Modem II	PCMCIA	Box
Xircom	PS-CE2 PS CreditCard Ethernet II	PCMCIA	Box

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Network/WAN

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Network/WAN

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Printer

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Printer

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Canon	BJC-210	LPT	Box
Canon	MultiPASS C2500	LPT	Box
Canon	MultiPASS C30	LPT	Box
Canon	MultiPASS CFXB381F	LPT	Box
Digital Equipment	DEClaser 3500	LPT	WDL
Hewlett-Packard	DesignJet 250C	LPT	Box
Hewlett-Packard	DesignJet 750C	LPT	Box
Hewlett-Packard	DesignJet 755CM	LPT	Box
Kyocera Electronics	FS-1550+	LPT	WDL
Kyocera Electronics	FS-1600+	LPT	WDL
Kyocera Electronics	FS-3400+	LPT	WDL
Kyocera Electronics	FS-3600+	LPT	WDL
Kyocera Electronics	FS-6500+	LPT	WDL
Kyocera Electronics	LS-6550	LPT	WDL
Lexmark	Optra PS	LPT	WDL
Sharp	MultiFunction Fax F-2700M	LPT	Box
Tektronix	Phaser 240	LPT	WDL
Tektronix	Phaser 340	LPT	WDL
Tektronix	Phaser 540	LPT	WDL
Tektronix	Phaser 540-PLUS	LPT	WDL
Tektronix	Phaser 550	LPT	WDL
Xerox	4505/4505PS Desktop Laser Printer	LPT	WDL
Xerox	4510/4510PS Desktop Laser Printer	LPT	WDL
Xerox	4520/4520PS Desktop Laser Printer	LPT	WDL
Xerox	DocuPrint 4517	LPT	WDL

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Storage/CD-ROM Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/CD-ROM Drive

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Acer	AcerCD 645A	IDE	Box
Acer	AcerCD 655A	IDE	Box
Acer	AcerCD 665A	IDE	Box
Acer	CD-743E	IDE	Box
Acer	CD-747E	IDE	Box
Acer	CD-767E	IDE	Box
Acer	CD-787E	IDE	Box
Acer	CD-910E 10X CD-ROM	IDE	Box
Aztech Systems	CDA268-03ISE	IDE	Box
Aztech Systems	CDA468-02I	IDE	Box
Aztech Systems	CDA668-01I	IDE	Box
Delta Electronics	ODC 6101	IDE	Box
Funai Electric	E2650	IDE	Box
Funai Electric	E2850	IDE	Box
Hitachi	8X CD-ROM CDR-7930	IDE	Box
LG Electronics	GCD-R542B	IDE	Box
LG Electronics	GCD-R560B	IDE	Box
LG Electronics	GCD-R580B 8x CD-ROM Drive	IDE	Box
Matsushita-Kotobuki Electronics	CR-504-J	SCSI	Box
Matsushita-Kotobuki Electronics	CR-581-M	IDE	Box
Matsushita-Kotobuki Electronics	LK-MC684	IDE	Box
Matsushita-Kotobuki Electronics	LK-RC504AB1	SCSI	Box
Mitsumi	CRMC-FX400	IDE	Box
Mitsumi	CRMC-FX400B	IDE	Box
Mitsumi	CRMC-FX400D	IDE	Box
NEC	CDR-1300A	IDE	Box
NEC	CDR-1400A	IDE	Box
NEC	CDR-1450A	IDE	Box
NEC	CDR-1460A	SCSI	Box
NEC	CDR-1460A	SCSI	Box
NEC	CDR-222	SCSI	Box
NEC	CDR-271	IDE	Box
NEC	CDR-272	ATAPI	Box
NEC	CDR-273	IDE	Box
NEC	MultiSpin 6v (CDR-1350)	IDE	Box
NEC	Multispin Tower	SCSI	Box
Panasonic	LF-1000 PD	SCSI	Box
Philips	PCA62CR 6X CDROM	IDE	Box
Philips	PCA82CR/M2 8X	IDE	Box
Plextor	4PleX Plus PX-45CE (external)	SCSI	Box
Plextor	4PlexX Plus PX-43CE (internal)	SCSI	Box
Plextor	6PleX PX-63CS (internal)	SCSI	Box
Plextor	6PleX PX-65CS (external)	SCSI	Box
Plextor	8PleX (Model PX-83CS	SCSI	Box
Plextor	8PleX (Model Px-85CS)	SCSI	Box
Samsung	SCR-730	IDE	Box
Samsung	SCR-830	IDE	Box
Sanyo	CRD-256P	IDE	Box
Teac	4X Notebook CD-ROM drive, model CD-44E (IDE)	IDE	Box
Teac	CD-40E	IDE	Box
Teac	CD-40S	SCSI	Box
Teac	CD-56E	IDE	Box
Teac	CD-56S	SCSI	Box
Toshiba Engineering Co.	XM-3701	SCSI	Box
Toshiba Engineering Co.	XM-5302B	IDE	Box
Toshiba Engineering Co.	XM-5602B	IDE	Box
Wearnes Peripherals	CDD-620	COM	Box

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Storage/Hard Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/Hard Drive

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Conner Peripherals	Filepro Advantage CFA2161A	IDE	Box
Conner Peripherals	Filepro CFS1276A	IDE	Box
Conner Peripherals	Filepro Series 1275A	IDE	Box
Conner Peripherals	Filepro Series 425A	IDE	Box
Conner Peripherals	Filepro Series 540A	IDE	Box
Conner Peripherals	Filepro Series 635A	IDE	Box
Conner Peripherals	Filepro Series 850A	IDE	Box
Fujitsu	M1603SAU	SCSI	Box
Fujitsu	M1603TAU	IDE	Box
Fujitsu	M1606SAU	SCSI	Box
Fujitsu	M1606TAU	IDE	Box
Fujitsu	M1612TAU	IDE	Box
Fujitsu	M1614TAU	IDE	Box
Fujitsu	M2684TAU	IDE	Box
Fujitsu	M2713TAM Fixed Disk Drive	IDE	Box
Fujitsu	M2714TAM Fixed Disk Drive	IDE	Box
Hewlett-Packard	C5280A/SureStore 1080A	IDE	Box
Hewlett-Packard	C5281A/SureStore 1600A	IDE	Box
Hewlett-Packard	HP 2.0 GB Hard Disk, C5283A	IDE	Box
Hewlett-Packard	HP SureStore Hard Disk  2000A, C5273A	IDE	Box
Hewlett-Packard	HP SureStore Hard Disk  2000V, C5436A	IDE	Box
IBM	DeskStar XP (DPES-31080)	SCSI	Box
IBM	IBM Ultrastar ES DORS-31080	SCSI	Box
IBM	IBM Ultrastar ES DORS-32160	SCSI	Box
IBM	TravelStar (DVAA-2810)	IDE	Box
IBM	TravelStar 3LP (DMCA-21080)	IDE	Box
IBM	TravelStar 3LP (DMCA-21440)	IDE	Box
IBM	TravelStar LP (DBOA-2540)	IDE	Box
IBM	TravelStar LP (DBOA-2720)	IDE	Box
IBM	TravelStar XP (DPRA-20810)	IDE	Box
IBM	TravelStar XP (DPRA-21215)	IDE	Box
IBM	UltraStar ES (DORS-32160)	SCSI	Box
IBM	Ultrastar XP 54F	SCSI	Box
Maxtor	GEN 1 - 7540AV	IDE	Box
Maxtor	GEN 2 - 7425AV	IDE	Box
Maxtor	GEN 2 - 7850AV	IDE	Box
Maxtor	GEN 2.5 - 7425AV	IDE	Box
Maxtor	GEN 2.5 - 7850AV	IDE	Box
Maxtor	GEN 3 - 71084AP	IDE	Box
Maxtor	GEN 3 - 71626AP	IDE	Box
Maxtor	GEN 3 - 7541AP	IDE	Box
Maxtor	Genstone 71336AP	IDE	Box
Maxtor	Genstone 71670AP	IDE	Box
Maxtor	Genstone 72004AP	IDE	Box
Maxtor	MobileMax 105 MB	PCMCIA	Box
Maxtor	MobileMax 131 MB	PCMCIA	Box
Maxtor	MobileMax 171 MB	PCMCIA	Box
Maxtor	MobileMax 262 MB	PCMCIA	Box
Maxtor	MobileMax PCMCIA	PCMCIA	Box
Quantum	Atlas (XP31070)	SCSI	Box
Quantum	Atlas (XP32150)	SCSI	Box
Quantum	Atlas (XP34300)	SCSI	Box
Quantum	Bigfoot 1.2G	IDE	Box
Quantum	Capella (VP31110)	SCSI	Box
Quantum	Capella (VP32210)	SCSI	Box
Quantum	Europa 1080AT	IDE	Box
Quantum	Europa 540AT	IDE	Box
Quantum	Europa 810AT	IDE	Box
Quantum	Fireball 1080A	IDE	Box
Quantum	Fireball 1080S	SCSI	Box
Quantum	Fireball 2110S	SCSI	Box
Quantum	Fireball 3200S	SCSI	Box
Quantum	Fireball 540A	IDE	Box
Quantum	Fireball 540S	SCSI	Box
Quantum	Fireball II 1280AT	IDE	Box
Quantum	Fireball II 1280SCSI	SCSI	Box
Quantum	Fireball II 640AT	IDE	Box
Quantum	Fireball II 640SCSI	SCSI	Box
Quantum	Grand Prix	SCSI	Box
Quantum	Trailblazer 420A	IDE	Box
Quantum	Trailblazer 420S	SCSI	Box
Quantum	Trailblazer 630A	IDE	Box
Quantum	Trailblazer 840A	IDE	Box
Quantum	Trailblazer 840S	SCSI	Box
Samsung	PLS-30854A	IDE	Box
Samsung	PLS-31274A	IDE	Box
Seagate Technology	Hawk 2XL Family (2GB, ST32151W)	SCSI	Box
Seagate Technology	Hawk 2XL Family (2GB, ST32155N)	SCSI	Box
Seagate Technology	Hawk 2XL Family (2GB, ST32155W)	SCSI	Box
Seagate Technology	Marathon ST91350AG	IDE	Box
Seagate Technology	Marathon ST9840A	IDE	Box
Seagate Technology	Medalist SL  (ST51270A)	IDE	Box
Seagate Technology	Medalist ST3850A	IDE	Box
Seagate Technology	Seagate Decathlon 1080 (ST1080N)	SCSI	Box
Seagate Technology	ST15150N Barracuda 4	SCSI	Box
Seagate Technology	ST31220A Medalist 1220	IDE	Box
Seagate Technology	ST31270A Medalist 1270	IDE	Box
Seagate Technology	ST32140A Medalist 2140	IDE	Box
Seagate Technology	ST32430N Hawk 2LP	SCSI	Box
Seagate Technology	ST32550N Barracuda 2LP	SCSI	Box
Seagate Technology	ST3660A Medalist 545 xe	IDE	Box
Seagate Technology	ST51080A Medalist SL 1080	IDE	Box
Seagate Technology	ST5850A Medalist SL 850	IDE	Box
Seagate Technology	ST9816AG Marathon 810	IDE	Box
Western Digital	Caviar AC21000	IDE	Box
Western Digital	Caviar AC21200	IDE	Box
Western Digital	Caviar AC21600	IDE	Box
Western Digital	Caviar AC2850	IDE	Box
Western Digital	Caviar AC31000	IDE	Box
Western Digital	Caviar AC31200	IDE	Box
Western Digital	Caviar AC31600	IDE	Box
Western Digital	Caviar AC32100	IDE	Box

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Storage/IDE Controller

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/IDE Controller

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Hewlett-Packard	HP SureStore Hard Disk 1300 A,C5272A	IDE	Box
Hewlett-Packard	HP SureStore Hard Disk 1300V,C5435A	IDE	Box

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Storage/Raid

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/Raid

There are no products available at this time for the hardware category you selected.

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Storage/Removable Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/Removable Drive

Hardware Vendor	Device Name	Device Bus	Driver BIOS
M-Systems	Trueffs for Windows 95	PCMCIA	WDL
SyQuest Technology	EZ135S (135 MB)	SCSI	Box
SyQuest Technology	SQ3270S (270 MB)	SCSI	Box
SyQuest Technology	SQ5110C (88 MB)	SCSI	Box
SyQuest Technology	SQ5200 (200 MB)	SCSI	Box

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Storage/SCSI Controller

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/SCSI Controller

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Adaptec	AHA-1510B	PCI	Box
Adaptec	AHA-1510B	ISA-16	Box
Adaptec	AHA-1520B	ISA	Box
Adaptec	AHA-1530P	ISA	WDL
Adaptec	AHA-1535	ISA	WDL
Adaptec	AHA-1542CP	ISA	WDL
Adaptec	AHA-2905	PCI	Box
Adaptec	AHA-2910	PCI	WDL
Adaptec	AHA-2910A	SCSI	WDL
Adaptec	AHA-2920	PCI	Box
Adaptec	AHA-2940	PCI	WDL
Adaptec	AHA-2940AU	PCI	Box
Adaptec	AHA-2940U	PCI	WDL
Adaptec	AHA-2940UW	PCI	WDL
Adaptec	AHA-3940U	PCI	Box
Adaptec	AHA-3940UW	PCI	Box
Adaptec	AHA-3940UWD	PCI	WDL
Adaptec	APA-1425/50/60A	PCMCIA	WDL
Adaptec	APA-1460	PCMCIA	WDL
Adaptec	AVA-1502AP	ISA-16	Box
Adaptec	AVA-2930	PCI	WDL
Adaptec	AVA-2930P	PCI	WDL
Adaptec	PnP 1630	ISA	Box
Adaptec	PnP 1640	ISA	Box
Adaptec	SCSI-2-Go	PCMCIA	Box
Adaptec	TMC 3260	PCI	Box
Advanced System Products	AdvanSys ABP940	PCI	WDL
BusLogic	BT-948	PCI	WDL
BusLogic	FlashPoint LT (BT-930)	PCI	WDL
Initio	INI-6100 ISA SCSI Bus Master Host Adapter	ISA	WDL
Initio	INI-6102	ISA-16	WDL
Initio	INI-9100	PCI	WDL
Initio	INI-9100W PCI	PCI	WDL
QLogic	Fast!SCSI PCMCIA-10	PCMCIA	WDL
Simple Technology	SCSI Card	PCMCIA	Box
Tekram	DC-390 PCI SCSI	PCI	WDL
Western Digital	WD7193	PCI	WDL
Western Digital	WD7197	PCI	WDL

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo Storage/Tape Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/Tape Drive

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Conner Peripherals	4350 XT / CTD-2004E-S	SCSI	Box
Conner Peripherals	4356 XP / CTD-8000E-S	SCSI	Box
Conner Peripherals	TSM 4000R-S	SCSI	Box
Hewlett-Packard	C1520G SureStore Tape 2000e	SCSI	Box
Hewlett-Packard	C1521G SureStore Tape 5000e	SCSI	Box
Hewlett-Packard	C1528F HP Surestore Tape 6000i	SCSI	Box
Hewlett-Packard	C1529F SureStore Tape 6000e	SCSI	Box
Hewlett-Packard	C1551B SureStore Tape 5000eU	SCSI	Box
Hewlett-Packard	C1552A SureStore Tape 6000eU	SCSI	Box
Hewlett-Packard	Sure Store Tape 5000i	SCSI	Box
Tandberg Data	Panther Mini 2000	SCSI	Box
Tandberg Data	Panther Mini 4600	SCSI	Box
Tandberg Data	TDC3820 525MB	SCSI	Box
Tandberg Data	TDC4120 1.2GB	SCSI	Box
Tandberg Data	TDC4220 2.5GB	SCSI	Box
Tandberg Data	TDC4222 5GB	SCSI	Box

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo System/Desktop

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : System/Desktop

Hardware Vendor	Device Name	Device Bus	Driver BIOS
3D Microcomputers	Bandwell Pentium	ISA/PCI	AMI/Intel (1.00.03.CB0)
3D Microcomputers	IPC PR Series	ISA/PCI	AMI/Intel (1.00.03.CB0)
3D Microcomputers	IPC Select (P5-90)	ISA/PCI	AMI/Intel (1.00.03.CB0)
Acer	Acer Power 900	ISA/PCI	Acer (2.0)
Acer	AcerAcros 4790	ISA/PCI	Acer (2.0)
Acer	AcerAcros 800	ISA/PCI	Acer (2.0)
Acer	AcerAcros 850	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9106	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9130	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9133	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9135-B	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9136	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9137	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9139-B	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9233	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9239	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9704	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9713	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9714	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9733	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9735-B	ISA/PCI	Acer (2.0)
Acer	AcerAcros 9737	ISA/PCI	Acer (2.0)
Acer	AcerAltos 150 Client	ISA/PCI	Acer (2.0 R01-EO)
Acer	AcerAltos 150 Client Viper/M	ISA/PCI	Acer (V2.0R02-GO)
Acer	AcerAltos 300	ISA/PCI	Acer (V2.0)
Acer	AcerAltos 360 Client	ISA/PCI	Acer (V2.0)
Acer	AcerAltos 560	ISA/PCI	Acer (V2.0)
Acer	AcerAltos 750	ISA/PCI	Acer (2.0 R01-EO)
Acer	AcerAltos 7800	ISA/PCI	Acer (2.0 R01-EO)
Acer	AcerAltos 900/M	ISA/PCI	Acer (2.0 R01-EO)
Acer	AcerAltos Personal W/S	ISA/PCI	Acer (2.0 R01-EO)
Acer	AcerAltos Uno	ISA/PCI	Acer (V2.0)
Acer	AcerAltos Uno	ISA/PCI	Acer (2.0 R01-EO)
Acer	AcerAspire 2000	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2000D	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2090	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2091	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2111	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2120	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2121	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2123	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2124	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2125	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2136	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2137	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2224	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2225	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2234	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2235	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2236	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2237	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2240	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2241	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2336	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2337	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2346	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2347	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2348	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2349	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2350	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2351	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2456	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2550	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2551	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2650	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2651	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2652	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2653	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2710	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2711	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2720	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2721	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2920	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 2921	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 5100	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 5120	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 5133	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 575	ISA/PCI	Acer (V2.0)
Acer	AcerAspire 590	ISA/PCI	Acer (V2.0)
Acer	AcerAspire LC5100	ISA/PCI	Acer (V2.0)
Acer	AcerAspire LC5120	ISA/PCI	Acer (V2.0)
Acer	AcerAspire LC5133	ISA/PCI	Acer (V2.0)
Acer	AcerAspire LC575	ISA/PCI	Acer (V2.0)
Acer	AcerAspire LC590	ISA/PCI	Acer (V2.0)
Acer	AcerEntra 3126	ISA/PCI	Acer (2.0)
Acer	AcerEntra 3714	ISA/PCI	Acer (2.0)
Acer	AcerMate 486	VLB	Acer (R06-A1)
Acer	AcerMate 486/g	VLB	Acer (R03-A0)
Acer	AcerMate 600	ISA/PCI	Acer (2.0)
Acer	AcerMate 800	ISA/PCI	Acer (2.0)
Acer	AcerMate 850	ISA/PCI	Acer (2.0)
Acer	AcerPower 500hd	ISA/PCI	Acer (2.0)
Acer	AcerPower 5100HF	ISA/PCI	Acer (V2.0)
Acer	AcerPower 5120hd	ISA/PCI	Acer (2.0)
Acer	AcerPower 5133hd	ISA/PCI	Acer (2.0)
Acer	AcerPower 5700	ISA/PCI	Acer (2.0)
Acer	AcerPower 5710	ISA/PCI	Acer (2.0)
Acer	AcerPower 5718	ISA/PCI	Acer (2.0)
Acer	AcerPower 575hd	ISA/PCI	Acer (2.0)
Acer	AcerPower 590hd	ISA/PCI	Acer (2.0)
Acer	AcerPower 800	ISA/PCI	Acer (2.0)
Acer	AcerPower 9138	ISA/PCI	Acer (2.0)
Acer	AcerPower 9348	ISA/PCI	Acer (2.0)
Acer	AcerPower 9718	ISA/PCI	Acer (2.0)
Acer	AcerPower P100	ISA/PCI	Acer (2.0)
Acer	AcerPower P100p	ISA/PCI	Acer (2.0)
Acer	AcerPower P120	ISA/PCI	Acer (2.0)
Acer	AcerPower P120p	ISA/PCI	Acer (2.0)
Acer	AcerPower P133	ISA/PCI	Acer (2.0)
Acer	AcerPower P133p	ISA/PCI	Acer (2.0)
Acer	AcerPower P75	ISA/PCI	Acer (2.0)
Acer	AcerPower P75p	ISA/PCI	Acer (2.0)
Acer	AcerPower P90	ISA/PCI	Acer (2.0)
Acer	AcerPower P90p	ISA/PCI	Acer (2.0)
Acer	AcerPower Ultima	ISA/PCI	Acer (V2.0)
Acer	AcerPower/M	ISA/PCI	Acer (V2.0R02-GO)
Acer	AcerPower/M Ultima	ISA/PCI	Acer (2.0 R01-EO)
Acer	AcerPower/V	ISA/PCI	Acer (2.0)
Acer	AcerPowerLC 5100	ISA/PCI	Acer (2.0)
Acer	AcerPowerLC 5120	ISA/PCI	Acer (2.0)
Acer	AcerPowerLC 5133	ISA/PCI	Acer (2.0)
Acer	AcerPowerLC 575	ISA/PCI	Acer (2.0)
Acer	AcerPowerLC 590	ISA/PCI	Acer (2.0)
Acer	Aspire 2000DE	ISA/PCI	Acer (V2.0)
Acer	Aspire 2000T	ISA/PCI	Acer (V2.0)
Acer	Aspire 2000TE	ISA/PCI	Acer (V2.0)
Acer	Aspire 2128	ISA/PCI	Acer (BIOS V2.0)
Acer	Aspire 2129	ISA/PCI	Acer (BIOS V2.0)
Acer	Aspire P100	ISA/PCI	Acer (V2.0)
Acer	Aspire P120	ISA/PCI	Acer (V2.0)
Acer	Aspire P133	ISA/PCI	Acer (V2.0)
Acer	Aspire P150	ISA/PCI	Acer (V2.0)
Acer	Aspire P166	ISA/PCI	Acer (V2.0)
Acer	Aspire P75	ISA/PCI	Acer (V2.0)
Acer	Aspire V50	ISA/PCI	Acer (V2.0)
Acer	BG08-AP4X	ISA/PCI	AMI (AP4 R1.4)
Acer	BG08-AP5C	ISA/PCI	AMI (R1.20)
Acer	BG08-AP5C/P	ISA/PCI	AMI (R 1.20)
Acer	BG08-AP5CS	ISA/PCI	Award (R2.01.01)
Acer	BG45-AP4X	ISA/PCI	AMI (AP4 R1.4)
Acer	BG45-AP5C	ISA/PCI	AMI (R1.20)
Acer	BG45-AP5CS	ISA/PCI	Award (R2.01.01)
Acer	BG85-AP4X	ISA/PCI	AMI (AP4 R1.4)
Acer	BG85-AP5C	ISA/PCI	AMI (R1.20)
Acer	BG85-AP5C/P	ISA/PCI	AMI (R 1.20)
Acer	BG85-AP5CS	ISA/PCI	Award (R2.01.01)
Acer	BG95-AP4X	ISA/PCI	AMI (AP4 R1.4)
Acer	BG95-AP5C	ISA/PCI	AMI (R1.20)
Acer	BG95-AP5C/P	ISA/PCI	AMI (R 1.20)
Acer	BGP5-AP5C/P	ISA/PCI	AMI (R 1.20)
Acer	BGP5-AP5CS	ISA/PCI	Award (R2.01.01)
Acer	Entra 3000	ISA/PCI	Acer (V2.0)
Acer	Mate 910	ISA/PCI	Acer (V2.0)
Acer	Mate 920	ISA/PCI	Acer (V2.0)
Acer	Mate 930	ISA/PCI	Acer (V2.0)
Acer	MBC-T513S	PCI/ISA	Acer (R01-A8)
Acer	MT20G-AP4X	ISA/PCI	AMI (AP4 R1.4)
Acer	MT20G-AP5C	ISA/PCI	AMI (R1.20)
Acer	MT20G-AP5C/P	ISA/PCI	AMI (R 1.20)
Acer	MT20G-AP5CS	ISA/PCI	Award (R2.01.01)
Acer	Pi16	ISA/PCI	Acer (V20 R02-I0)
Acer	Pi30	ISA/PCMCIA	Phoenix (PhoenixBIOS Version 4.04 R2.02/APM11-0)
Acer	Power 2000D	ISA/PCI	Acer (V2.0)
Acer	Power 5000	ISA/PCI	Acer (V2.0)
Acer	Power 5100LA	ISA/PCI	Acer (V2.0)
Acer	Power 5120LA	ISA/PCI	Acer (V2.0)
Acer	Power 5133LA	ISA/PCI	Acer (V2.0)
Acer	Power 5150LA	ISA/PCI	Acer (V2.0)
Acer	Power 5166LA	ISA/PCI	Acer (V2.0)
Acer	Power 575LA	ISA/PCI	Acer (V2.0)
Acer	Power 590LA	ISA/PCI	Acer (V2.0)
Acer	Power P100	ISA/PCI	Acer (V2.0)
Acer	Power P120	ISA/PCI	Acer (V2.0)
Acer	Power P133	ISA/PCI	Acer (V2.0)
Acer	Power P150	ISA/PCI	Acer (V2.0)
Acer	Power P166	ISA/PCI	Acer (V2.0)
Acer	Power P75	ISA/PCI	Acer (V2.0)
Acer	Power P90	ISA/PCI	Acer (V2.0)
Acer	Power V50	ISA/PCI	Acer (V2.0)
Acer	Synabro 5(Sy5)	ISA/PCI	Acer (V2.0)
Achme Computer	U-TRON 250 Series	ISA/PCI	AMI (A378)
Actebis Computerhandels	Desktop Pentium 75	ISA/PCI	Award (10/4/95)
Actebis Computerhandels	NN PC+ DT Pentium	ISA/PCI	Award (v1.11)
Actebis Computerhandels	NN PC+ DT Pentium	ISA/PCI	Award (v1.11)
Actebis Computerhandels	NN PC+ MT Pentium	ISA/PCI	Award (v1.11)
Actebis Computerhandels	NN PC+ MT Pentium	ISA/PCI	Award (10/4/95)
Actebis Computerhandels	NN PC+ MT Pentium	ISA/PCI	Award (v1.11)
Actebis Computerhandels	Targa II Premium 75	ISA/PCI	Award (v1.11)
Actebis Computerhandels	Targa Series II PC+	ISA/PCI	Award (10/4/95)
Actebis Computerhandels	Targa Series II PC+ DT	ISA/PCI	Award (v1.11)
Actebis Computerhandels	Targa Series II PC+ DT	ISA/PCI	Award (v1.11)
Actebis Computerhandels	Targa Series II PC+ DX4100 AMD	ISA/PCI	Award (0301)
Actebis Computerhandels	Targa Series II PC+ DX4100 Intel	ISA/PCI	Award (0301)
Actebis Computerhandels	Targa Series II PC+ MT	ISA/PCI	Award (v1.11)
Actebis Computerhandels	Targa Series II PC+ MT	ISA/PCI	Award (v1.11)
Actebis Computerhandels	Targa Series II PC+ Premium 75	ISA/PCI	Award (v1.11)
Actebis Computerhandels	Targa Series II PC+ TO	ISA/PCI	Award (v1.11)
Actebis Computerhandels	Targa Series II PC+ TO	ISA/PCI	Award (v1.11)
Advance Creative Computer Corporation	QUIN-55	ISA/PCI	Box
Advance-Interface Electronic	Express Micro 5000	PCI	AMI (AP5C R.120 8-22-95)
Advance-Interface Electronic	Tangent 5000	PCI	AMI (AP5C R.120 8-22-95)
Advanced Digital Systems	ADS:Pro 100/90	PCI	AMI (74ZG)
Advanced Digital Systems	ADS:Pro 120	PCI	AMI (74ZG)
Advanced Digital Systems	ADS:Pro 133	PCI	AMI (74ZG)
Advanced Digital Systems	ADS:Pro 75	PCI	AMI (74ZG)
Advanced Digital Systems	Pro 100	PCI	AMI (74ZG)
Advanced Digital Systems	Pro 120	PCI	AMI (74ZG)
Advanced Digital Systems	Pro 133	PCI	AMI (74ZG)
Advanced Digital Systems	Pro 75	PCI	AMI (74ZG)
Advanced Digital Systems	Pro 90	PCI	AMI (74ZG)
Advanced Digital Systems	Pro Series	PCI	AMI (74ZG)
Advanced Logic Research	ALR Evolution V	PCI	Phoenix (4.05.1)
Advanced Logic Research	ALR Evolution X	PCI	Phoenix (4.05.1)
Advanced Logic Research	ALR Optima	PCI	AMI/Intel (1.00.03.BT0)
Advanced Logic Research	Optima SL	PCI	Phoenix (2.0)
AEE	Micdis	ISA/PCI	Award (R2.01.01)
AEE	UNIKA	ISA/PCI	Award (R2.01.01)
Alaris	P5 Series - P5100	ISA/PCI	AMI/Intel (1.00.03.BS0)
Alaris	P5120	ISA/PCI	AMI/Intel (1.00.03.BS0)
Alaris	P5133	ISA/PCI	AMI/Intel (1.00.03.BS0)
Alaris	P575	ISA/PCI	AMI/Intel (1.00.03.BS0)
Alaris	P590	ISA/PCI	AMI/Intel (1.00.03.BS0)
Altec SA	Altec RV95	ISA/PCI	Award (R2.01.01)
Amax Engineering	P-90E	ISA/PCI	AMI/Intel (1.00.03.CB0)
Amax Engineering	P-90Z	ISA/PCI	AMI/Intel (1.00.03.BS0)
AmiTech A/S	AmiTech MM 412 PCI	ISA/PCI	Award (4.50PG)
AmiTech A/S	AmiTech MM 431 PCI	ISA/PCI	Award (4.50PG)
AmiTech A/S	AmiTech Office 322 PCI	ISA/PCI	Award (4.50PG)
AmiTech A/S	AmiTech Office 332 PCI	ISA/PCI	Award (4.50PG)
AmiTech A/S	AmiTech Office 345 PCI	ISA/PCI	Award (4.50PG)
AmiTech A/S	PowerLine 312 PCI	ISA/PCI	Award (4.50PG(52XS_Ver.D))
Anabelle Bits	P90 Workstation	ISA/PCI	AMI/Intel (1.00.03.BS0)
Anson Computer	Elite	PCI	AMI/Intel (1.00.03 BS0)
Apaq	Columbia Elite 90	ISA/PCI	Award (4.50hp)
Apaq	Columbia Patriot 120	ISA/PCI	Award (4.50 GP    T1.02)
Apaq	Titan 5133	ISA/PCI	AMI/Intel (1.00.03.CB0)
Apricot Computers	LS-PRO DX2-66	ISA	Apricot (3.05)
Apricot Computers	LS-PRO DX4-100	ISA/PCMCIA	Apricot (3.06.09)
Apricot Computers	VS550-5100	ISA/PCI	Box
Apricot Computers	VS660	PCI	Intel (1.00.02.CN0)
Apricot Computers	XEN-PC 5120	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PC 560	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PC 575	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PC 590	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PC-486 DX4-100	ISA	Acer (R02-F0)
Apricot Computers	XEN-PCLS 5120	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PCLS 560	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PCLS 575	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PCLS 590	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PCLS-486 DX4-100	ISA	Acer (R02-F0)
Apricot Computers	XEN-PCLSE-486 DX4-100	ISA	Acer (R02-F0)
Apricot Computers	XEN-PCM 5120	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PCM 560	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PCM 575 On Line	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PCM 590	ISA/PCI	IBM Surepath (1.3)
Apricot Computers	XEN-PCM-486 DX4-100	ISA	Acer (R02-F0)
Apricot Computers	XEN-PCM-486 DX4-100 On Line	ISA	Acer (R02-F0)
Aquarius Robotron Systems GmbH	ASI 75 MHz Pentiumr PCI	ISA/PCI	AMI/Intel (1.00.03.BS0)
Aquarius Robotron Systems GmbH	ASI Multimedia	ISA/PCI	Award (4.50 PG)
Aquarius Robotron Systems GmbH	ASI Pentium	ISA/PCI	Award (4.50 PG)
Aquarius Robotron Systems GmbH	M	ISA/PCI	Award (4.50 PG)
Aquarius Robotron Systems GmbH	Microspot	ISA/PCI	Award (4.50 PG)
Aquarius Robotron Systems GmbH	MicroSystems	ISA/PCI	Award (4.50 PG)
Aquarius Robotron Systems GmbH	Sirius	ISA/PCI	Award (4.50 PG)
Aquarius Robotron Systems GmbH	Value Plus	ISA/PCI	Award (4.50 PG)
Arche Technologies	ARTEC Pentium	PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Arsys Innotech	P5490-95	PCI	AMI (PnP 1.0)
Arsys Innotech	SYS-CD5D100-SKCD	ISA/PCMIA	Intel (1.00.04 BSO)
Arsys Innotech	Sys-MM5D133-CDNT	ISA/PCI	Intel (1.00.04 BSO)
ASEM	Hi-Tech P120	ISA/PCI	AMI/Intel (1.00.03.BS0)
ASEM	Hi-Tech T120	ISA/PCI	AMI/Intel (1.00.03.BS0)
ASI	Nspire	ISA/PCI	Award (4.50G #401A0-0110)
Aspect Computer	Voyager P-100	ISA/PCI	AMI/Intel (1.00.03.CB0)
AST Research	Advantage 621 (P/75)	ISA/PCI	AMI/Intel (1.00.02.BU0Q)
AST Research	Advantage 623 (Natasha 2 P/75)	ISA/PCI	AST (1.03.01)
AST Research	Advantage 624 (Natasha 2 P/100)	ISA/PCI	AST (1.03.01)
AST Research	Advantage 624 (Natasha 2 P/100)	ISA/PCI	AST (1.03.01)
AST Research	Advantage 624 (P/100)	ISA/PCI	AMI/Intel (1.00.02.BU0Q)
AST Research	Advantage 626 (Natasha 2 P/133)	ISA/PCI	AST (1.03.01)
AST Research	Advantage 626 (P/133)	ISA/PCI	AMI/Intel (1.00.02.BU0Q)
AST Research	Advantage 628 (Natasha 2 P/150)	ISA/PCI	AST (1.03.01)
AST Research	Advantage 628 (P/150)	ISA/PCI	AMI/Intel (1.00.02.BU0Q)
AST Research	Advantage 6xx Series	ISA/PCI	AMI/Intel (1.00.02.BU0Q)
AST Research	Advantage 822 (P/100)	ISA/PCI	AMI/Intel (1.00.02.BU0Q)
AST Research	Advantage 824 (P/133)	ISA/PCI	AMI/Intel (1.00.02.BU0Q)
AST Research	Advantage 826 (P/150)	ISA/PCI	AMI/Intel (1.00.02.BU0Q)
AST Research	Advantage 828 (P/166)	ISA/PCI	AMI/Intel (1.00.02.BU0Q)
AST Research	Advantage 8xx Series	ISA/PCI	AMI/Intel (1.00.02.BU0Q)
AST Research	Advantage Adventure 4100 (AMD)	ISA/PCI	AST (V.3.7a)
AST Research	Advantage Adventure 6xxxd	ISA	AST (3.01.02)
AST Research	Advantage! 7301	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 7302	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 7303	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 7304	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9208	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9302	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9303	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9304	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9305	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9306	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9307	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9308	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9309	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9310	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9312	ISA/PCI	AMI (1.00.02.CW0)
AST Research	Advantage! 9313	ISA/PCI	AST (Alpha 1.01.01)
AST Research	Advantage! 9314	ISA/PCI	AST (Alpha 1.01.01)
AST Research	Advantage! 9315	ISA/PCI	AST (Alpha 1.01.01)
AST Research	Advantage! 9316	ISA/PCI	AST (Alpha 1.01.01)
AST Research	Advantage! 9317	ISA/PCI	AST (Alpha 1.01.01)
AST Research	Advantage! Adventure 466 (DX2)	ISA/PCI	Box
AST Research	Advantage! Adventure 575	ISA/PCI	ST (3.7a)
AST Research	Advantage! Adventure 6066d	ISA	AST (3.01.02)
AST Research	Advantage! Adventure 8066d	ISA	AST (3.01.02)
AST Research	Bravo LC 5075	ISA/PCI	AST (1.02.02)
AST Research	Bravo LC 5100	ISA/PCI	AST (1.02.02)
AST Research	Bravo LC P/100	ISA/PCI	AST (1.03.05)
AST Research	Bravo LC P/75	ISA/PCI	AST ("ZA ST Rel. 1.02" "06/30/95")
AST Research	Bravo MS 4/100t	ISA/PCI	AST (ZA S T Rel. 3.01.01)
AST Research	Bravo MS 4/50d (Cobra)	ISA/PCI	AST (ZA S T Rel. 3.01.01)
AST Research	Bravo MS 4/50s (Cobra)	ISA/PCI	AST (ZA S T Rel. 3.01.01)
AST Research	Bravo MS 4/66d (Cobra)	ISA/PCI	AST (ZA S T Rel. 3.01.01)
AST Research	Bravo MS 5100	ISA/PCI	AST (1.01.02)
AST Research	Bravo MS 5133	ISA/PCI	AST (1.01.02)
AST Research	Bravo MS 5166	ISA/PCI	AST (1.01.02)
AST Research	Bravo MS P/100 (Eagle)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS P/100 (Monaco)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS P/100 (Rattler)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS P/120 (Eagle)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS P/120 (Monaco)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS P/133 (Eagle)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS P/133 (Monaco)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS P/166 (Monaco)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS P/60 (Rattler)	ISA/PCI	AST (2.00.07)
AST Research	Bravo MS P/75 (Eagle)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS P/75 (Monaco)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS P/75 (Rattler)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS P/90 (Rattler)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS-T 5100	ISA/PCI	AST (1.01.02)
AST Research	Bravo MS-T 5133	ISA/PCI	AST (1.01.02)
AST Research	Bravo MS-T 5166	ISA/PCI	AST (1.01.02)
AST Research	Bravo MS-T 6150	ISA/PCI	AST (1.00.01.CG0Q)
AST Research	Bravo MS-T P/100 (Eagle)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS-T P/100 (Rattler)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS-T P/120 (Monaco)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS-T P/133 (Eagle)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS-T P/133 (Monaco)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS-T P/75 (Rattler)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Bravo MS-T P/90 (Rattler)	ISA/PCI	AST (ZA S T Rel. 1.05.01)
AST Research	Premmia MX P/75	ISA/PCI	AST ("ZA ST Rel. 1.02" "06/30/95")
AT&T	Globalyst 311	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 340	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 362TPC	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 363TPC	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 364TPC	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 365TPC	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 370TPC	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 375TPC	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 380TPC	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 520	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 530	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 630	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
AT&T	Globalyst 720	ISA/PCI	AT&T (0.00.70)
AT&T	Globalyst 730	ISA/PCI	AT&T (0.00.70)
Athena Informatica	Maestra P100	PCI	Award (6.50G)
Athena Informatica	Maestra P120	PCI	Award (6.50G)
Athena Informatica	Maestra P133	PCI	Award (6.50G)
Athena Informatica	Maestra P75	PCI	Award (6.50G)
Athena Informatica	Maestra P90	PCI	Award (6.50G)
Athena Informatica	Magica Professional P100	PCI	Award (6.50G)
Athena Informatica	Magica Professional P120	PCI	Award (6.50G)
Athena Informatica	Magica Professional P133	PCI	Award (6.50G)
Athena Informatica	Magica Professional P75	PCI	Award (6.50G)
Athena Informatica	Magica Professional P90	PCI	Award (6.50G)
Athena Informatica	Magica Senior P100	PCI	Award (6.50G)
Athena Informatica	Magica Senior P120	PCI	Award (6.50G)
Athena Informatica	Magica Senior P133	PCI	Award (6.50G)
Athena Informatica	Magica Senior P75	PCI	Award (6.50G)
Athena Informatica	Magica Senior P90	PCI	Award (6.50G)
Athena Informatica	Maxima P100	PCI	Award (6.50G)
Athena Informatica	Maxima P120	PCI	Award (6.50G)
Athena Informatica	Maxima P133	PCI	Award (6.50G)
Athena Informatica	Maxima P75	PCI	Award (6.50G)
Athena Informatica	Maxima P90	PCI	Award (6.50G)
AutoCont	AC Advanced Pentium PCI	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
AutoCont	AC High Speed Loaded	ISA/PCI	Award (4.50PG  #401A0-0110)
AutoCont	AC PROFI	ISA/PCI	Award (4.50PG #401A0-0110)
BTG	P-75	PCI	AMI/Intel (1.00.03.CB0)
Caliber Computer	Voyager I	ISA/PCI	AMI/Intel (1.00.03.BS0)
Caliber Computer	Voyager II	ISA/PCI	AMI/Intel (0.05.03.CC0M)
Camco Computers	Pentium	PCI	Award (4.50PG)
Camco Computers	Pentium Asustec System	PCI	Award (4.50PG)
Canon Computer Systems	Innova Media MT7030	ISA/PCI	AMI (1.41S)
Canon Computer Systems	Innova Media MT7040	ISA/PCI	AMI (1.41S)
Canon Computer Systems	Innova Media MT9100	ISA/PCI	AMI (1.41S)
Canon Computer Systems	Innova Media MT9110	ISA/PCI	AMI (1.41S)
Canon Computer Systems	Innova Media MT9120	ISA/PCI	AMI (1.41S)
Canon Computer Systems	Innova Media MT9130	ISA/PCI	AMI (1.41S)
Canon Computer Systems	Innova Media MT9300	ISA/PCI	AMI (1.41S)
Canon Computer Systems	Innova Media MT9310	ISA/PCI	AMI (1.41S)
Carrera Technology	Panther P100	ISA/PCI	AMI (1.3)
Carrera Technology	Panther P133	ISA/PCI	AMI (1.3)
Carrera Technology	Panther P75	ISA/PCI	AMI (1.3)
Carrera Technology	Panther P90	ISA/PCI	AMI (1.3)
Carrera Technology	Panther P90 MMedia	ISA/PCI	AMI (1.3)
CDC Point	DEX Pentium 75	PCI	AMI/Intel (1.00.03.BS0)
Cemtech	Avenger 100	PCI	Box
Cemtech	Avenger 120	PCI	Box
Cemtech	Avenger 133	PCI	Box
Cemtech	Avenger 150	PCI	Box
Cemtech	Avenger 166	PCI	Box
Cemtech	Avenger 180	PCI	Box
Cemtech	Avenger 200	PCI	Box
Centerprise International	CI/Leo P90	ISA/PCI	AMI/Intel (1.00.01.BS0)
Centro HL Distribuzione	SINERGY SERIES	ISA/PCI	Award (T1.095)
Chuntex	Maxiputer 540C	ISA/PCI	Award (4.50PG)
Compal Electronics	TS31DO	PCI/PCMCIA	Phoenix (4.04)
Compaq	DeskPro 2000 Model 5100	ISA/PCI	Compaq (5/2/96)
Compaq	DeskPro 2000 Model 5120	ISA/PCI	Compaq (5/2/96)
Compaq	DeskPro 2000 Model 5133	ISA/PCI	Compaq (5/2/96)
Compaq	DeskPro 2000 Model 5166	ISA/PCI	Compaq (5/2/96)
Compaq	DeskPro 2000 Model 5200	ISA/PCI	Compaq (5/2/96)
Compaq	Deskpro 4000 5100	ISA/PCI	Box
Compaq	Deskpro 4000 5120	ISA/PCI	Box
Compaq	Deskpro 4000 5133	ISA/PCI	Box
Compaq	Deskpro 4000 5166	ISA/PCI	Box
Compaq	Deskpro 4000 Model 5200	ISA/PCI	Box
Compaq	Deskpro 4000 Model 6180	ISA/PCI	Compaq (6/19/96)
Compaq	Deskpro 4000 Model 6200	ISA/PCI	Compaq (6/19/96)
Compaq	Deskpro 4100	ISA/PCI	Compaq (5/10/95, 486G1)
Compaq	Deskpro 450	ISA/PCI	Compaq (5/10/95, 486G1)
Compaq	Deskpro 466	ISA/PCI	Compaq (5/10/95, 486G1)
Compaq	Deskpro 466 M420/w	ISA/PCI	Compaq (5/10/95, 486G1)
Compaq	Deskpro 5100	ISA/PCI	Compaq (486y 1/23/96)
Compaq	Deskpro 5120	ISA/PCI	Compaq (486y 1/23/96)
Compaq	Deskpro 5133	ISA/PCI	Compaq (1.0)
Compaq	Deskpro 5133	ISA/PCI	Compaq (486y 1/23/96)
Compaq	Deskpro 5150	ISA/PCI	Compaq (486y 1/23/96)
Compaq	Deskpro 5166	ISA/PCI	Compaq (486y 1/23/96)
Compaq	Deskpro 575	ISA/PCI	Compaq (486y 1/23/96)
Compaq	Deskpro 6000 5166	ISA/PCI	Box
Compaq	Deskpro 6000 5200	ISA/PCI	Box
Compaq	Deskpro 6000 Model 6180	ISA/PCI	Compaq (6/19/96)
Compaq	Deskpro 6000 Model 6200	ISA/PCI	Compaq (6/19/96)
Compaq	Presario 5520	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 5522	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 5524	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 5526	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 5528	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 5530	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 5534	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 5536	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 720 M270	ISA/PCI	Compaq (1.0)
Compaq	Presario 940 M420	ISA/PCI	Compaq (1.0)
Compaq	Presario 9520	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 9530	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 9532	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 9534	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 9536	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 9538	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 9542	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 9544	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 9546	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 9548	ISA/PCI	Compaq (8-24-95)
Compaq	Presario 9564	ISA/PCI	Compaq (8-24-95)
Compaq	Presario CDS 520 M420	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 522 M270	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 524 M420	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 526 M535	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 720 M420	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 742 M420	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 744 M535	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 762	ISA/PCI	Compaq (EPP Ver 1.1)
Compaq	Presario CDS 762 M535	ISA/PCI	Compaq (EPP Ver 1.1)
Compaq	Presario CDS 772	ISA/PCI	Compaq (EPP runtime V1.1)
Compaq	Presario CDS 774	ISA/PCI	Compaq (EPP runtime V1.1)
Compaq	Presario CDS 942 M420	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 944 M535	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 946 M725	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 954 M535	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 954 M535	ISA/PCI	Compaq (1.0)
Compaq	Presario CDS 962	ISA/PCI	Compaq (EPP Ver 1.1)
Compaq	Presario CDS 972	ISA/PCI	Compaq (EPP runtime V1.1)
Compaq	Presario CDS 974	ISA/PCI	Compaq (EPP runtime V1.1)
Compaq	Presario CDS 978	ISA/PCI	Compaq (EPP runtime V1.1)
Compaq	Presario CDS 982	ISA/PCI	Compaq (EPP runtime V1.1)
Compaq	Presario CDS 982 M725	ISA/PCI	Compaq (EPP runtime V1.1)
Compaq	Presario CDS 992	ISA/PCI	Compaq (EPP runtime V1.1)
Compaq	Presario CDTV 520 M420	ISA/PCI	Compaq (1.0)
Compaq	Presario CDTV 528	ISA/PCI	Compaq (1.0)
Compaq	Presario CDTV 528 M420	ISA/PCI	Compaq (1.0)
Compaq	Presario CDTV 748 M535	ISA/PCI	Compaq (1.0)
Compaq	Presario CDTV 948 M535	ISA/PCI	Compaq (1.0)
Compaq	ProLinea 4100	EISA	Compaq (486G3, 5/10/95)
Compaq	ProLinea 450	EISA	Compaq (486G3, 5/10/95)
Compaq	ProLinea 466	EISA	Compaq (486G3, 5/10/95)
Compaq	ProLinea 466 M420/CDS	EISA	Compaq (486G3, 5/10/95)
Compaq	Prolinea 5100	ISA/PCI	Compaq (486y 1/23/96)
Compaq	ProLinea 5100	ISA/PCI	Compaq (5/10/95, 486G3)
Compaq	ProLinea 5100 M720/w	ISA/PCI	Compaq (5/10/95, 486G3)
Compaq	ProLinea 5100e	ISA/PCI	Compaq (8/11 ROM)
Compaq	Prolinea 5120	ISA/PCI	Compaq (486y 1/23/96)
Compaq	ProLinea 5120	ISA/PCI	Compaq (5/10/95, 486G3)
Compaq	ProLinea 5120e	ISA/PCI	Compaq (8/11 ROM)
Compaq	Prolinea 5133	ISA/PCI	Compaq (486y 1/23/96)
Compaq	ProLinea 5133	ISA/PCI	Compaq (5/10/95, 486G3)
Compaq	Prolinea 5150	ISA/PCI	Compaq (486y 1/23/96)
Compaq	Prolinea 5166	ISA/PCI	Compaq (486y 1/23/96)
Compaq	Prolinea 575	ISA/PCI	Compaq (486y 1/23/96)
Compaq	ProLinea 575	ISA/PCI	Compaq (5/10/95, 486G3)
Compaq	ProLinea 575e	ISA/PCI	Compaq (8/11 ROM)
Compaq	ProLinea 590	ISA/PCI	Compaq (5/10/95, 486G3)
Compaq	Prolinea 6150e	ISA	AMI (0.01.01.CG0P)
CompuAdd	C133 MT	PCI	AMI/Intel (1.00.03.CB0)
CompUSA	Compudyne DX4/100 4/850 LPDT	ISA	Acer (3.0A0)
CompUSA	Compudyne P75 8/850 MT	ISA/PCI	Acer (2.0)
Computer Technology Link	Kim	PCI	AMI/Intel (1.00.03.BS0)
Computer Technology Link	Pentium 100	PCI	AMI/Intel (1.00.03.BS0)
Computer Technology Link	Pentium 120	PCI	AMI/Intel (1.00.03.BS0)
Computer Technology Link	Pentium 75	PCI	AMI/Intel (1.00.03.BS0)
CompuTrend Systems	PREMIO Denali Series	ISA/PCI	Award (1.10)
CompuTrend Systems	PREMIO Express CAD Station	ISA/PCI	Award (1.10)
CompuTrend Systems	PREMIO Express Rocket PC	ISA/PCI	Award (1.10)
CompuTrend Systems	PREMIO Express Server	ISA/PCI	Award (1.10)
CompuTrend Systems	PREMIO Express Station	ISA/PCI	Award (1.10)
CompuTrend Systems	PREMIO Triton	ISA/PCI	Award (1.10)
Comtex Micro Systems	Criterion	PCI	AMI/Intel (1.00.03.BS0)
Comtex Micro Systems	Mach 5 CMT55TAC	ISA/PCI	AMI (TAC951023B)
Comtex Micro Systems	Mitra55TAC	ISA/PCI	AMI (TAC951023B)
Comtex Micro Systems	Winpac 95-55TAC	ISA/PCI	AMI (TAC951023B)
Comtrade	Hyperspeed Multimedia 4X	ISA/PCI	AMI/Intel (1.00.03.BS0)
Comtrade	Multimedia Best Buy 4X	ISA/PCI	AMI/Intel (1.00.03.BS0)
Comtrade	PCI Home MPC 4X	ISA/PCI	AMI/Intel (1.00.03.BS0)
Comtrade	PCI Tornado 4X	ISA/PCI	AMI/Intel (1.00.03.BS0)
Comtrade	Professional MPEG 4X	ISA/PCI	AMI/Intel (1.00.03.BS0)
CSS Labs	MaxSys 5/100 TR	ISA/PCI	Award (7/20/94 4.50)
CSS Labs	MaxSys 5/120 TR	ISA/PCI	Award (7/20/94 4.50)
CSS Labs	MaxSys 5/133 TR	ISA/PCI	Award (7/20/94 4.50)
CSS Labs	MaxSys 5/90 TR	ISA/PCI	Award (7/20/94 4.50)
CSS Labs	Preferred 5/100 TR	ISA/PCI	Award (7/20/94 4.50)
CSS Labs	Preferred 5/120 TR	ISA/PCI	Award (7/20/94 4.50)
CSS Labs	Preferred 5/133 TR	ISA/PCI	Award (7/20/94 4.50)
CSS Labs	Preferred 5/133 TR (P590)	ISA/PCI	Award (7/20/94 4.50)
CSS Labs	Preferred 5/150 TR	ISA/PCI	Award (7/20/94 4.50)
CSS Labs	Preferred 5/90 TR	ISA/PCI	Award (7/20/94 4.50)
Cube Computer	Powerstation P90	PCI	AMI/Intel (1.00.03.BS0)
CyberMax Computer	V  Series	ISA/PCI	Box
Daewoo Electronics	CPC-5320/5620	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Data Storage Marketing	Suncheer Pentium 90	ISA/PCI	Phoenix (4.04 v2.02)
Datavarehuset	Brick	PCI	AMI/Intel (1.00.03.CB0)
Dell	Dimension P-90	PCI	Phoenix (A11)
Dell	Dimension P100t, Desktop	PCI	Intel (A05)
Dell	Dimension P100t, Tower	PCI	Intel (A05)
Dell	Dimension P120t Desktop	PCI	Intel (A05)
Dell	Dimension P75t, Desktop	PCI	Intel (A05)
Dell	Dimension P75t, Tower	PCI	Intel (A05)
Dell	Dimension P90t, Desktop	PCI	Intel (A05)
Dell	Dimension P90t, Tower	PCI	Intel (A05)
Dell	Dimension XPS Pro 150	PCI	AMI/Intel (A01)
Dell	Dimension XPS-P100C	ISA/PCI	AMI/Intel (A06)
Dell	Dimension XPS-P120C	ISA/PCI	AMI/Intel (A06)
Dell	Dimension XPS-P133C	ISA/PCI	AMI/Intel (A06)
Dell	Dimension XPS-P90C	ISA/PCI	AMI/Intel (A06)
Dell	OptiPlex 4100/Le	ISA	Dell (X22)
Dell	OptiPlex 486/MTe	ISA	Dell (X22)
Dell	OptiPlex 486/MXe	ISA	Dell (X22)
Dell	OptiPlex 5100 XL	ISA/PCI	Dell (z61)
Dell	OptiPlex 5100 XM	ISA/PCI	Dell (z61)
Dell	OptiPlex 5100 XMT	ISA/PCI	Dell (z61)
Dell	Optiplex GL+575	PCI	Phoenix (ROM BIOS PLUS Version 1.10)
Dell	Optiplex GL/GM/GMT 5100	ISA/PCI	Dell (19)
Dell	Optiplex GL/GM/GMT 5120	ISA/PCI	Dell (19)
Dell	Optiplex GL/GM/GMT 5133	ISA/PCI	Dell (19)
Dell	OptiPlex GL/GM/GMT 5166	ISA/PCI	Dell (19)
Dell	Optiplex GL/GM/GMT 575	ISA/PCI	Dell (19)
Dell	Optiplex GL/GM/GMT 590	ISA/PCI	Dell (19)
Dell	Optiplex GL575	PCI	Phoenix (ROM BIOS PLUS Version 1.10)
Dell	Optiplex GM+575	PCI	Phoenix (ROM BIOS PLUS Version 1.10)
Dell	Optiplex GM575	PCI	Phoenix (ROM BIOS PLUS Version 1.10)
Dell	OptiPlex GMT+575	PCI	Phoenix (ROM BIOS PLUS Version 1.10)
Dell	OptiPlex GMT575	PCI	Phoenix (ROM BIOS PLUS Version 1.10)
Dell	OptiPlex GX Pro	ISA/PCI	Dell (A01)
Dell	Optiplex GXL/GXM/GXMT 5100	ISA/PCI	Dell (19)
Dell	Optiplex GXL/GXM/GXMT 5120	ISA/PCI	Dell (19)
Dell	Optiplex GXL/GXM/GXMT 5133	ISA/PCI	Dell (19)
Dell	Optiplex GXL/GXM/GXMT 5166	ISA/PCI	Dell (19)
Dell	OptiPlex GXL/GXM/GXMT 5200	ISA/PCI	Dell (19)
Dell	Optiplex GXL/GXM/GXMT 575	ISA/PCI	Dell (19)
Dell	Optiplex GXL/M/MT	ISA/PCI	Dell (A15)
Dell	XPS P200S	ISA/PCI	AMI/Intel (A01)
DFI	Benchmarq A100-VPA	ISA/PCI/VL	Award (4.50)
DFI	Benchmarq A66-VPA	ISA/PCI/VL	Award (4.50)
DFI	Benchmarq A80-VPA	ISA/PCI/VL	Award (4.50)
DFI	Benchmarq I100-VPA	ISA/PCI/VL	Award (4.50)
DFI	Benchmarq I66-VPA	ISA/PCI/VL	Award (4.50)
DFI	Benchmarq P100-VPM	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	Benchmarq P120-VPM	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	Benchmarq P133-VPM	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	Benchmarq P90-VPM	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	Benchmarq S66-VPA	ISA/PCI/VL	Award (4.50)
DFI	Benchmarq S80-VPA	ISA/PCI/VL	Award (4.50)
DFI	DFI G486VPA-A100	ISA/PCI/VL	Award (4.50)
DFI	DFI G486VPA-A66	ISA/PCI/VL	Award (4.50)
DFI	DFI G486VPA-A80	ISA/PCI/VL	Award (4.50)
DFI	DFI G486VPA-I100	ISA/PCI/VL	Award (4.50)
DFI	DFI G486VPA-I66	ISA/PCI/VL	Award (4.50)
DFI	DFI G486VPA-I75	ISA/PCI/VL	Award (4.50)
DFI	DFI G486VPA-S66	ISA/PCI/VL	Award (4.50)
DFI	DFI G486VPA-S80	ISA/PCI/VL	Award (4.50)
DFI	DFI G586-VPM-P100	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	DFI G586-VPM-P120	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	DFI G586-VPM-P133	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	DFI G586-VPM-P75	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	DFI G586-VPM-P90	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	Diamond A100-VPA	ISA/PCI/VL	Award (4.50)
DFI	Diamond A66-VPA	ISA/PCI/VL	Award (4.50)
DFI	Diamond A80-VPA	ISA/PCI/VL	Award (4.50)
DFI	Diamond I100-VPA	ISA/PCI/VL	Award (4.50)
DFI	Diamond I66-VPA	ISA/PCI/VL	Award (4.50)
DFI	Diamond I75-VPA	ISA/PCI/VL	Award (4.50)
DFI	Diamond P100 OPC	ISA/PCI	Award (4.50GP)
DFI	Diamond P100-VPM	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	Diamond P120 OPC	ISA/PCI	Award (4.50GP)
DFI	Diamond P120-VPM	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	Diamond P133 OPC	ISA/PCI	Award (4.50GP)
DFI	Diamond P133-VPM	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	Diamond P150 OPC	ISA/PCI	Award (4.50GP)
DFI	Diamond P75 OPC	ISA/PCI	Award (4.50GP)
DFI	Diamond P75-VPM	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	Diamond P90 OPC	ISA/PCI	Award (4.50GP)
DFI	Diamond P90-VPM	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	Diamond S66-VPA	ISA/PCI/VL	Award (4.50)
DFI	Diamond S80-VPA	ISA/PCI/VL	Award (4.50)
DFI	G586-OPC P-100	ISA/PCI	Award (4.50GP)
DFI	G586-OPC P-120	ISA/PCI	Award (4.50GP)
DFI	G586-OPC P-133	ISA/PCI	Award (4.50GP)
DFI	G586-OPC P-150	ISA/PCI	Award (4.50GP)
DFI	G586-OPC P-90	ISA/PCI	Award (4.50GP)
DFI	Landmarq G586-OPC P-75	ISA/PCI	Award (4.50GP)
DFI	Landmarq I75-VPA	ISA/PCI/VL	Award (4.50)
DFI	Landmarq P100 OPC	ISA/PCI	Award (4.50GP)
DFI	Landmarq P120 OPC	ISA/PCI	Award (4.50GP)
DFI	Landmarq P133 OPC	ISA/PCI	Award (4.50GP)
DFI	Landmarq P150 OPC	ISA/PCI	Award (4.50GP)
DFI	Landmarq P75 OPC	ISA/PCI	Award (4.50GP)
DFI	Landmarq P75-VPM	ISA/PCI	Award (4.50PG 2A4IBG3I)
DFI	Landmarq P90 OPC	ISA/PCI	Award (4.50GP)
DGC Systems	P100 Exclusive	ISA/PCI	Phoenix (4.04 PnP)
DGC Systems	P120 Exclusive	ISA/PCI	Phoenix (4.04 PnP)
DGC Systems	P133 Exclusive	ISA/PCI	Phoenix (4.04 PnP)
DGC Systems	P150 Exclusive	ISA/PCI	Phoenix (4.04 PnP)
DGC Systems	P75 Exclusive	ISA/PCI	Phoenix (4.04 PnP)
DGC Systems	P90 Exclusive	ISA/PCI	Phoenix (4.04 PnP)
Digital Equipment	Celebris 5100	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Celebris 575	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Celebris 590	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Celebris FP 5100	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Celebris FP 590	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Celebris GL5100	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris GL5100st	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris GL5120	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris GL5120st	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris GL5133	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris GL5133st	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris GL5150	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris GL5150st	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris GL5166	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris GL5166st	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris GL590	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris GL590st	PCI	Phoenix/Digital (4.04/1.00)
Digital Equipment	Celebris XL 5100	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Celebris XL 5120	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Celebris XL 5133	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Celebris XL 5166	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Celebris XL 590	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Celebris XL5150	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Starion 2001	PCI	Digital (.6)
Digital Equipment	Starion 200i	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Starion 300i	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Starion 400i	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Starion 500i	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Starion 600i	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Starion 700i	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Starion 800i	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Starion 900i	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Starion 910	PCI	Digital (.6)
Digital Equipment	Starion 915	PCI	Digital (.6)
Digital Equipment	Starion 917	PCI	Digital (.6)
Digital Equipment	Starion 919	PCI	Digital (.6)
Digital Equipment	Starion 920	PCI	Digital (.6)
Digital Equipment	Starion 921	PCI	Digital (.6)
Digital Equipment	Starion 922	PCI	Digital (.6)
Digital Equipment	Starion 930	PCI	Digital (.6)
Digital Equipment	Starion 940	PCI	Digital (.6)
Digital Equipment	Starion 941	PCI	Digital (.6)
Digital Equipment	Starion 942	PCI	Digital (.6)
Digital Equipment	Venturis 5100	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis 5120	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis 5133	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis 5150	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis 5166	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis 575	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis 590	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis FP 466	VLB	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis FP 5100	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis FP 5120	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis FP 5133	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis FP 5150	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis FP 5166	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis FP 575	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Digital Equipment	Venturis FP 590	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
DTK Computer	DTK-Pentium-100	ISA/PCI	Award (4.50 GP    T1.02)
DTK Computer	DTK-Pentium-120	ISA/PCI	Award (4.50 GP    T1.02)
DTK Computer	DTK-Pentium-133	ISA/PCI	Award (4.50 GP    T1.02)
DTK Computer	DTK-Pentium-75	ISA/PCI	Award (4.50 GP    T1.02)
DTK Computer	Pentium-90	ISA/PCI	Award (4.50 GP    T1.02)
DTK Computer	QUIN-35	ISA/PCI	Award (DTKPAM0035s.P02.01.06-V1.06)
DTK Computer	QUIN-54	ISA/PCI	Award (4.05G)
DVM-Computer	MXi-54H Classic	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
DVM-Computer	MXi-54H Junior	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
DVM-Computer	MXi-54H Partner	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Dynamic Decisions	DYNEX P5	PCI	Award (4.50G 401a0-0110)
Elitegroup Computer Systems	P5HX-B	ISA/PCI	Award (4.51PG)
Elitegroup Computer Systems	P5VX-B	ISA/PCI	Box
Elitegroup Computer Systems	SC58P VIO/S	ISA/PCI	Award 4.51PG (ECS V1.1b)
Elitegroup Computer Systems	SI54P-AIO	ISA/PCI	Phoenix (2.0B)
Elitegroup Computer Systems	TS54P-AIO	ISA/PCI	Phoenix (2.0)
Elitegroup Computer Systems	UM8810-AIO	ISA/PCI	Phoenix (4.04)
Elonex Technologies	PC-466/I	ISA/PCI	MR (3.19)
Elonex Technologies	PC500/I	PCI	MR (3.17)
EMPAC International	Saber P54	ISA/PCI	AMI (AP5C R1.20)
Epson	Action PC 2600	ISA/PCI	AMI (729)
Epson	Action PC 5500	ISA/PCI	AMI (729)
Epson	Action PC 7000	ISA/PCI	Phoenix (PhoenixBIOS Version 4.04 PLUG and PLAY)
Epson	Action PC 7000	ISA/PCI	Phoenix (1.6I)
Epson	Action PC 7300	ISA/PCI	Phoenix (PhoenixBIOS Version 4.04 PLUG and PLAY)
Epson	Action PC 7300	ISA/PCI	Phoenix (1.6I)
Epson	Action Tower 7000	ISA/PCI	Phoenix (PhoenixBIOS Version 4.04 PLUG and PLAY)
Epson	Action Tower 7000	ISA/PCI	Phoenix (1.6I)
Epson	Action Tower 7500	ISA/PCI	Phoenix (PhoenixBIOS Version 4.04 PLUG and PLAY)
Epson	Action Tower 7500	ISA/PCI	Phoenix (1.6I)
Epson	Action Tower 8000	ISA/PCI	Phoenix (4.04 v1.6k)
Epson	Action Tower 8100	ISA/PCI	Phoenix (4.04 v1.6k)
Epson	Action Tower 8200	ISA/PCI	Phoenix (4.04 v1.6k)
Epson	Action Tower 8400	ISA/PCI	Phoenix (PhoenixBIOS Version 4.04 PLUG and PLAY)
Epson	ActionDesk 7000	ISA/PCI	Phoenix (PhoenixBIOS Version 4.04 PLUG and PLAY)
Epson	ActionDesk 7000	ISA/PCI	Phoenix (1.6I)
Epson	ActionDesk 8000	ISA/PCI	Phoenix (4.04 v1.6k)
Epson	ActionPC 8000	ISA/PCI	Phoenix (4.04 v1.6k)
Epson	ActionTower 8600	ISA/PCI	Phoenix (4.04 v3.5)
Epson	Endeavor AT-3600	ISA/PCI	AMI/Intel (1.00.03.BS0)
Epson	Endeavor AT-6500	ISA/PCI	AMI/Intel (1.00.03.CAO)
Epson	Endeavor ATX 7000	ISA/PCI	Award (#401A0-0101)
Epson	Endeavor II	ISA/PCI	AMI (729)
Epson	Endeavor Pro	ISA/PCI	Phoenix (4.04 v1.6k)
Epson	Endeavor VT-2000	ISA/PCI	Award (4.50PG)
Epson	ET-6500	ISA/PCI	AMI/Intel (1.00.03.CAO)
Epson	VA516T	ISA/PCI	Award (#401A0-0101)
Epson	VA516V	ISA/PCI	Award (#401A0-0101)
Epson	VA520T	ISA/PCI	Award (#401A0-0101)
Epson	VA520V	ISA/PCI	Award (#401A0-0101)
Epson	VD510S	ISA/PCI	AMI/Intel (1.00.01.CH0)
Epson	VD512R	ISA/PCI	AMI/Intel (1.00.03.CA0)
Epson	VD513S	ISA/PCI	AMI/Intel (1.00.01.CH0)
Epson	VD575R	ISA/PCI	AMI/Intel (1.00.03.CA0)
Epson	VD590R	ISA/PCI	AMI/Intel (1.00.03.CA0)
Epson	VM513S	ISA/PCI	AMI/Intel (1.00.01.CH0)
Epson	VT510R	ISA/PCI	AMI/Intel (1.00.03.CA0)
Epson	VT510S	ISA/PCI	AMI/Intel (1.00.01.CH0)
Epson	VT512R	ISA/PCI	AMI/Intel (1.00.03.CA0)
Epson	VT513R	ISA/PCI	AMI/Intel (1.00.03.CA0)
Epson	VT513S	ISA/PCI	AMI/Intel (1.00.01.CH0)
Epson	VT516S	ISA/PCI	AMI/Intel (1.00.01.CH0)
Epson	VT516S	ISA/PCI	AMI/Intel (1.00.03.CA0)
Epson	VT575R	ISA/PCI	AMI/Intel (1.00.03.CA0)
Epson	VT590R	ISA/PCI	AMI/Intel (1.00.03.CA0)
Escom	Commodore Go iP	ISA/PCI	AMI/Intel (1.00.03.CB0)
Escom	Commodore Go iP100	ISA/PCI	AMI/Intel (1.00.04.BT0)
Escom	Commodore Go iP120	ISA/PCI	AMI/Intel (1.00.04.BT0)
Escom	Commodore Go iP75	ISA/PCI	AMI/Intel (1.00.04.BT0)
Escom	Commodore Go iP90	ISA/PCI	AMI/Intel (1.00.04.BT0)
Escom	Commodore GoiP1120	ISA/PCI	AMI/Intel (1.00.03.BS0)
Escom	Commodore GoiP75	ISA/PCI	AMI/Intel (1.00.03.BS0)
Escom	Commodore GoiP90	ISA/PCI	AMI/Intel (1.00.03.BS0)
Escom	MiniTower P100, P133	ISA/PCI	AMI/Intel (1.00.03.CB0)
Escom	MiniTower P120	ISA/PCI	AMI/Intel (1.00.03.BS0)
Escom	MiniTower P75	ISA/PCI	AMI/Intel (1.00.03.BS0)
Escom	MiniTower P90	ISA/PCI	AMI/Intel (1.00.03.BS0)
Escom	Slimline P100	ISA/PCI	AMI/Intel (1.00.04.BT0)
Escom	Slimline P120	ISA/PCI	AMI/Intel (1.00.04.BT0)
Escom	Slimline P75	ISA/PCI	AMI/Intel (1.00.04.BT0)
Escom	Slimline P90	ISA/PCI	AMI/Intel (1.00.04.BT0)
Escom	TableTower P100	ISA/PCI	AMI/Intel (1.00.03.BS0)
Escom	TableTower P100, 120, 133	ISA/PCI	AMI/Intel (1.00.03.CB0)
Escom	TableTower P75	ISA/PCI	AMI/Intel (1.00.03.BS0)
Escom	TableTower P90	ISA/PCI	AMI/Intel (1.00.03.BS0)
Escom	Tower P100, 120, 133	ISA/PCI	AMI/Intel (1.00.03.CB0)
Escom	Tower P90	ISA/PCI	AMI/Intel (1.00.03.BS0)
Escort Computer	Lidia	ISA/PCI	Award (40110-0110-4)
Everex	FIC PI-2100E	ISA/PCI	AMI/Intel (1.00.03.CB0)
Everex	FIC PN-3000i	ISA/PCI	Everex/Award (PNP0F)
Everex	Leo Predator 111	ISA/PCI	Everex/Award (PNP0F)
Everex	Leo Predator 114	ISA/PCI	Everex/Award (PNP0F)
Everex	STEP DPe/3000	EISA/PCI	Everex/Award (PNP0F)
Everex	STEP DPi/3000	ISA/PCI	Everex/Award (PNP0F)
Everex	STEP Pro	ISA/PCI	AMI/Intel (1.00.03.CB0)
Everex	Step Pro/2100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Everex	STEP SP II/2000A	ISA/PCI	Everex/Award (PNP0F)
EXT Computer	Pentium	PCI	Award (1.00.04)
EXT Computer	Pentium Asustec System	PCI	Award (1.00.04)
First International Computer	Everex STEP Station	ISA/PCI	AMI (AP5C R.120 8-22-95)
First International Computer	Everex Tempo PCI/486	ISA/PCI	Award (1.116701)
First International Computer	Leo  66515	ISA/PCI	AMI (AP5C R.120 8-22-95)
First International Computer	Leo 66510	ISA/PCI	Award (T1.06)
First International Computer	Leo 66512	ISA/PCI	Award (T1.06)
First International Computer	Leo 66513	ISA/PCI	Award (T1.06)
First International Computer	Leo 66515	ISA/PCI	Award (4.00C721)
First International Computer	Leo 6657	ISA/PCI	Award (T1.06)
First International Computer	Leo 6659	ISA/PCI	Award (T1.06)
First International Computer	Leo Cougar 110/210	ISA/PCI	Award (1.116701)
First International Computer	Leo Cougar 310	ISA/PCI	Award (1.116701)
First International Computer	Leo Cougar 664100E	ISA/PCI	Award (1.116701)
First International Computer	Leo Leo Predator 210	ISA/PCI	AMI (AP5C R.120 8-22-95)
First International Computer	Leo Leo Predator 310	ISA/PCI	AMI (AP5C R.120 8-22-95)
First International Computer	Leo PA-2001	ISA/PCI	Award (4.00C700)
First International Computer	Leo PA-2002	ISA/PCI	AMI (AP5C R.120 8-22-95)
First International Computer	Leo PAC-2100	ISA/PCI	Award (4.00C721)
First International Computer	Leo Predator 110	ISA/PCI	AMI (AP5C R.120 8-22-95)
First International Computer	Leo Predator 111	ISA/PCI	Award (T1.06)
First International Computer	Leo Predator 112	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
First International Computer	Leo Predator 113	EISA/PCI	Everex/Award (PNP0F)
First International Computer	Leo Predator 115	ISA/PCI	AMI (AP5C R.120 8-22-95)
First International Computer	Leo Predator 116	ISA/PCI	Award (4.00C700)
First International Computer	Leo Predator 117	ISA/PCI	AMI (AP5C R.120 8-22-95)
First International Computer	Leo Predator 118	ISA/PCI	Award (4.00C721)
First International Computer	Leo Predator 211	ISA/PCI	Award (T1.06)
First International Computer	Leo Predator 212	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
First International Computer	Leo Predator 216	ISA/PCI	Award (4.00C700)
First International Computer	Leo Predator 217	ISA/PCI	AMI (AP5C R.120 8-22-95)
First International Computer	Leo Predator 311	ISA/PCI	Award (T1.06)
First International Computer	Leo Predator 312	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
First International Computer	Leo Predator 316	ISA/PCI	Award (4.00C700)
First International Computer	Leo Predator 317	ISA/PCI	AMI (AP5C R.120 8-22-95)
First International Computer	Leo Predator 66510	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
First International Computer	Leo Predator 66512	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
First International Computer	Leo Predator 66513	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
First International Computer	Leo Predator 66515	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
First International Computer	Leo Predator 6657	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
First International Computer	Leo Predator 6659	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
First International Computer	Leo Titan (PA-2005)	ISA/PCI	Award (4.51PG)
First International Computer	PN-3000	EISA/PCI	Everex/Award (PNP0F)
Fountain Technologies	FTN P5/100/V-A	ISA/PCI	Box
Fountain Technologies	FTN P5/100/V-B	ISA/PCI	Box
Fountain Technologies	FTN P5/100/V-C	ISA/PCI	Box
Fountain Technologies	FTN P5/120/V-A	ISA/PCI	Box
Fountain Technologies	FTN P5/120/V-B	ISA/PCI	Box
Fountain Technologies	FTN P5/120/V-C	ISA/PCI	Box
Fountain Technologies	FTN P5/133/V-A	ISA/PCI	Box
Fountain Technologies	FTN P5/133/V-B	ISA/PCI	Box
Fountain Technologies	FTN P5/133/V-C	ISA/PCI	Box
Fountain Technologies	FTN P5/150/V-A	ISA/PCI	Box
Fountain Technologies	FTN P5/150/V-B	ISA/PCI	Box
Fountain Technologies	FTN P5/150/V-C	ISA/PCI	Box
Fountain Technologies	FTN P5/166/V-A	ISA/PCI	Box
Fountain Technologies	FTN P5/166/V-B	ISA/PCI	Box
Fountain Technologies	FTN P5/166/V-C	ISA/PCI	Box
Fountain Technologies	FTN P5/200/V-A	ISA/PCI	Box
Fountain Technologies	FTN P5/200/V-B	ISA/PCI	Box
Fountain Technologies	FTN P5/200/V-C	ISA/PCI	Box
Fountain Technologies	FTN P5/75/V-A	ISA/PCI	Box
Fountain Technologies	FTN P5/75/V-B	ISA/PCI	Box
Fountain Technologies	FTN P5/75/V-C	ISA/PCI	Box
Fountain Technologies	FTN P5/90/V-A	ISA/PCI	Box
Fountain Technologies	FTN P5/90/V-B	ISA/PCI	Box
Fountain Technologies	FTN P5/90/V-C	ISA/PCI	Box
Fountain Technologies	FTNDX266 FM-1/A	ISA/PCI	AMI (AEP-080895-1810)
Fountain Technologies	FTNDX280 FM-2/A	ISA/PCI	AMI (AEP-080895-1810)
Fountain Technologies	FTNDX4100 FM-3/A	ISA/PCI	AMI (AEP-080895-1810)
Fountain Technologies	FTNDX4100 FM-3/B	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Fountain Technologies	FTNDX4120 EM/A	ISA/PCI	AMI (AEP-080895-1810)
Fountain Technologies	FTNDX4133 EM-1/A	ISA/PCI	AMI (AEP-080895-1810)
Fountain Technologies	FTNNX586/100 XM-3	ISA/PCI	AMI (P46N034i)
Fountain Technologies	FTNNX586/110 XM-4	ISA/PCI	AMI (P46N034i)
Fountain Technologies	FTNNX586/120 XM-5	ISA/PCI	AMI (P46N034i)
Fountain Technologies	FTNNX586/133 XM-6	ISA/PCI	AMI (P46N034i)
Fountain Technologies	FTNNX586/80 XM-1	ISA/PCI	AMI (P46N034i)
Fountain Technologies	FTNNX586/90 XM-2	ISA/PCI	AMI (P46N034i)
Fountain Technologies	FTNP5/100 SM	ISA/PCI	AMI (2.0)
Fountain Technologies	FTNP5/100 SM-1	ISA/PCI	AMI (2.0)
Fountain Technologies	FTNP5/100 SM-1/A	ISA/PCI	Award (4.50PG)
Fountain Technologies	FTNP5/100 SM-1/B	ISA/PCI	AMI (TAC 080895-1628)
Fountain Technologies	FTNP5/100 SM-1/C	PCI	AMI (51-071595)
Fountain Technologies	FTNP5/100 SM/A	ISA/PCI	Award (4.50PG)
Fountain Technologies	FTNP5/100 SM/B	ISA/PCI	AMI (TAC 080895-1628)
Fountain Technologies	FTNP5/100 SM/C	PCI	AMI (51-071595)
Fountain Technologies	FTNP5/100 WS-1/C	PCI	AMI (51-071595)
Fountain Technologies	FTNP5/120 WS-1	ISA/PCI	AMI (2.0)
Fountain Technologies	FTNP5/120 WS-1/A	ISA/PCI	Award (4.50PG)
Fountain Technologies	FTNP5/120 WS-1/B	ISA/PCI	AMI (TAC 080895-1628)
Fountain Technologies	FTNP5/133 WS-1/A	ISA/PCI	Award (4.50PG)
Fountain Technologies	FTNP5/133 WS-1/B	ISA/PCI	AMI (TAC 080895-1628)
Fountain Technologies	FTNP5/133 WS-1/C	PCI	AMI (51-071595)
Fountain Technologies	FTNP5/75 XM-1	ISA/PCI	AMI (2.0)
Fountain Technologies	FTNP5/75 XM-1/A	ISA/PCI	Award (4.50PG)
Fountain Technologies	FTNP5/75 XM-1/B	ISA/PCI	AMI (TAC 080895-1628)
Fountain Technologies	FTNP5/75 XM-1/C	PCI	AMI (51-071595)
Fountain Technologies	FTNP5/90 XM-2	ISA/PCI	AMI (2.0)
Fountain Technologies	FTNP5/90 XM-2/A	ISA/PCI	Award (4.50PG)
Fountain Technologies	FTNP5/90 XM-2/B	ISA/PCI	AMI (TAC 080895-1628)
Fountain Technologies	FTNP5/90 XM-2/C	PCI	AMI (51-071595)
Fountain Technologies	FTNP5/90 XM-3	ISA/PCI	AMI (2.0)
Fountain Technologies	FTNP5/90 XM-3/A	ISA/PCI	Award (4.50PG)
Fountain Technologies	FTNP5/90 XM-3/B	ISA/PCI	AMI (TAC 080895-1628)
Fountain Technologies	FTNP5/90 XM-3/C	PCI	AMI (51-071595)
Fountain Technologies	FTNP6/200 WS/V	ISA/PCI	AMI (1.00.05.CS1)
Fountain Technologies	V-Series	ISA/PCI	Box
Fujitsu	FMV-4100D4	ISA/PCI	Acer (R02-D0F5)
Fujitsu	FMV-466D4	ISA/PCI	Acer (R02-D0F5)
Fujitsu	FMV-5100C3	ISA/PCI	Acer (2.0)
Fujitsu	FMV-5100D4	ISA/PCI	Acer (R03-A0F4)
Fujitsu	FMV-5100D5	ISA/PCI	Acer (2.0)
Fujitsu	FMV-5100D6	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5100DE3	ISA/PCI	Phoenix (4.05/B8)
Fujitsu	FMV-5100T3	ISA/PCI	Phoenix (4.05/B8)
Fujitsu	FMV-5120D5	ISA/PCI	Acer (2.0)
Fujitsu	FMV-5120DE3	ISA/PCI	Phoenix (4.05/B8)
Fujitsu	FMV-5120DPC	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5120T2	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-5120T3	ISA/PCI	Phoenix (4.05/B8)
Fujitsu	FMV-5133D5	ISA/PCI	Acer (2.0)
Fujitsu	FMV-5133D6	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5133DE3	ISA/PCI	Phoenix (4.05/B8)
Fujitsu	FMV-5133DE4	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5133DPS	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5133DPT	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5133T3	ISA/PCI	Phoenix (4.05/B8)
Fujitsu	FMV-5133T3 model DPT	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-5150DPS	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5150DPT	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5150T3	ISA/PCI	Phoenix (4.05/B8)
Fujitsu	FMV-5150T4	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5166D5	ISA/PCI	Acer (2.0)
Fujitsu	FMV-5166D6	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5166DE4	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5166DPT	ISA/PCI	Acer (V2.0)
Fujitsu	FMV-5166T3	ISA/PCI	Phoenix (4.05/B8)
Fujitsu	FMV-575D4	ISA/PCI	Acer (R03-A0F4)
Fujitsu	FMV-575D5	ISA/PCI	Acer (2.0)
Fujitsu	FMV-575DE2	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-590C3	ISA/PCI	Acer (2.0)
Fujitsu	FMV-590DE2	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-590T2	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-6150T3	ISA/PCI	Phoenix (4.051B3)
Fujitsu	FMV-6200T3	ISA/PCI	Phoenix (4.051B3)
Fujitsu	FMV-TOWNS Fresh GE	ISA/PCI	Acer (2.0)
Fujitsu	FMV-TOWNS Fresh GM	ISA/PCI	Acer (2.0)
Fujitsu	FMV-TOWNS Fresh GS	ISA/PCI	Acer (2.0)
Fujitsu	FMV-TOWNS Fresh GT	ISA/PCI	Acer (2.0)
Fujitsu	FMV-TOWNS H	ISA/PCI	Acer (2.0)
Fujitsu	FMV-TOWNS H2	ISA/PCI	Acer (2.0)
Fujitsu	FMV-TOWNS SB	ISA/PCI	Acer (2.0)
Fujitsu	FMV-TOWNS SH	ISA/PCI	Acer (2.0)
Fujitsu	OASYS V-466D4	ISA/PCI	Acer (R02-D0F5)
Fujitsu	OASYS V-5100D4	ISA/PCI	Acer (R03-A0F4)
Fujitsu	OASYS V-5100D5	ISA/PCI	Acer (2.0)
Fujitsu	OASYS V-5133D5	ISA/PCI	Acer (2.0)
Fujitsu	OASYS V-5133D6	ISA/PCI	Acer (V2.0)
Fujitsu	OASYS V-5166D6	ISA/PCI	Acer (V2.0)
Fujitsu ICL	ErgoPro e240/50B	ISA	ICL (1.13)
Fujitsu ICL	ErgoPro e440/66B	ISA	ICL (1.13)
Fujitsu ICL	ErgoPro e450/100	ISA/PCI	ICL (1.00)
Fujitsu ICL	ErgoPro e450/75	ISA/PCI	ICL (1.00)
Fujitsu ICL	ErgoPro e450/90	ISA/PCI	ICL (1.00)
Fujitsu ICL	ErgoPro e650/75	ISA/PCI	ICL (1.00)
Fujitsu ICL	ErgoPro e650/90	ISA/PCI	ICL (1.00)
Fujitsu ICL	ErgoPro s450/100	ISA/PCI	ICL (9.99)
Fujitsu ICL	ErgoPro s450/133	ISA/PCI	ICL (9.99)
Fujitsu ICL	ErgoPro s450/75	ISA/PCI	ICL (9.99)
Fujitsu ICL	ErgoPro s650/100	ISA/PCI	ICL (9.99)
Fujitsu ICL	ErgoPro s650/133	ISA/PCI	ICL (9.99)
Fujitsu ICL	ErgoPro x240/100	ISA/PCI	ICL (1.02)
Fujitsu ICL	ErgoPro x240/66	ISA/PCI	ICL (1.02)
Fujitsu ICL	ErgoPro x250/75	ISA/PCI	ICL (9.99)
Fujitsu ICL	ErgoPro x440/100	ISA/PCI	ICL (1.02)
Fujitsu ICL	ErgoPro x440/66	ISA/PCI	ICL (1.02)
Fujitsu ICL	ErgoPro x450/100	ISA/PCI	ICL (9.99)
Fujitsu ICL	ErgoPro x450/133	ISA/PCI	ICL (9.99)
Fujitsu ICL	ErgoPro x450/75	ISA/PCI	ICL (9.99)
Fujitsu ICL	ErgoPro x450/90	ISA/PCI	ICL (9.99)
Fujitsu ICL	ErgoPro x650/100	ISA/PCI	ICL (9.99)
Fujitsu ICL	ErgoPro x650/133	ISA/PCI	ICL (9.99)
Fujitsu ICL	Indiana D1008	ISA/PCI	Acer (R04-B0 I0)
Fujitsu ICL	Indiana D1010	ISA/PCI	Acer (R04-B0 I0)
Fujitsu ICL	Indiana D708	ISA/PCI	Acer (R04-B0 I0)
Fujitsu ICL	Indiana F1008	ISA/PCI	Acer (R04-B0 I0)
Fujitsu ICL	Indiana F1208	ISA/PCI	Acer (R04-B0 I0)
Fujitsu ICL	Indiana F708	ISA/PCI	Acer (R04-B0 I0)
Fujitsu ICL	Indiana M1008	ISA/PCI	ICL (1.01 Release A)
Fujitsu ICL	Indiana M1308	ISA/PCI	ICL (1.01 Release A)
Fujitsu ICL	Indiana M1310	ISA/PCI	ICL (1.01 Release A)
Gateway 2000	4DX2-66	ISA/PCI	Phoenix (4.04.E)
Gateway 2000	4DX2-66 Family PC	ISA/PCI	Phoenix (4.04.E)
Gateway 2000	P5-120	ISA/PCI	Intel (1.00.04.BS0T)
Gateway 2000	P5-120XL	ISA/PCI	Intel (1.00.04.BS0T)
Gateway 2000	P5-150	ISA/PCI	AMI/Intel (1.00.01.CN0T)
Gateway 2000	P5-150 Family PC	ISA/PCI	AMI/Intel (1.00.01.CN0T)
Gateway 2000	P5-75	ISA/PCI	Intel (1.00.04.BS0T)
Gateway 2000	P5-75 Best Buy	ISA/PCI	Intel (1.00.04.BS0T)
Gateway 2000	P5-75 Family PC	ISA/PCI	Intel (1.00.04.BS0T)
Gateway 2000	P5-90	ISA/PCI	Intel (1.00.04.BS0T)
Gateway 2000	P5-90 Best Buy	ISA/PCI	Intel (1.00.04.BS0T)
Gateway 2000	P5-90 Family PC	ISA/PCI	Intel (1.00.04.BS0T)
Gateway 2000	P5-90XL	ISA/PCI	Intel (1.00.04.BS0T)
GES Singapore	Datamini PowerPro 100	ISA/PCI	Award (4.50PG)
GES Singapore	Datamini PowerPro 120	ISA/PCI	Award (4.50PG)
GES Singapore	Datamini PowerPro 75	ISA/PCI	Award (4.50PG)
GES Singapore	Datamini PowerPro 90	ISA/PCI	Award (4.50PG)
Gigatron Software	P5-100	ISA/PCI	Intel (1.00.04BR0T)
Gigatron Software	P5-100 Best Buy	ISA/PCI	Intel (1.00.04BR0T)
Gigatron Software	P5-100 Family PC	ISA/PCI	Intel (1.00.04BR0T)
Gigatron Software	P5-133 Best Buy	ISA/PCI	Intel (1.00.04BR0T)
Gigatron Software	P5-133 Family PC	ISA/PCI	Intel (1.00.04BR0T)
Government Micro Resources	Rembrandt Master Series 2000 (P120)	PCI	AMI/Intel (1.00.03.BS0)
Government Micro Resources	Rembrandt Master Series 2000 (P133)	PCI	AMI/Intel (1.00.03.CB0)
Greenleaf Distribution	GLI-P90-1000	PCI	AMI/Intel (1.00.03.BS0)
Greenleaf Distribution	GLI-P90-1010	PCI	AMI/Intel (1.00.03.BS0)
Greenleaf Distribution	GLI-P90-1020	PCI	AMI/Intel (1.00.03.BS0)
Greenleaf Distribution	GLI-P90-1030	PCI	AMI/Intel (1.00.03.BS0)
GST	8000PT	ISA/PCI	AMI/Intel (1.00.03.BS0)
GST	Apogee 8000PT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Hewitt Rand	HR P5200	ISA/PCI	Box
Hewlett-Packard	5010	ISA	Phoenix (EPP revision 3.00)
Hewlett-Packard	5030	ISA/PCI	Intel (5.0)
Hewlett-Packard	7010	ISA/PCI	Intel (5.0)
Hewlett-Packard	7020	ISA/PCI	Intel (5.0)
Hewlett-Packard	7030	ISA/PCI	Intel (5.0)
Hewlett-Packard	7050	ISA/PCI	Intel (5.0)
Hewlett-Packard	BusyBee XL Pentium PM/100	PCI	Award S/W (4.51 PG)
Hewlett-Packard	F1126A HP OmniBook 5000C 5/75 VL Model 540	ISA/PCI/PCMCIA	SystemSoft (01.01.12)
Hewlett-Packard	F1127A HP OmniBook 5000C 5/90VL Model 810	ISA/PCI/PCMCIA	SystemSoft (01.01.12)
Hewlett-Packard	F1129A HP OmniBook 5000C 5/90VL Model 1200	ISA/PCI/PCMCIA	SystemSoft (01.01.12)
Hewlett-Packard	F1130A HP OmniBook 5000C 5/90 Model 1200	ISA/PCI/PCMCIA	SystemSoft (01.01.12)
Hewlett-Packard	F1131A HP OmniBook 5000C 5/90 Model 1200	ISA/PCI/PCMCIA	SystemSoft (01.01.12)
Hewlett-Packard	F1140A HP OmniBook 5000C 5/75VL Model 810	ISA/PCI/PCMCIA	SystemSoft (01.01.12)
Hewlett-Packard	F1141A HP OmniBook 5000C 5/90 Model 810	ISA/PCI/PCMCIA	SystemSoft (01.01.12)
Hewlett-Packard	F1152A HP OmniBook 5000CT 5/90 Model 1200	ISA/PCI/PCMCIA	SystemSoft (01.01.12)
Hewlett-Packard	F1198A HP OmniBook 5000C 5/120 Model 1200	ISA/PCI/PCMCIA	SystemSoft (01.01.12)
Hewlett-Packard	HP 7070	ISA/PCI	Intel (?)
Hewlett-Packard	HP 7090 Pavilion PC	ISA/PCI	Intel (?)
Hewlett-Packard	HP Vectra VE 5/100 Series 2	ISA/PCI	Phoenix (QGU.00.05)
Hewlett-Packard	HP Vectra VE 5/75 PC	ISA/PCI	Hewlett-Packard (GL.05.08)
Hewlett-Packard	HP Vectra VE 5/75 Series 2	ISA/PCI	Phoenix (QGU.00.05)
Hewlett-Packard	HP Vectra VE 5/90 PC	ISA/PCI	Hewlett-Packard (GL.05.08)
Hewlett-Packard	Infiniti Pentium PM/100	PCI	Award S/W (4.51 PG)
Hewlett-Packard	Infiniti Pentium PM/133	PCI	Award S/W (4.51 PG)
Hewlett-Packard	Infiniti Pentium PM/60	PCI	Award S/W (4.51 PG)
Hewlett-Packard	Infiniti Pentium PM/75	PCI	Award S/W (4.51 PG)
Hewlett-Packard	Pavilion 7125	ISA/PCI	Box
Hewlett-Packard	Pavilion PC Model 7285	ISA/PCI	Box
Hewlett-Packard	Vectra 500 DX4	ISA/PCI	Hewlett-Packard (GK.05.03)
Hewlett-Packard	Vectra 500 PC (Model 502)	ISA/PCI	Hewlett-Packard (GK.05.03)
Hewlett-Packard	Vectra 500 PC (Model 510)	ISA/PCI	Hewlett-Packard (GK.05.03)
Hewlett-Packard	Vectra 500 PC (Model 522)	ISA/PCI	Hewlett-Packard (QGK.07.01)
Hewlett-Packard	Vectra 500 Series	ISA/PCI	Hewlett-Packard (GP.05.02)
Hewlett-Packard	Vectra 500 Series (520 MCx 5/133)	ISA/PCI	Box
Hewlett-Packard	Vectra 500 Series (520 MCx 5/166)	ISA/PCI	Box
Hewlett-Packard	Vectra 500 Series (525 5/200)	ISA/PCI	Box
Hewlett-Packard	Vectra 500 Series (525 CD 5/133)	ISA/PCI	Box
Hewlett-Packard	Vectra 500 Series (525 CD 5/166)	ISA/PCI	Box
Hewlett-Packard	Vectra 500 Series (525 CD 5/200)	ISA/PCI	Box
Hewlett-Packard	Vectra 500 Series (525 MCx 5/133)	ISA/PCI	Box
Hewlett-Packard	Vectra 500 Series (525 MCx 5/166)	ISA/PCI	Box
Hewlett-Packard	Vectra 500 Series (525 MCx 5/200)	ISA/PCI	Box
Hewlett-Packard	Vectra 500 Series (560 model)	ISA/PCI	Hewlett-Packard (GT07.04)
Hewlett-Packard	Vectra 500 Series (562 model)	ISA/PCI	Hewlett-Packard (GT07.04)
Hewlett-Packard	Vectra 500 Series (564 model)	ISA/PCI	Hewlett-Packard (GT07.04)
Hewlett-Packard	Vectra 500 Series (572 model)	ISA/PCI	Hewlett-Packard (GT07.04)
Hewlett-Packard	Vectra 500 Series (574 model)	ISA/PCI	Hewlett-Packard (GT07.04)
Hewlett-Packard	Vectra PC Series 520 B 5/133	ISA/PCI	Phoenix (QGX.00.15)
Hewlett-Packard	Vectra PC Series 520 BCC 5/133	ISA/PCI	Phoenix (QGX.00.15)
Hewlett-Packard	Vectra PC Series 520 BCD 5/133	ISA/PCI	Phoenix (QGX.00.15)
Hewlett-Packard	Vectra VA 6/200 PC	ISA/PCI	Box
Hewlett-Packard	Vectra VE 4/100 PC	ISA/PCI	Hewlett-Packard (GP.05.02)
Hewlett-Packard	Vectra VE 4/50 PC	ISA/PCI	Hewlett-Packard (GK.05.03)
Hewlett-Packard	Vectra VE 4/66 PC	ISA/PCI	Hewlett-Packard (GK.05.03)
Hewlett-Packard	Vectra VE 4/66 PC	ISA/PCI	Hewlett-Packard (GP.05.02)
Hewlett-Packard	Vectra VE 5/100 Series 3	ISA/PCI	Phoenix (QGX.00.15)
Hewlett-Packard	Vectra VE 5/120 Series 3	ISA/PCI	Phoenix (QGX.00.15)
Hewlett-Packard	Vectra VE 5/133 Series 2	ISA/PCI	Phoenix (QGU.00.05)
Hewlett-Packard	Vectra VE 5/133 Series 3	ISA/PCI	Phoenix (QGX.00.15)
Hewlett-Packard	Vectra VE 5/166 Series 3	ISA/PCI	Phoenix (QGX.00.15)
Hewlett-Packard	Vectra VL 5/100 Series 3 PC	ISA/PCI	Hewlett-Packard (QGK.07.01)
Hewlett-Packard	Vectra VL 5/100 Series 4	ISA/PCI	Phoenix (GT07.13)
Hewlett-Packard	Vectra VL 5/100 Series 4	ISA/PCI	Phoenix (GT.07.14)
Hewlett-Packard	Vectra VL 5/120 Series 3 PC	ISA/PCI	Hewlett-Packard (QGK.07.01)
Hewlett-Packard	Vectra VL 5/120 Series 4	ISA/PCI	Phoenix (GT07.13)
Hewlett-Packard	Vectra VL 5/120 Series 4	ISA/PCI	Phoenix (GT.07.14)
Hewlett-Packard	Vectra VL 5/133 Series 4	ISA/PCI	Phoenix (GT07.13)
Hewlett-Packard	Vectra VL 5/133 Series 4	ISA/PCI	Phoenix (GT.07.14)
Hewlett-Packard	Vectra VL 5/150 MT Series 4 MMX	ISA/PCI	Phoenix (GT.07.14)
Hewlett-Packard	Vectra VL 5/150 Series 4	ISA/PCI	Phoenix (GT.07.14)
Hewlett-Packard	Vectra VL 5/166 MT Series 4 MMX	ISA/PCI	Phoenix (GT.07.14)
Hewlett-Packard	Vectra VL 5/166 Series 4	ISA/PCI	Phoenix (GT.07.14)
Hewlett-Packard	Vectra VL 5/200 MT Series 4 MxM	ISA/PCI	Box
Hewlett-Packard	Vectra VL 5/200 Series 4	ISA/PCI	Box
Hewlett-Packard	Vectra VL 5/200 Series 5	ISA/PCI	Phoenix (LHA.00.18)
Hewlett-Packard	Vectra VL 5/75 Series 3 PC	ISA/PCI	Hewlett-Packard (QGK.07.01)
Hewlett-Packard	Vectra VL 5/90 Series 3 PC	ISA/PCI	Hewlett-Packard (QGK.07.01)
Hewlett-Packard	Vectra VL 5/90 Series 4	ISA/PCI	Phoenix (GT07.13)
Hewlett-Packard	Vectra XA 5/200	ISA/PCI	Box
Hewlett-Packard	Vectra XA 5/200	ISA/PCI	Phoenix (LHA.00.18)
Hewlett-Packard	Vectra XA 6/200 PC	ISA/PCI	Box
Hewlett-Packard	Vectra XM 5/120 Series 3 PC	ISA/PCI	Hewlett-Packard (GM.05.03)
Hewlett-Packard	Vectra XM 5/166 Series 5	ISA/PCI	Box
Hewlett-Packard	Vectra XM 5/166 Series 5	ISA/PCI	Phoenix (LHA.00.18)
Hewlett-Packard	Vectra XM 5/200 Series 5	ISA/PCI	Box
Hewlett-Packard	Vectra XM 5/75 Series 3 PC	ISA/PCI	Hewlett-Packard (GM.05.03)
Hewlett-Packard	Vectra XM 5/90 Series 3 PC	ISA/PCI	Hewlett-Packard (GM.05.03)
Hewlett-Packard	Vectra XM Series 4 5/200	ISA/PCI	Box
Hewlett-Packard	Vectra XM Series-4 5/100	ISA/PCI	HP/Phoenix (QGW.06.03)
Hewlett-Packard	Vectra XM Series-4 5/120	ISA/PCI	HP/Phoenix (QGW.06.03)
Hewlett-Packard	Vectra XM Series-4 5/133	ISA/PCI	HP/Phoenix (QGW.06.03)
Hewlett-Packard	Vectra XM Series-4 5/150	ISA/PCI	HP/Phoenix (QGW.06.03)
Hewlett-Packard	Vectra XM Series-4 5/166	ISA/PCI	HP/Phoenix (QGW.06.03)
Hewlett-Packard	Vectra XM Series-4 5/75	ISA/PCI	HP/Phoenix (QGW.06.03)
Hitachi	FLORA -DS02	ISA/PCI	Acer (2.0)
Hitachi	FLORA 3010DW	ISA/PCI	AMI/Intel (1.00.03.BS0)
Hitachi	FLORA 500NJ	ISA/PCI	Phoenix (4.04)
Hitachi	FLORA 500TC	ISA/PCI	AMI/Intel (1.00.03.CB0)
Hitachi	FLORA 500TD	ISA/PCI	Acer (2.0)
Hitachi	FLORA 500TE	ISA/PCI	Acer (2.0)
Hitachi	FLORA 500VE	ISA/PCI	AMI/Intel (1.00.03.CB0)
Hitachi	FLORA 500VG	ISA/PCI	Acer (2.0)
Hitachi	FLORA 500VH	ISA/PCI	Acer (2.0)
Hitachi	FLORA 500VJ	ISA/PCI	Acer (2.0)
Hitachi	FLORA 500VL	ISA/PCI	Acer (2.0)
Hitachi	FLORA 500VN	ISA/PCI	Acer (2.0)
Hitachi	FLORA 500VQ	ISA/PCI	Acer (2.0)
Hitachi	FLORA DM01	ISAPCI	Acer (2.0)
Hitachi	FLORA PX-VK	ISA/PCI	Acer (2.0)
Hitachi	FLORA PX-VP	ISA/PCI	Acer (2.0)
Hitachi	FLORA-DM02	ISA/PCI	Acer (2.0)
Hitachi	FLORA-MM01	ISA/PCI	Acer (2.0)
Hitachi	FLORA-MS01	ISA/PCI	Acer (2.0)
Hitachi	FLORA-NS1 (japan model)	ISA/PCI	Phoenix (4.04)
Hitachi	FLORA-TL1	ISA/PCI	AMI/Intel (1.00.03.CB0)
Hitachi	FLORA-TM01	ISA/PCI	Acer (2.0)
Hitachi	H330 (us.model)	ISA/PCI	Phoenix (4.04)
Hitachi	Hitachi Notebook C	ISA/PCI	Phoenix (4.04)
Hyundai Electronics	HD-4100P (HD-Series)	ISA/PCI	AMI (AG55)
Hyundai Electronics	HD-4100PM	ISA/PCI	AMI (AG55)
Hyundai Electronics	HD-4100PT	ISA/PCI	AMI (AG55)
Hyundai Electronics	HD-466P	ISA/PCI	AMI (AG55)
Hyundai Electronics	HD-466PM	ISA/PCI	AMI (AG55)
Hyundai Electronics	HD-466PT	ISA/PCI	AMI (AG55)
Hyundai Electronics	HD-480P	ISA/PCI	AMI (AG55)
Hyundai Electronics	HD-480PM	ISA/PCI	AMI (AG55)
Hyundai Electronics	HD-480PT	ISA/PCI	AMI (AG55)
Hyundai Electronics	HD-5100	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-5100M(T)	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-5120M(T)	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-5133	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-5133M(T)	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-5150	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-5150M(T)	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-5166	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-5166M(T)	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-575	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-575 M(T)	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-590	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-590M(T)	PCI/ISA	AMI (A379)
Hyundai Electronics	HD-P5100	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P5100M	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P5100T	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P5120T	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P5133	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P5133M	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P5133T	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P5150	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P5150M	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P5150T	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P575	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P575M	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P575T	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P590	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P590M	ISA/PCI	Award (W976)
Hyundai Electronics	HD-P590T	ISA/PCI	Award (W976)
Hyundai Electronics	MultiCAV IV	PCI	AMI (DI 1.10)
Hyundai Electronics	MultiCAV Pro	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Hyundai Electronics	MultiCAV-V	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Hyundai Electronics	P5000D Series	ISA/PCI	Box
Hyundai Electronics	Phantom	ISA/PCI	AMI (DJ 1.11)
Hyundai Electronics	Phantom II Tower	ISA/PCI	AMI (071595)
Hyundai Electronics	Phantom Pro	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Hyundai Electronics	Phantom Pro 1000	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Hyundai Electronics	Phantom-II	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Hyundai Electronics	Phantom-III	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Hyundai Electronics	Phantom-IIM	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Hyundai Electronics	SGS II	ISA/PCI	AMI (DJ 1.11)
IBM	Aptiva 2134-351	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-353	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-361	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-C21	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-C32	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-J31	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-J3A	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-JDA	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-K01	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-K21	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-K22	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-L01	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-L21	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-L22	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-N04	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-P01	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-P21	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2134-P22	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2144-113	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-120	ISA	IBM (B03US0F)
IBM	Aptiva 2144-121	ISA	IBM (B03US0F)
IBM	Aptiva 2144-123	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-131	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-133	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-141	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-21P	ISA	IBM (0)
IBM	Aptiva 2144-70J (530)	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-71J (537)	ISA	IBM (0)
IBM	Aptiva 2144-900	ISA	IBM (09/12/95)
IBM	Aptiva 2144-910	ISA	IBM (09/12/95)
IBM	Aptiva 2144-911	ISA	IBM (09/12/95)
IBM	Aptiva 2144-914	ISA	IBM (09/12/95)
IBM	Aptiva 2144-91W	ISA	IBM (09/12/95)
IBM	Aptiva 2144-921	ISA	IBM (09/12/95)
IBM	Aptiva 2144-92W	ISA	IBM (09/12/95)
IBM	Aptiva 2144-930	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-937	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-941	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-94W	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-952	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-A12	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-A14	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-A51	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-C30	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-C31	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-C51	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-K10	ISA	IBM (09/12/95)
IBM	Aptiva 2144-K15	ISA	IBM (B03US0F)
IBM	Aptiva 2144-K16	ISA	IBM (B03US0F)
IBM	Aptiva 2144-K20	ISA	IBM (09/12/95)
IBM	Aptiva 2144-K25	ISA	IBM (B03US0F)
IBM	Aptiva 2144-K26	ISA	IBM (B03US0F)
IBM	Aptiva 2144-K30	ISA	IBM (09/12/95)
IBM	Aptiva 2144-K33	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-K35	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-K40	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-K43	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-K45	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-KB0	ISA	IBM (09/12/95)
IBM	Aptiva 2144-KP1	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-KP2	ISA	IBM (0)
IBM	Aptiva 2144-KPA	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-KPB	ISA	IBM (0)
IBM	Aptiva 2144-KPC	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-KPD	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-KPE	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-KU0	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-KU1	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-KU2	ISA	IBM (0)
IBM	Aptiva 2144-KU3	ISA	IBM (0)
IBM	Aptiva 2144-KU4	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-KU5	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-KU6	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-L10	ISA	IBM (09/12/95)
IBM	Aptiva 2144-L11	ISA	IBM (09/12/95)
IBM	Aptiva 2144-L15	ISA	IBM (B03US0F)
IBM	Aptiva 2144-L16	ISA	IBM (B03US0F)
IBM	Aptiva 2144-L20	ISA	IBM (09/12/95)
IBM	Aptiva 2144-L30	ISA	IBM (09/12/95)
IBM	Aptiva 2144-L33	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-L35	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-L40	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-L43	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-L45	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-LB0	ISA	IBM (09/12/95)
IBM	Aptiva 2144-LBD	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-LL1	ISA	IBM (09/12/95)
IBM	Aptiva 2144-LL2	ISA	IBM (09/12/95)
IBM	Aptiva 2144-LL3	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-LL4	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-LP0	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-LP1	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-LP2	ISA	IBM (0)
IBM	Aptiva 2144-LPA	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-LPB	ISA	IBM (0)
IBM	Aptiva 2144-LPC	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-LS0	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-LS1	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-LS2	ISA	IBM (0)
IBM	Aptiva 2144-LS3	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-LSA	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-LSB	ISA	IBM (0)
IBM	Aptiva 2144-LSC	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-LSD	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-M30	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-M31	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-M35	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-M50	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-M51	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-M52	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-M63	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-N30	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-N31	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-N40	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-N41	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-P30	ISA	IBM (0)
IBM	Aptiva 2144-PC1	ISA	IBM (0)
IBM	Aptiva 2144-S20	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-S30	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-U11	ISA	IBM (09/12/95)
IBM	Aptiva 2144-U33	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-U35	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-U43	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-U45	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-V15	ISA	IBM (B03US0F)
IBM	Aptiva 2144-V16	ISA	IBM (B03US0F)
IBM	Aptiva 2144-W30	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-X10	ISA	IBM (09/12/95)
IBM	Aptiva 2144-X17	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-X20	ISA	IBM (09/12/95)
IBM	Aptiva 2144-X27	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-X30	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-XP1	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-XP2	ISA	IBM (0)
IBM	Aptiva 2144-Y10	ISA	IBM (09/12/95)
IBM	Aptiva 2144-Y17	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-Y20	ISA	IBM (09/12/95)
IBM	Aptiva 2144-Y27	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-Y30	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-YP1	ISA	IBM (BOPUS1B)
IBM	Aptiva 2144-YP2	ISA	IBM (0)
IBM	Aptiva 2144-Z10	ISA	IBM (09/12/95)
IBM	Aptiva 2144-Z17	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-Z20	ISA	IBM (09/12/95)
IBM	Aptiva 2144-Z27	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-Z30	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2144-Z40	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-132	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-142	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-152	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-161	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-162	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-163	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-171	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-172	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-182	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-931	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-932	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-934	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-935	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-93W	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-951	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-95W	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-964	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-96W	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-9W2	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-A15	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-A40	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-A44	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-A45	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-A50	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-A52	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-A90	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-A92	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-A93	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-A94	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-C40	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-C41	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-C45	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-C53	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-C61	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-K50	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-K55	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-K60	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-K65	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-K66	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-L50	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-L55	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-L60	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-L65	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-L66	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-LL5	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-LL6	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M40	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M41	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M53	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M54	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M55	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M56	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M57	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M58	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M60	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M61	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M62	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M70	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M71	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-M72	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-N50	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-N51	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-N60	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-N61	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-N71	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-S40	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-S50	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-S55	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-S60	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-S64	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-S65	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-S74	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-S75	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-U55	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-U65	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-U66	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-W37	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-W47	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-X37	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-X40	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-X47	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-Y37	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-Y40	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-Y47	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-Z37	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2168-Z47	ISA/PCI	IBM Surepath (0.02 (4/12/95))
IBM	Aptiva 2176-352	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-354	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-362	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-363	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-372	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-C31	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-C32	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-C34	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-C54	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-C6D	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-F31	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-J33	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-J35	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-J3C	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-J3E	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-JCL	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-LM1	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-T01	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-W33	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-X01	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-X03	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-X31	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-X34	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-X63	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-Y01	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-Y03	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-Y31	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-Y34	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-Y63	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-Z01	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-Z03	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-Z31	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-Z34	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva 2176-Z63	ISA/PCI	IBM (BFLUS2D)
IBM	Aptiva Vision 2407RW2	ISA	IBM (09/12/95)
IBM	Master 2411-P	ISA/PCI	IBM (?)
IBM	PC 130 Model 6271-486DX2/66	ISA	IBM (55)
IBM	PC 130 Model 6271-486DX4/100	ISA	IBM (55)
IBM	PC 140 6260 P100	ISA/PCI	IBM (LYKT14A)
IBM	PC 140 6260 P75	ISA/PCI	IBM (LYKT14A)
IBM	PC 150 Model 6281-486DX2/66	ISA	IBM (55)
IBM	PC 150 Model 6281-486DX4/100	ISA	IBM (55)
IBM	PC 330 6577	PCI/ISA	IBM (11)
IBM	PC 330 6577 P-100	PCI/ISA	IBM (11)
IBM	PC 330 6577 P-133	PCI/ISA	IBM (11)
IBM	PC 330 6577 P-166	PCI/ISA	IBM (11)
IBM	PC 330 Model 6571-486DX2/50	ISA	IBM (55)
IBM	PC 330 Model 6571-486DX2/66	ISA	IBM (55)
IBM	PC 330 Model 6571-486DX4/100	ISA	IBM (55)
IBM	PC 330 Model 6573-486DX2/50	ISA	IBM (55)
IBM	PC 330 Model 6573-486DX2/66	ISA	IBM (55)
IBM	PC 330 Model 6573-486DX4/100	ISA	IBM (55)
IBM	PC 330 Model 6575 P60	ISA/PCI	IBM (76)
IBM	PC 330 Model 6576-P100	ISA/PCI	AMI/Intel (0.06.02.CC0M)
IBM	PC 330 Model 6576-P120	ISA/PCI	AMI/Intel (0.06.02.CC0M)
IBM	PC 330 Model 6576-P133	ISA/PCI	AMI/Intel (0.05.03.CC0M)
IBM	PC 330 Model 6576-P150	ISA/PCI	AMI/Intel (0.06.02.CC0M)
IBM	PC 330 Model 6576-P166	ISA/PCI	AMI/Intel (0.06.02.CC0M)
IBM	PC 330 Model 6576-P75	ISA/PCI	AMI/Intel (0.05.03.CC0M)
IBM	PC 330 Model 6576-P90	ISA/PCI	AMI/Intel (0.05.03.CC0M)
IBM	PC 330 Model 6576-P90	ISA/PCI	AMI/Intel (0.06.02.CC0M)
IBM	PC 350 6587 P-100	PCI/ISA	IBM (11)
IBM	PC 350 6587 P-133	PCI/ISA	IBM (11)
IBM	PC 350 6587 P-166	PCI/ISA	IBM (11)
IBM	PC 350 Model 6581-486DX2/50	ISA	IBM (55)
IBM	PC 350 Model 6581-486DX2/66	ISA	IBM (55)
IBM	PC 350 Model 6581-486DX4/100	ISA	IBM (55)
IBM	PC 350 Model 6583-486DX2/50	ISA	IBM (55)
IBM	PC 350 Model 6583-486DX2/66	ISA	IBM (55)
IBM	PC 350 Model 6583-486DX4/100	ISA	IBM (55)
IBM	PC 350 Model 6585 P60	ISA/PCI	IBM (76)
IBM	PC 350 Model 6586-P100	ISA/PCI	AMI/Intel (0.06.02.CC0M)
IBM	PC 350 Model 6586-P120	ISA/PCI	AMI/Intel (0.06.02.CC0M)
IBM	PC 350 Model 6586-P133	ISA/PCI	AMI/Intel (0.05.03.CC0M)
IBM	PC 350 Model 6586-P150	ISA/PCI	AMI/Intel (0.06.02.CC0M)
IBM	PC 350 Model 6586-P166	ISA/PCI	AMI/Intel (0.06.02.CC0M)
IBM	PC 350 Model 6586-P75	ISA/PCI	AMI/Intel (0.06.02.CC0M)
IBM	PC 350 Model 6586-P90	ISA/PCI	AMI/Intel (0.05.03.CC0M)
IBM	PC 730 Model 6875-P100	ISA/PCI	IBM (76)
IBM	PC 730 Model 6875-P120	ISA/PCI	IBM (76)
IBM	PC 730 Model 6875-P133	ISA/PCI	IBM (76)
IBM	PC 730 Model 6875-P75	ISA/PCI	IBM (76)
IBM	PC 730 Model 6875-P90	ISA/PCI	IBM (76)
IBM	PC 750 Model 6885-P100	ISA/PCI	IBM (76)
IBM	PC 750 Model 6885-P120	ISA/PCI	IBM (76)
IBM	PC 750 Model 6885-P133	ISA/PCI	IBM (76)
IBM	PC 750 Model 6885-P75	ISA/PCI	IBM (76)
IBM	PC 750 Model 6885-P90	ISA/PCI	IBM (76)
IBM	PC Server 310 8639-JZT	ISA/PCI	IBM (BNZJPOL)
IBM	PC330 6873-J	ISA/PCI	IBM (BNZJPOL)
IBM	PC720 6863-J	ISA/PCI	IBM (BNZJPOL)
IBM	PC750 6883-J	ISA/PCI	IBM (BNZJPOL)
IBM	PC750 6885-J	ISA/PCI	IBM (K1KT11AJP)
ID Computer	T&T DIWIN	PCI	AMI/Intel (1.00.03.BS0)
Iiyama Electric	aP52017	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Informatics Computers SA	ICE Powerline	PCI	AMI (1.0)
Infotel	P5-100 Home PC	PCI	Award (4.50PG 2A4IBG3I)
Infotel	P5-120 Home PC	PCI	Award (4.50PG 2A4IBG3I)
Infotel	P5-133 Home PC	PCI	Award (4.50PG 2A4IBG3I)
Infotel	P5-75 Home PC	PCI	Award (4.50PG 2A4IBG3I)
Infotel	P5-90 Home PC	PCI	Award (4.50PG 2A4IBG3I)
Insight	Hemisphere P5-133	ISA/PCI	AMI/Intel (1.00.03.CB0)
Intel	Advanced/ML	ISA/PCI	AMI (1.00.04.DB0)
Intel	PCV-70	ISA/PCI	AMI (1.00.02.DD04)
Intel	Venus	ISA/PCI	AMI/Intel (Beta 1.05 CS1)
Interaq	IQ Jupiter	ISA/PCI	AWARD (4.50PG  401A0-0113)
International Data Products	DGI	ISA/PCI	Award (1.08)
Inteva Technologies	INT P5/100/V-A	ISA/PCI	Box
Inteva Technologies	INT P5/100/V-B	ISA/PCI	Box
Inteva Technologies	INT P5/100/V-C	ISA/PCI	Box
Inteva Technologies	INT P5/120/V-A	ISA/PCI	Box
Inteva Technologies	INT P5/120/V-B	ISA/PCI	Box
Inteva Technologies	INT P5/120/V-C	ISA/PCI	Box
Inteva Technologies	INT P5/133/V-A	ISA/PCI	Box
Inteva Technologies	INT P5/133/V-C	ISA/PCI	Box
Inteva Technologies	INT P5/150/V-A	ISA/PCI	Box
Inteva Technologies	INT P5/150/V-B	ISA/PCI	Box
Inteva Technologies	INT P5/150/V-C	ISA/PCI	Box
Inteva Technologies	INT P5/166/V-A	ISA/PCI	Box
Inteva Technologies	INT P5/166/V-B	ISA/PCI	Box
Inteva Technologies	INT P5/166/V-C	ISA/PCI	Box
Inteva Technologies	INT P5/200/V-A	ISA/PCI	Box
Inteva Technologies	INT P5/200/V-B	ISA/PCI	Box
Inteva Technologies	INT P5/200/V-C	ISA/PCI	Box
Inteva Technologies	INT P5/75/V-A	ISA/PCI	Box
Inteva Technologies	INT P5/75/V-B	ISA/PCI	Box
Inteva Technologies	INT P5/75/V-C	ISA/PCI	Box
Inteva Technologies	INT P5/90/V-A	ISA/PCI	Box
Inteva Technologies	INT P5/90/V-B	ISA/PCI	Box
Inteva Technologies	INT P5/90/V-C	ISA/PCI	Box
Inteva Technologies	RR-V Series	ISA/PCI	Box
Inteva Technologies	V Series	ISA/PCI	Box
Investronica	Inves VIP-5	ISA/PCI	AMI/Intel (1.00.03.BS0)
Investronica	Inves VIP-5 95	ISA/PCI	AMI/Intel (1.00.03.BS0)
Inwar	Invar 95 HT4PCI/VL	ISA/PCI/VL	Award (0301 PnP)
Inwar	Invar 95 HT55PCI/I PB	ISA/PCI/MEDIA BUS	Award (0112 PnP)
IPC	Family Magic	ISA/PCI	AMI/Intel (0.05.03.CC0M)
IPC	Helios DT, MT & FT	ISA/PCI	AMI/Intel (0.05.03.CC0M)
IPC	Power Plus 100 Tower	ISA/PCI	AMI/Intel (1.00.03.CB0)
IPC	Power Plus 75 Tower	PCI	AMI/Intel (1.00.03.BS0)
IPC	Value Magic	ISA/PCI	AMI/Intel (0.05.03.CC0M)
Itautec Philco	IS Multimídia	ISA/PCI	AMI/Intel (1.00.03.BS0)
Itautec Philco	IS PENT 75	ISA/PCI	AMI/Intel (1.00.03.BS0)
J M Computers	PerComp 100 Professional	ISA/PCI	Award (4.02)
J M Computers	SBC P100	ISA/PCI	Award (4.02)
J&W Computer	Diamond Plus Series P100	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Plus Series P120	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Plus Series P133	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Plus Series P150	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Plus Series P75	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Plus Series P90	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Plus Series P90	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Series P100	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Series P120	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Series P133	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Series P150	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Series P75	PCI	AMI/Intel (1.00.04.BS0)
J&W Computer	Diamond Series P90	PCI	AMI/Intel (1.00.04.BS0)
JTT Computer	Adax Delta 100	PCI	AMI/Intel (1.00.04.BS0)
JTT Computer	Adax Delta 120	PCI	AMI/Intel (1.00.04.BS0)
JTT Computer	Adax Delta 75	PCI	AMI/Intel (1.00.04.BS0)
JTT Computer	Adax Delta 90	PCI	AMI/Intel (1.00.04.BS0)
Lanix Technology	Top 4100	ISA/PCI	Award (4.50PG)
Lanix Technology	TOP Z75	ISA/PCI	AMI/Intel (1.00.03.BS0)
LG Electronics	GH53M	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
LG Electronics	GK41P	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
LG Electronics	GK53P	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
LG Electronics	GS50H	ISA/PCI	Phoenix (4.05)
LG Electronics	GT53P	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
LG Electronics	LA55P	ISA/PCI	Box
LG Electronics	LA56P	ISA/PCI	Box
LG Electronics	LT60H	ISA/PCI	Box
Liuski International	Magitronic 2 Series	PCI	AMI/Intel (1.00.03.BS0)
Liuski International	Magitronic G-M4PF Series	ISA/PCI	Award (7/1/95)
Liuski International	Magitronic Mercury (EZ Series)	ISA/PCI	AMI/Intel (1.00.03.CB0)
M.A. Micro	Ultra Pro 133	ISA/PCI	AMI (1.00.04.CB0)
Magitech	Pent95I	PCI	AMI/Intel (1.00.03.BS0)
Magitech	Pinnacle System P-100	PCI	Box
Media On	MP120	ISA/PCI	AMI/Intel (1.00.03.BS0)
Media On	MP66	ISA	AMI/Intel (1.00.03.CB0)
Micro Electronics	PowerSpec PC Reference Series	ISA/PCI	Phoenix (586PCIPnP)
Micro Electronics	PowerSpec PC Value Series	ISA/PCI	Phoenix (586PCIPnP)
Micron	4100 Magnum	ISA/PCI	Phoenix (4.04 M4Pi-07PM)
Micron	466 Magnum	ISA/PCI	Phoenix (4.04 M4Pi-07PM)
Micron	Home MPC P200HX	ISA/PCI	Box
Micron	Millennia Pro 200	ISA/PCI	Box
Micron	P100 Millennia	ISA/PCI	Phoenix (4.04 M-M54Hi-04PM)
Micron	P100 PowerStation	ISA/PCI	Phoenix (4.04 M54Li-03PM a)
Micron	P100 PowerStation Plus	ISA/PCI	Phoenix (4.04 M54Li-03PM a)
Micron	P120 Millennia	ISA/PCI	Phoenix (4.04 M-M54Hi-04PM)
Micron	P120 PowerStation	ISA/PCI	Phoenix (4.04 M54Li-03PM a)
Micron	P120 PowerStation Plus	ISA/PCI	Phoenix (4.04 M54Li-03PM a)
Micron	P75 Millennia	ISA/PCI	Phoenix (4.04 M-M54Hi-04PM)
Micron	P75 PowerStation	ISA/PCI	Phoenix (4.04 M54Li-03PM a)
Micron	P75 PowerStation Plus	ISA/PCI	Phoenix (4.04 M54Li-03PM a)
Micron	P90 Millennia	ISA/PCI	Phoenix (4.04 M-M54Hi-04PM)
Micron	P90 PowerStation	ISA/PCI	Phoenix (4.04 M54Li-03PM a)
Micron	P90 PowerStation Plus	ISA/PCI	Phoenix (4.04 M54Li-03PM a)
Mind Computer Products	Mind Ultimate C166+ HX	ISA/PCI	Award (1.2)
Mind Computer Products	Mind Ultimate P133	ISA/PCI	Award (1.0a)
Mind Computer Products	Mind Ultimate P200 HX	ISA/PCI	Award (1.2)
Mind Computer Products	Mind Ultimate P200 HX-ATX	ISA/PCI	Award (1.1)
Mind Computer Products	Mind Ultimate P200 VX	ISA/PCI	Award (1.4)
Mind Computer Products	Mind Value C166+ HX-ATX	ISA/PCI	Award (1.1)
Mind Computer Products	Mind Value C166+ VX	ISA/PCI	Award (1.4)
Mind Computer Products	Ultimate 599-100	ISA/PCI	Award (1.0a)
Mind Computer Products	Ultimate 599-100	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Ultimate 599-120	ISA/PCI	Award (1.0a)
Mind Computer Products	Ultimate 599-120	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Ultimate 599-133	ISA/PCI	Award (1.0a)
Mind Computer Products	Ultimate 599-133	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Ultimate 599-75	ISA/PCI	Award (1.0a)
Mind Computer Products	Ultimate 599-75	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Ultimate 599-90	ISA/PCI	Award (1.0a)
Mind Computer Products	Ultimate 599-90	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Ultimate P100	ISA/PCI	Award (1.0a)
Mind Computer Products	Ultimate P100	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Ultimate P120	ISA/PCI	Award (1.0a)
Mind Computer Products	Ultimate P120	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Ultimate P133	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Ultimate P166	ISA/PCI	Phoenix (4.04 v2.4)
Mind Computer Products	Ultimate P166	ISA/PCI	Award (11/6/95)
Mind Computer Products	Ultimate P75	ISA/PCI	Award (1.0a)
Mind Computer Products	Ultimate P75	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Ultimate P90	ISA/PCI	Award (1.0a)
Mind Computer Products	Ultimate P90	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value 599-100	ISA/PCI	Award (1.0a)
Mind Computer Products	Value 599-100	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value 599-120	ISA/PCI	Award (1.0a)
Mind Computer Products	Value 599-120	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value 599-133	ISA/PCI	Award (1.0a)
Mind Computer Products	Value 599-133	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value 599-75	ISA/PCI	Award (1.0a)
Mind Computer Products	Value 599-75	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value 599-90	ISA/PCI	Award (1.0a)
Mind Computer Products	Value 599-90	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value 601-100	ISA/PCI	Award (1.0a)
Mind Computer Products	Value 601-100	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value 601-120	ISA/PCI	Award (1.0a)
Mind Computer Products	Value 601-120	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value 601-133	ISA/PCI	Award (1.0a)
Mind Computer Products	Value 601-133	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value 601-75	ISA/PCI	Award (1.0a)
Mind Computer Products	Value 601-75	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value 601-90	ISA/PCI	Award (1.0a)
Mind Computer Products	Value 601-90	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value P100	ISA/PCI	Award (1.0a)
Mind Computer Products	Value P100	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value P120	ISA/PCI	Award (1.0a)
Mind Computer Products	Value P120	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value P133	ISA/PCI	Award (1.0a)
Mind Computer Products	Value P133	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value P75	ISA/PCI	Award (1.0a)
Mind Computer Products	Value P75	ISA/PCI	Phoenix (2.4)
Mind Computer Products	Value P90	ISA/PCI	Award (1.0a)
Mind Computer Products	Value P90	ISA/PCI	Phoenix (2.4)
Mips	TCI Professional	PCI	Ami/Acer (1.30)
MITAC	DV4500AM/A	PCI	Award (4.50.95)
MITAC	DV4500AM/I	PCI	Award (4.50.95)
MITAC	DV4500AU/A	PCI	Award (4.50.95)
MITAC	DV4500AU/C	PCI	Award (4.50.95)
MITAC	DV5400 /I	PCI	Award (4.50.75)
MITAC	MPC-DMXXPS	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
MITAC	MPC-FMXXPS	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
MITAC	MPC-MMXXPS	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
MITAC	P5/Win95	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
MITAC	Performance 5500 Series	ISA/PCI	Award (4.07g800)
MITAC	PH5400V	ISA/PCI	Box
MITAC	PURSUIT/SP	ISA/PCI	Box
MITAC	TD4500AM/A	PCI	Award (4.50.95)
MITAC	TD4500AM/I	PCI	Award (4.50.95)
MITAC	TD4500AU/A	PCI	Award (4.50.95)
MITAC	TD4500AU/C	PCI	Award (4.50.95)
MITAC	TD5400D/I	PCI	Award (4.50.75)
MITAC	TM4077H	VLB	Award (4.50.95)
MITAC	TM4500AM/A	PCI	Award (4.50.95)
MITAC	TM4500AM/I	PCI	Award (4.50.95)
MITAC	TM4500AU/A	PCI	Award (4.50.95)
MITAC	TM4500AU/C	PCI	Award (4.50.95)
MITAC	TM5400D/I	PCI	Award (4.50.75)
Mitsuba	Basic Pentium	ISA/PCI	AMI/Intel (1.00.03.CB0)
Mitsuba	Pentium Premier	ISA/PCI	AMI/Intel (1.00.03.CB0)
Mitsubishi	XEN-PC M3456-A127W	ISA/PCI	IBM Surepath (1.3)
Mitsubishi	XEN-PC M3456-C154M	ISA/PCI	IBM Surepath (1.3)
Mitsubishi	XEN-PC M3456-C154W	ISA/PCI	IBM Surepath (1.3)
Mitsubishi	XEN-PC M3466-A154W	ISA/PCI	IBM Surepath (1.3)
Mitsubishi	XEN-PC M3466-B173W	ISA/PCI	IBM Surepath (1.3)
Mitsubishi	XEN-PC M3476-A110M	ISA/PCI	IBM Surepath (1.3)
Mitsubishi	XEN-PC M3476-A110W	ISA/PCI	IBM Surepath (1.3)
Multitech Electronics	OCS P100	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	OCS P100XE	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	OCS P120	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	OCS P120XE	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	OCS P133	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	OCS P133XE	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	OCS P75	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	OCS P75XE	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	OCS P90	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	OCS P90XE	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	Olive Computer Systems OCS 4100P4	ISA/PCI/VL	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Multitech Electronics	Pro-Spec P100	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	Pro-Spec P100XE	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	Pro-Spec P120	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	Pro-Spec P120XE	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	Pro-Spec P133	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	Pro-Spec P133XE	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	Pro-Spec P75	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	Pro-Spec P75XE	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	Pro-Spec P90	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	Pro-Spec P90XE	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
Multitech Electronics	Pro-Spec PS4100P4	ISA/PCI/VL	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Mustek	BROTHER BCR4586P	PCI	Award (4.50PG)
Mustek	BROTHER BCR5586P	PCI	Award (4.50PG)
Mustek	BROTHER BCR8586P	PCI	Award (4.50PG)
Mustek	BROTHER BCT4486	PCI	Award (4.50PG)
Mustek	BROTHER BCT4586	PCI	Award (4.50PG)
Mustek	BROTHER BCT5486	PCI	Award (4.50PG)
Mustek	BROTHER BCT5586	PCI	Award (4.50PG)
Mustek	BROTHER BCT8486	PCI	Award (4.50PG)
Mustek	BROTHER BCT8586	PCI	Award (4.50PG)
Mustek	MECER5486-PIO	PCI	Award (4.50PG)
Mustek	MECER5P54C	PCI	Award (4.50PG)
Mustek	MECER5P54C-PIO	PCI	Award (4.50PG)
Mustek	MECER7486-PIO	PCI	Award (4.50PG)
Mustek	MECER7P54-PIO	PCI	Award (4.50PG)
Mustek	MECER7P54C	PCI	Award (4.50PG)
Mynix Technology	MYCOMP Pentium P5	ISA/PCI	Award (4.50 gp)
Mynix Technology	MYCOMP Pentium P5	ISA/PCI	AMI (10-10-94)
Mynix Technology	MYCOMP Pentium P5 100	ISA/PCI	AMI (10-10-94)
Mynix Technology	MYCOMP PENTIUM P5 DESKTOP	ISA/PCI	Award (4.50 gp)
Mynix Technology	MYCOMP PENTIUM P5 TOWER	ISA/PCI	Award (4.50 gp)
Mynix Technology	MYCOMP Pentium P5-100 DESKTOP	ISA/PCI	AMI (10-10-94)
Mynix Technology	MYCOMP Pentium P5-100 TOWER	ISA/PCI	AMI (10-10-94)
Mynix Technology	MYCOMP Vantage Pentium	ISA/PCI	AMI (10-10-94)
NEC	PowerMate P120	ISA/PCI	AMI/Intel (0.01.01.CQOK)
NEC	PowerMate P133	ISA/PCI	AMI/Intel (0.01.01.CQOK)
NEC	PowerMate P150	ISA/PCI	Phoenix (0.01.03)
NEC	PowerMate P150 MultiMedia	ISA/PCI	Phoenix (0.01.03)
NEC	PowerMate P166	ISA/PCI	Phoenix (0.01.03)
NEC	PowerMate P166 Multimedia	ISA/PCI	Phoenix (0.01.03)
NEC	PowerMate SS	ISA/PCI	Phoenix (4.05.2)
NEC	PowerMate V	ISA/PCI	Phoenix (4.05.2)
NEC	PowerMate V100	ISA/PCI	Phoenix (4.05.2)
NEC	PowerMate V100	ISA/PCI	Phoenix (4.05M)
NEC	PowerMate V120e	ISA/PCI	Phoenix (V00.02.20)
NEC	PowerMate V133	ISA/PCI	Phoenix (4.05M)
NEC	PowerMate V75	ISA/PCI	Phoenix (4.05M)
NEC	PowerMate V75	ISA/PCI	Phoenix (4.05.2)
NEC	PowerMate V90	ISA/PCI	Phoenix (4.05M)
NEC	PowerMate V90	ISA/PCI	Phoenix (4.05.2)
NEC	Ready 7022	ISA/PCI	Phoenix (4.05.2)
NEC	Ready 7610	ISA/PCI	Phoenix (0.04.03)
NEC	Ready 7612	ISA/PCI	Phoenix (0.04.03)
NEC	Ready 7614	ISA/PCI	Phoenix (0.04.03)
NEC	Ready 9012	ISA/PCI	Phoenix (4.05.2)
NEC	Ready 9022	ISA/PCI	Phoenix (4.05.2)
NEC	Ready 9522	ISA/PCI	Phoenix (4.05.2)
NEC	Ready 9532	ISA/PCI	AMI/Intel (0.01.01.CQOK)
NEC	Ready 9542	ISA/PCI	AMI/Intel (0.01.01.CQOK)
NEC	Ready 9615	ISA/PCI	Phoenix (0.04.03)
NEC	Ready 9616	ISA/PCI	Phoenix (0.04.03)
NEC	Ready 9617	ISA/PCI	Phoenix (0.04.03)
NEC	Ready 9618	ISA/PCI	Phoenix (0.04.03)
NEC	Ready 9619	ISA/PCI	Phoenix (0.04.03)
NETiS Technology	PowerStation N5100	ISA/PCI	Award (T1.0T)
NETiS Technology	PowerStation N5120	ISA/PCI	Award (T1.0T)
NETiS Technology	PowerStation N5133	ISA/PCI	Award (T1.0T)
NETiS Technology	PowerStation N575	ISA/PCI	Award (T1.0T)
NETiS Technology	PowerStation N590	ISA/PCI	Award (T1.0T)
Network Data AB	Crimson	ISA/PCI	Award (0112 PnP)
Network Data AB	Magenta	ISA/PCI	AMI/Intel (1.00.04.BS0)
Network Data AB	Sienna	ISA/PCI	Award (I7)
Northern Micro	P5I	PCI	AWARD (4.50PG  401A0-0113)
Ocean Interface	OceanP586BT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Ocean Interface	OceanP586LT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Ocean Interface	OceanP586MAT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Ocean Interface	OceanP586MT	ISA/PCI	AMI/Intel (1.00.03.BS0)
OKI	ifStation 5100/DX	ISA/PCI	Acer (2.0)
OKI	ifStation 5133/DX	ISA/PCI	Acer (2.0)
OKI	ifStation 575/DX	ISA/PCI	Acer (2.0)
Olidata	MDS OL8449	PCI	AMI (EXP8449 1.1)
Olidata	MDS P-120/C	ISA/PCI	AMI/Intel (1.00.03.CB0)
Olidata	MDS P-75B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	MDS P-90/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	MiniTower OL 8449	PCI	AMI (EXP8449 1.1)
Olidata	MINITOWER P-120/C	ISA/PCI	AMI/Intel (1.00.03.CB0)
Olidata	MINITOWER P-75/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	MINITOWER P-90/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	MM P-120/C	ISA/PCI	AMI/Intel (1.00.03.CB0)
Olidata	MM P-75/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	MM P-90/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	QDS OL 8449	PCI	AMI (EXP8449 1.1)
Olidata	QDS P-120/C	ISA/PCI	AMI/Intel (1.00.03.CB0)
Olidata	QDS P-75/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	QDS P-90/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	QMN P-120/C	ISA/PCI	AMI/Intel (1.00.03.CB0)
Olidata	QMN P-75/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	QMN P-90/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	QPIN OL 8449	PCI	AMI (EXP8449 1.1)
Olidata	QSL OL 8449	PCI	AMI (EXP8449 1.1)
Olidata	QSL P-120/C	ISA/PCI	AMI/Intel (1.00.03.CB0)
Olidata	QSL P-75/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	QSL P-90/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	QTW OL 8449	PCI	AMI (EXP8449 1.1)
Olidata	QTW P-120/C	ISA/PCI	AMI/Intel (1.00.03.CB0)
Olidata	QTW P-75/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	QTW P-90/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	SLIM P-120/C	ISA/PCI	AMI/Intel (1.00.03.CB0)
Olidata	SLIM P-75/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	SLIM P-90/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	TOWER OL 8449	PCI	AMI (EXP8449 1.1)
Olidata	TOWER P-120/C	ISA/PCI	AMI/Intel (1.00.03.CB0)
Olidata	TOWER P-75/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olidata	TOWER P-90/B	ISA/PCI	AMI/Intel (1.00.03.BS0)
Olivetti	Envision P75	ISA/VL	AMI (2.01-W)
Olivetti	M24 new P100	ISA/PCI	AMI (1.08)
Olivetti	M24 new P100	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	M24 new P133	ISA/PCI	AMI (1.08)
Olivetti	M24 new P166	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	M24 new P75	ISA/PCI	AMI (1.08)
Olivetti	M24 new P75	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	Modulo M4-100	ISA/PCI	AMI (1.08)
Olivetti	Modulo M4-100/S	ISA/PCI	AMI (1.08)
Olivetti	Modulo M4-564	ISA/PCI	AMI (1.12)
Olivetti	Modulo M4-564 w/LAN	ISA/PCI	AMI (1.12)
Olivetti	Modulo M4-564S	ISA/PCI	AMI (1.12)
Olivetti	Modulo M4-564S w/LAN	ISA/PCI	AMI (1.12)
Olivetti	Modulo M4-584	ISA/PCI	AMI (1.15)
Olivetti	Modulo M4-584 w/LAN/AUDIO	ISA/PCI	AMI (1.12)
Olivetti	Modulo M4-584S	ISA/PCI	AMI (1.15)
Olivetti	Modulo M4-584S w/LAN/AUDIO	ISA/PCI	AMI (1.12)
Olivetti	Modulo M4-75	ISA/PCI	AMI (1.08)
Olivetti	Modulo M4-75/S	ISA/PCI	AMI (1.08)
Olivetti	Modulo M4-90	ISA/PCI	AMI (1.08)
Olivetti	Modulo M4-90/S	ISA/PCI	AMI (1.08)
Olivetti	Modulo M4-P100	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	Modulo M4-P100 S	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	Modulo M4-P133	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	Modulo M4-P133i	ISA/PCI	Ami Bios (1.00.04.cld)
Olivetti	Modulo M4-P150	ISA/PCI	AMI (1.08)
Olivetti	Modulo M4-P150	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	Modulo M4-P150S	ISA/PCI	AMI (1.08)
Olivetti	Modulo M4-P150S	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	Modulo M4-P166	ISA/PCI	AMI (1.08)
Olivetti	Modulo M4-P166	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	Modulo M4-P166S	ISA/PCI	AMI (1.08)
Olivetti	Modulo M4-P166S	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	Modulo M4-P75	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	Modulo M4-P75 S	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	Modulo P-100-L	ISA/PCI	AMIBios (1.06.01.CV24)
Olivetti	Modulo P-100-T	ISA/PCI	Box
Olivetti	Modulo P-120-L	ISA/PCI	AMIBios (1.06.01.CV24)
Olivetti	Modulo P-120-T	ISA/PCI	Box
Olivetti	Modulo P-133-L	ISA/PCI	AMIBios (1.06.01.CV24)
Olivetti	Modulo P-133-T	ISA/PCI	Box
Olivetti	Modulo P-150-L	ISA/PCI	AMIBios (1.06.01.CV24)
Olivetti	Modulo P-150-T	ISA/PCI	Box
Olivetti	Modulo P-166-L	ISA/PCI	AMIBios (1.06.01.CV24)
Olivetti	Modulo P-166-L	ISA/PCI	AMIBios (1.06.01.CV24)
Olivetti	Modulo P-166-T	ISA/PCI	Box
Olivetti	Modulo P-166-T	ISA/PCI	Box
Olivetti	Modulo P-200-L	ISA/PCI	AMIBios (1.06.01.CV24)
Olivetti	Modulo P-200-T	ISA/PCI	Box
Olivetti	Olivetti Modulo M4-P100i	ISA/PCI	Ami Bios (1.00.04.cld)
Olivetti	Olivetti Modulo M4-P75i	ISA/PCI	Ami Bios (1.00.04.cld)
Olivetti	Olivetti Modulo M4-P90i	ISA/PCI	Ami Bios (1.00.04.cld)
Olivetti	PCS 5120	ISA/PCI	AMI (1.08)
Olivetti	PCS 5120	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	PCS 5130	ISA/PCI	AMI (1.08)
Olivetti	PCS 5130	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	PCS 5140	ISA/PCI	AMI (1.08)
Olivetti	PCS 5140	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	PCS 5150	ISA/PCI	AMI (1.08)
Olivetti	PCS 5150	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	PCS 5160	ISA/PCI	AMI (1.08)
Olivetti	PCS 5160	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	PCS 6120	ISA/PCI	AMI (1.08)
Olivetti	PCS 6120	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	PCS 6130	ISA/PCI	AMI (1.08)
Olivetti	PCS 6130	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	PCS 6140	ISA/PCI	AMI (1.08)
Olivetti	PCS 6140	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	PCS 6150	ISA/PCI	AMI (1.08)
Olivetti	PCS 6150	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	PCS 6160	ISA/PCI	AMI (1.08)
Olivetti	PCS 6160	ISA/PCI	AMI (Resident Diagnostic rev 1.00)
Olivetti	PCS D4/100En	ISA/PCI	AMI (1.15)
Olivetti	PCS D4/100n	ISA/PCI	AMI (1.15)
Olivetti	PCS DX/66En	ISA/PCI	AMI (1.12)
Olivetti	PCS DX/66n	ISA/PCI	AMI (1.12)
Olivetti	PCS P/100 E	ISA/PCI	AMI (1.08)
Olivetti	PCS P/100 En	ISA/PCI	AMI (1.08)
Olivetti	PCS P/133 E	ISA/PCI	AMI (1.08)
Olivetti	PCS P/133 En	ISA/PCI	AMI (1.08)
Olivetti	PCS P/75 E	ISA/PCI	AMI (1.08)
Olivetti	PCS P/90 E	ISA/PCI	AMI (1.08)
Olivetti	Suprema M6-650	ISA/PCI	AMI (1.07)
Olivetti	Suprema M6-670	ISA/PCI	AMI (1.07)
Olivetti	Suprema M6-680	ISA/PCI	AMI (1.07)
Olivetti	xana 53-120	ISA/PCI	AMI (1.08)
Olivetti	xana 53-133	ISA/PCI	AMI (1.08)
Olivetti	xana 53-150	ISA/PCI	AMI (1.08)
Olivetti	xana 53-166	ISA/PCI	AMI (1.08)
Olivetti	xana 53-200	ISA/PCI	AMI (1.08)
Olivetti	xana 73-120	ISA/PCI	AMI (1.08)
Olivetti	xana 73-133	ISA/PCI	AMI (1.08)
Olivetti	xana 73-150	ISA/PCI	AMI (1.08)
Olivetti	xana 73-166	ISA/PCI	AMI (1.08)
Olivetti	xana 73-200	ISA/PCI	AMI (1.08)
Omni Tech	OTC-5200	ISA/PCI	Phoenix (05P)
Omni Tech	OTC-5200	ISA/PCI	AMI/Intel (1.00.03.BS0)
Omni Tech	OTC-5300	ISA/PCI	AMI/Intel (1.00.03.BS0)
Omni Tech	OTC-5300	ISA/PCI	AMI/Intel (1.00.03.BS0)
Omni Tech	OTC-5300	ISA/PCI	Phoenix (05P)
Omni Tech	OTC-5400	ISA/PCI	Phoenix (05P)
Omni Tech	OTC-5500	ISA/PCI	Phoenix (05P)
Omni Tech	OTC-5600	ISA/PCI	Phoenix (05P)
Omni Tech	OTC-5700	ISA/PCI	Phoenix (05P)
Omni Tech	OTC-5800	ISA/PCI	Phoenix (05P)
Opti Use	EMS P5075	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Opti Use	EMS P5090W	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Opti Use	EMS P5090WS	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Opti Use	EMS P5100W	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Opti Use	EMS P5100WS	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Opti Use	EMS P5120W	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Opti Use	EMS P5120WS	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Opti Use	EMS P5133W	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Opti Use	EMS P5133WS	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Optima Computer Technology	OCT P5-90 PCI	ISA/PCI	AMI/Intel (1.00.03.BS0)
Optima Computer Technology	OCT P5-90 PCI Multimedia System	ISA/PCI	AMI/Intel (1.00.03.BS0)
Optimus	5P100Z	ISA/PCI	AMI/Intel (1.00.03.BS0)
Optimus	5P120Z	ISA/PCI	AMI/Intel (1.00.03.BS0)
Optimus	5P133Z	ISA/PCI	AMI/Intel (1.00.03.BS0)
Optimus	5P75Z	ISA/PCI	AMI/Intel (1.00.03.BS0)
Optimus	5P90E	ISA/PCI	AMI/Intel (1.00.03.CB0)
Optimus	5P90Z	ISA/PCI	AMI/Intel (1.00.03.BS0)
Optimus	Optimus SA 5P100E	ISA/PCI	AMI/Intel (1.00.03.CB0)
Optimus	Optimus SA 5P120E	ISA/PCI	AMI/Intel (1.00.03.CB0)
Optimus	Optimus SA 5P133E	ISA/PCI	AMI/Intel (1.00.03.CB0)
Optimus	Optimus SA 5P75E	ISA/PCI	AMI/Intel (1.00.03.CB0)
Opus Technology	Prestige P120	ISA/PCI	Award (W975)
Opus Technology	Prestige P133	ISA/PCI	Award (W975)
Opus Technology	Prestige P150	ISA/PCI	Award (W975)
Opus Technology	Prestige P75	ISA/PCI	Award (W975)
Opus Technology	Prestige P90	ISA/PCI	Award (W975)
Opus Technology	Prestige Pentium Series	ISA/PCI	Award (W975)
Oy Mikrolog	Osborne Multimedia P100	ISA/PCI	Award (4.50 PG ra0)
Oy Mikrolog	Osborne Multimedia P120	ISA/PCI	Award (4.50 PG ra0)
Oy Mikrolog	Osborne Multimedia P133	ISA/PCI	Award (4.50 PG ra0)
Oy Mikrolog	Osborne Multimedia P75	ISA/PCI	Award (4.50 PG ra0)
Oy Mikrolog	Osborne Multimedia P90	ISA/PCI	Award (4.50 PG ra0)
Oy Mikrolog	Osborne Power P100	ISA/PCI	Award (4.50PC u.1.11)
Oy Mikrolog	Osborne Power P120	ISA/PCI	Award (4.50PC u.1.11)
Oy Mikrolog	Osborne Power P133	ISA/PCI	Award (4.50PC u.1.11)
Oy Mikrolog	Osborne Power P75	ISA/PCI	Award (4.50PC u.1.11)
Oy Mikrolog	Osborne Pro P100	ISA/PCI	Award (4.50 PG ra0)
Oy Mikrolog	Osborne Pro P120	ISA/PCI	Award (4.50 PG ra0)
Oy Mikrolog	Osborne Pro P133	ISA/PCI	Award (4.50 PG ra0)
Oy Mikrolog	Osborne Pro P75	ISA/PCI	Award (4.50 PG ra0)
Oy Mikrolog	Osborne Pro P90	ISA/PCI	Award (4.50 PG ra0)
Packard Bell	Axcel 11	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 215 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 251 CD Plus	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 251CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 255CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 41CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 42CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 43CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 44CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 450 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 455 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 456 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 457 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 459 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 45CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 461 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 461 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 463 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 46CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 47CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 48CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 49CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 51CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 52 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 62CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 830 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 831 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 832 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 833 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 834 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 835 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 837 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 840 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 841 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 978CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 981 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 983 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 991 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 997 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Axcel 998 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Axcel 41CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Axcel 43CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Axcel 46CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Axcel 48CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Executive 1000CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Executive 1001	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Executive 1001T	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Executive 466	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Executive 750	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Executive 751	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Executive 755CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Force 261CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Force 51CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Force 53CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Force 55CDT PLS	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Force14	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Legend 10CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Legend 11CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Legend 204CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Legend 205CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Legend 207CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Legend 20CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Legend 32CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Legend 35CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Legend 81CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- Legend 85CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- PB 10CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Canada- PB 11CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive (Tower) 750	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 1000CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 1001	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 1001 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 1001T	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 225 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 400	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 400NG	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 400T	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 4010CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 4011CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 4020CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 4021CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 466	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 466NG	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 481 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 487 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 750	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 751	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 755 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 755CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 854 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Executive 856 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 14	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 15	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 16	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 261 CD Plus	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 261CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 277CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 280 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 480 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 482 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 482 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 484 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 486 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 488 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 490 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 50CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 51CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 52CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 53CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 54CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 55CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 55CDT Plus	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 56CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 57CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 57CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 58CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 59CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 860 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 862 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 865 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 872 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 949CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 982 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 987 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 998 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Force 999 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 102 CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 106 CDT SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 10CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 10CD+	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 110 CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 11CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 12CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 130 CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 132 CDT SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 134 CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 136 CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 140 CDT SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 14CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 15CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 16CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 17CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 18CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 19CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 201CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 202CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 204 CD Plus	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 204CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 205*CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 207CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 208CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 20CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 210 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 21CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 22CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 23CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 24 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 25CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 26CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 27CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 28CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 29TV	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 32CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 34CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 35CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 36CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 37CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 38CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 39CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 4	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 401 CD	ISA/PCI	Intel (?)
Packard Bell	Legend 403 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 404 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 405 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 406 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 408 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 40CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 410 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 412 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 416 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 420 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 422 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 423 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 42CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 5	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 61CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 62CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 63CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 64TV	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 7CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 812 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 813 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 814 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 815 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 816 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 816 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 81CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 822CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 823 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 824 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 825 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 85 CD SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 850 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 8CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 937 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 940 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 941 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 944 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 980 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 982 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 990 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 994 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend 9CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Legend108 CDT SUP	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Pack-Mate 28+	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Pack-Mate 3000 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Pack-Mate 4100 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Pack-Mate 5000 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Pack-Mate 5200 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Pack-Mate 5400 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Pack-Mate 74CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PB 10CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PB 10CD+	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PB 11CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PB 1700 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PB 1750 CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PB 20CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PB 20CD+	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PB 28CDT	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PB 4235 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PB 650 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PRO 208 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	PRO 66TV	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Spectra 200	ISA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Packard Bell	Spectria 100 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Spectria 200 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Spectria 200 CDQ	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Spectria 300 CDQ	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Spectria 310 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Spectria 320 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Packard Bell	Spectria 400 CD	ISA/PCI	AMI/Intel (1.00.03.BS0)
Pacomp	Champ 486	PCI	Award (301)
Pacomp	Pentium Champ	PCI	Award (110-4)
Patriot Computer	D5100P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	D5120P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	D5133P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	D575P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	D590P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	F5100P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	F5120P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	F5133P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	F575P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	F590P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	M5100P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	M5120P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	M5133P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	M575P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	M590P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	T5100P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	T5120P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	T5133P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	T575P	PCI	AMI/Intel (1.00.04.BS0)
Patriot Computer	T590P	PCI	AMI/Intel (1.00.04.BS0)
PC Club	PRO 75	ISA/PCI	AMI/Intel (1.00.03.BS0)
PC Direct	560Si	ISA/PCI	Phoenix (PhoenixBIOS Version 4.04  PLUG and PLAY)
PC Direct	560Ti	ISA/PCI	Award (Award Plug and Play BIOS Extension v1.0A)
PC Direct	565Ti	ISA/PCI	Award (1.0A Plug&Play)
PC Direct	Discovery 540	ISA/PCI	Phoenix (PhoenixBIOS Version 4.04  PLUG and PLAY)
PC Direct	Discovery 545	ISA/PCI	Award (PCD 1.5B)
PCWarehouse	Kenitec PCI 90	ISA/PCI	Phoenix (4.04PNP)
PCWarehouse	Kenitec PCI CD Line	ISA/PCI	Phoenix (4.04PNP)
PCWarehouse	Kenitec PCI Multimedia	ISA/PCI	Phoenix (4.04PNP)
Peacock	Performance 486	PCI	Phoenix (UM8810 2.0b 07/12/95)
Peacock	Performance Pentium	PCI	Award (4.50G 7/20/95)
Peacock	Take 486	PCI	Phoenix (UM8810 2.0b 07/12/95)
Peacock	TAKE Pentium	PCI	Phoenix (SI54 V1.5 6/14/95)
Philips	E522	ISA/PCI	Box
Philips	E532	ISA/PCI	Box
Philips	SN-5 Series (MiniTower)	PCI	Phoenix (2.1)
Philips	SN-520M	PCI	Phoenix (2.1)
Pionex	V - Series	ISA/PCI	Box
Planhold Computers	PowerStation PL5-90	ISA/PCI	AMI (1)
Pohjanmaan Mikro	Pomi P100	ISA/PCI	AMI/Intel (1.00.03.BS0)
Pohjanmaan Mikro	Pomi P120	ISA/PCI	AMI/Intel (1.00.03.BS0)
Pohjanmaan Mikro	Pomi P133	ISA/PCI	AMI/Intel (1.00.03.BS0)
Pohjanmaan Mikro	Pomi P75	ISA/PCI	AMI/Intel (1.00.03.BS0)
Pohjanmaan Mikro	Pomi P90	ISA/PCI	AMI/Intel (1.00.03.BS0)
ProGEN Technology	GENX	ISA/PCI	AMI/Intel (1.00.03.CB0)
ProSys-Tec	ProSys Computer	ISA/PCI	Intel (1.00.03.CB0)
Quantex	V- Series	ISA/PCI	Box
Quantum Designs	QDI-586 PCI	PCI	AMI (1.2)
RASK Engros	REC Power-Line P5-100i	ISA/PCI	AMI (C55 PI A06)
RASK Engros	REC Power-Line P5-120i	ISA/PCI	AMI (C55 PI A06)
RASK Engros	REC Power-Line P5-133i	ISA/PCI	AMI (C55 PI A06)
RASK Engros	REC Power-Line P5-75i	ISA/PCI	AMI (C55 PI A06)
RASK Engros	REC Power-Line P5-90i	ISA/PCI	AMI (C55 PI A06)
Research Machines	Cadstation	PCI	AMI (1)
Research Machines	PC 5166 Pro	PCI	Intel (1.00.01)
Research Machines	PC-400	PCI	AMI (AG55)
Research Machines	PC-400 Professional	PCI	AMI (AG55)
Research Machines	PC4100 Accelerator	PCI	AMI (AG55)
Research Machines	PC500 Accelerator	PCI	AMI (1)
Research Machines	PC575 Professional	PCI	AMI (1)
Research Machines	RM PC-400 Accelerator	PCI	AMI (AG55)
Richfield Computers	Digitek P5-100 PCI	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Richfield Computers	Digitek P5-120 PCI	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Richfield Computers	Digitek P5-133 PCI	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Richfield Computers	Digitek P5-75 PCI	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Richfield Computers	Digitek P5-90 PCI	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Ricoh	Mr. MYTOOL CORE II	ISA/PCI	Acer (2.0)
Royal Computer	Media	ISA/PCI	AMI/Intel (1.00.03.CB0)
Royal Computer	Media Master	ISA/PCI	AMI/Intel (1.00.03.CB0)
Royal Computer	Media ProDesk	ISA/PCI	AMI/Intel (1.00.03.CB0)
Royal Computer	Power Media	ISA/PCI	AMI/Intel (1.00.03.CB0)
Royal Computer	Publishing	ISA/PCI	AMI/Intel (1.00.03.CB0)
Royal Computer	Ultra Media	ISA/PCI	AMI/Intel (1.00.03.CB0)
Royal Computer	Win95 Media	ISA/PCI	AMI/Intel (1.00.03.CB0)
RST Data	586-100	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
RST Data	586-133	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
RST Data	586-150	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
RST Data	586-75	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
RST Data	586-90	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
S.G.	Flyer P75S	ISA/PCI	AMI/Intel (1.00.03.BS0)
S.G.	Flyer P90S	ISA/PCI	AMI/Intel (1.00.03.BS0)
S.H.R. Informatica	SHR Series DX4/100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
S.H.R. Informatica	SHR Series Pentium 100	ISA/PCI	Phoenix (4.50PG 401A0-0110-4)
Samsung	M501D	PCI/ISA	Phoenix (4.05)
Samsung	M502D	PCI/ISA	Phoenix (4.05)
Samsung	M510D	PCI/ISA	Phoenix (4.05)
Samsung	Power Master 5(PM5)	ISA/PCI	Phoenix (Nubios 4.04)
Samsung	SPC 7800P-MM254Q	ISA/PCI	Phoenix (Nubios 4.04)
Samsung	SPC 7800P-MM254U	ISA/PCI	Phoenix (Nubios 4.04)
Samsung	SPC 8220P	ISA/PCI	Phoenix (Nubios 4.04)
Samsung	SPC 8320P	PCI/ISA	Phoenix (4.05)
Samsung	SPC 8340P	ISA/PCI	Phoenix (4.05)
Samsung	SPC7800P-MW254U	ISA/PCI	Phoenix (Nubios 4.04)
Samsung	SPC8200P	ISA/PCI	Phoenix (Nubios 4.04)
Samsung	SPC8210P	ISA/PCI	Phoenix (Nubios 4.04)
Samsung	SPC8220 MMIIGH	ISA/PCI	Phoenix (4.04 05HH)
Samsung	SPC8230P	ISA/PCI	Phoenix (Nubios 4.04)
Samsung	SPC8250P	ISA/PCI	Phoenix (Nubios 4.04)
Samsung	SPC8260 AM21GH	ISA/PCI	Phoenix (4.04 05HH)
Samsung	SPC8260P	ISA/PCI	Phoenix (Nubios 4.04)
Samsung	SPC8330P	ISA/PCI	Phoenix (4.04 05HH)
Samsung	SPC8350P	ISA/PCI	Phoenix (4.04 05HH)
Samsung	SPC8500PA 133	EISA/PCI	Phoenix (4.05  10AH.6    8/21/95)
Samsung	SPC8500PA 133 DP	EISA/PCI	Phoenix (4.05  10AH.6    8/21/95)
Samsung	SWS520/100	EISA/PCI	Phoenix (4.05  10AH.6    8/21/95)
Samsung	SWS520/100 DP	EISA/PCI	Phoenix (4.05  10AH.6    8/21/95)
Samsung	SWS520/133	EISA/PCI	Phoenix (4.05  10AH.6    8/21/95)
Samsung	SWS520/133 DP	EISA/PCI	Phoenix (4.05  10AH.6    8/21/95)
Sanyo	MBC-21CV10A	ISA	IBM (?)
Sanyo	MBC-21CV10A	ISA	IBM (?)
Sanyo	MBC-21CVM5A	ISA	IBM (?)
Sanyo	MBC-21CW10	ISA	IBM (?)
Sanyo	MBC-21CWM5	ISA	IBM (?)
Seanix Technology	ASI 9000 9P512LI16G	ISA/PCI	AMI/Intel (1.00.03.CB0)
Seanix Technology	ASI 9000 9P513LI16G	ISA/PCI	AMI/Intel (1.00.03.CB0)
Seanix Technology	ASI 9000 9P575LI08E	ISA/PCI	AMI/Intel (1.00.03.CB0)
Seanix Technology	ASI 9000 9P599LI16G	ISA/PCI	AMI/Intel (1.00.03.CB0)
Seanix Technology	ASI 9000 P/100 Multimedia	ISA/PCI	Box
Seanix Technology	ASI Pro ASP13EL16I	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP13EM16I	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP13EM32J	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP13FL16L	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP13FM16I	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP13FM32J	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP15EL16I	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP15EM32J	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP15FL16I	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP15FM32J	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP16EL32J	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP16EM32J	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP16FL32J	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP16FM32J	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP20EL32J	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro ASP20EM32J	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro Pentium 100	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro Pentium 120	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro Pentium 133	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro Pentium 150	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro Pentium 166	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro Pentium 200	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro Pentium 75	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro QUE12C5	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro QUE12C8	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro QUE15C6	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro QUE15C7	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro QUE15C9	ISA/PCI	AMI (1.00.04.DB0)
Seanix Technology	ASI Pro QUE99C4	ISA/PCI	AMI (1.00.04.DB0)
Sherry International Computer	Power Pro Series	PCI	Award (4.50PG)
Sidus Systems	Formula SCI9166E/Q	PCI	Award (4.50PG)
Sidus Systems	Globalyst 620	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Sidus Systems	Globalyst 630	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Sidus Systems	SCI-975E/HI	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Sidus Systems	SCI9075E/Q	PCI	Award (4.50PG)
Sidus Systems	SCI9090E/Q	PCI	Award (4.50PG)
Sidus Systems	SCI9100E/Q	PCI	Award (4.50PG)
Sidus Systems	SCI9120E/Q	PCI	Award (4.50PG)
Sidus Systems	SCI9133E/Q	PCI	Award (4.50PG)
Sidus Systems	SCI9150E/Q	PCI	Award (4.50PG)
Siemens Nixdorf	PCD-4H/PCI	ISA/PCI	Phoenix (4.04 1.04A.882.12)
Siemens Nixdorf	PCD-4L/PCI	ISA/PCI	Phoenix (4.04 1.04A.882.12)
Siemens Nixdorf	PCD-5H/100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	PCD-5H/120	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	PCD-5H/133	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	PCD-5H/75	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	PCD-5H/90	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	PCD-5L/100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	PCD-5L/75	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	PCD-5TG/75	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	PCD-5TG/90	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	PRIMERGY 150/120	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	PRIMERGY 150/75	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	PRIMERGY 150/90	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	Scenic 4H/PCI	ISA/PCI	Phoenix (4.04 1.04A.882.12)
Siemens Nixdorf	Scenic 5H/PCI without audio	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5H/PCI-100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5H/PCI-120	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5H/PCI-133	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5H/PCI-150	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5H/PCI-75	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5H/PCI-90	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5T/PCI-100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5T/PCI-120	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5T/PCI-133	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5T/PCI-150	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5T/PCI-75	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC 5T/PCI-90	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC Basic PT110	ISA/PCI	Phoenix (4.04)
Siemens Nixdorf	SCENIC Basic PT111	ISA/PCI	Phoenix (4.04)
Siemens Nixdorf	Scenic PD101	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	Scenic PD102	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	Scenic PD103	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC PRO C5 (D943/audio)	ISA/PCI	Phoenix (4.05)
Siemens Nixdorf	Scenic PS101	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	Scenic PS102	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	Scenic PS103	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	SCENIC PS104	ISA/PCI	Phoenix (4.04)
Siemens Nixdorf	Scenic PT101	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	Scenic PT102	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	Scenic PT103	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	Scenic PT104	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	Scenic PT105	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	Scenic PT106	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Siemens Nixdorf	Scenic PT107	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Sintronic	Novo 120	ISA/PCI	AMI (A377)
Sintronic	Novo 133	ISA/PCI	AMI (A377)
Sintronic	NP-120K16W	ISA/PCI	AMI (A377)
Sintronic	NP-120K8W	ISA/PCI	AMI (A377)
Sintronic	NP-133K16W	ISA/PCI	AMI (A377)
Sintronic	NP-133K8W	ISA/PCI	AMI (A377)
Sirex	PowerMaster PCI-100	ISA/PCI	Award (4.50PG)
Sirex	PowerMaster PCI-120	ISA/PCI	Award (4.50PG)
Sirex	PowerMaster PCI-133	ISA/PCI	Award (4.50PG)
Sirex	PowerMaster PCI-75	ISA/PCI	Award (4.50PG)
Sirex	PowerMaster PCI-90	ISA/PCI	Award (4.50PG)
Sirex	SpeedMaster PCI-100	ISA/PCI	Award (4.50PG)
Sirex	SpeedMaster PCI-100 (AMD)	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Sirex	SpeedMaster PCI-75	ISA/PCI	Award (4.50PG Si55 AIO V1.4c 12/15/95)
Soft.und Hardware Lindemeyer	Linke Expert T. Series	ISA/PCI	Award (4.50)
Soft.und Hardware Lindemeyer	Lintec Office T. Series	ISA/PCI	Award (4.50)
Solbi	City Desk	ISA/PCI	Award (1.0A rev A4)
Solbi	City Desk MM P100 PROFESSIONAL	ISA/PCI	Award (1.0A rev A4)
Solbi	City Desk MM P75 VALUE	ISA/PCI	Award (1.0A rev A4)
Solbi	City Desk MM P90 CLASSIC	ISA/PCI	Award (1.0A rev A4)
Solbi	City Desk P100 PROFESSIONAL	ISA/PCI	Award (1.0A rev A4)
Solbi	City Desk P120 OFFICE	ISA/PCI	Award (1.0A rev A4)
Solbi	City Desk P130 ELITE	ISA/PCI	Award (1.0A rev A4)
Solbi	City Desk P90 Classic	ISA/PCI	Award (1.0A rev A4)
Sord Computer	SRV-5075	ISA/PCI	Award (2.20)
STD Systems	CompuPartner Freeway 100S4	PCI	AMI/Intel (1.00.03.BS0)
STD Systems	CompuPartner P100	PCI	AMI/Intel (1.00.03.BS0)
STD Systems	CompuPartner Pentium 100	PCI	AMI/Intel (1.00.03.BS0)
STD Systems	STD P100	PCI	AMI/Intel (1.00.03.BS0)
STD Systems	STD Pentium 100	PCI	AMI/Intel (1.00.03.BS0)
Swan Technologies	P5PCI4-D	PCI	Phoenix (4.04.8)
Swan Technologies	P5PCI4-MD	PCI	Phoenix (4.04.8)
Sys Technology	Business "TA" Series	ISA/PCI	Award (4.50PG 2A4IBG3I)
Sys Technology	Business "TT" Series	ISA/PCI	Award (4.50PG 2A4IBG3I)
Sys Technology	Performance "TA" Series	ISA/PCI	Award (4.50PG 2A4IBG3I)
Sys Technology	Performance "TT" Series	ISA/PCI	Award (4.50PG 2A4IBG3I)
SysLink Computer	P5 2X Multimedia	PCI	AMI/Intel (1.00.03.BS0)
SysLink Computer	P5 3X Multimedia System	PCI	AMI/Intel (1.00.03.BS0)
SysLink Computer	P5 4X Multimedia System	PCI	AMI/Intel (1.00.03.BS0)
Tatung	TCS-5150	ISA/PCI	Ami (V1.00)
Tatung	TCS-5210	ISA/PCI	Phoenix (4.04 9300x1)
Tatung	TCS-5230	ISA/PCI	Phoenix (4.04 9300x1)
Tatung	TCS-5290	ISA/PCI	Phoenix (4.04 9300x1)
Tatung	TCS-5450	ISA/PCI	Ami (V1.00)
Tatung	TCS-5510	ISA/PCI	Phoenix (4.04 9300x1)
Tatung	TCS-5610	ISA/PCI	Box
Tatung	TCS-5950	ISA/PCI	Ami (V1.00)
Tatung	TCS-5960	ISA/PCI	AMI (V1.00 A10X)
Tatung	TCS-5990	ISA/PCI	Phoenix (4.04 9300x1)
Tatung	TMP-5000	ISA/PCI	Phoenix (4.04 9300x1)
Teac	A5100DT/P	ISA/PCI	Award (1.12 #401A0-0112)
Teac	T5100DT/P	ISA/PCI	Award (1.12 #401A0-0112)
Teac	T5100TW/H	ISA/PCI	Award (1.12 #401A0-0112)
Teac	T5100TW/P	ISA/PCI	Award (1.12 #401A0-0112)
Teac	T5100TW/S	ISA/PCI	Award (1.12 #401A0-0112)
Teac	T5133 TW/H	ISA/PCI	Award (1.12 #401A0-0112)
Teac	T5133DT/P	ISA/PCI	Award (1.12 #401A0-0112)
Teac	T5133TW/H	ISA/PCI	Award (1.12 #401A0-0112)
Teac	T5133TW/P	ISA/PCI	Award (1.12 #401A0-0112)
Teac	T5133TW/S	ISA/PCI	Award (1.12 #401A0-0112)
Technotex	MultiMedia	ISA/PCI	Box
Technotex	OfficePro	ISA/PCI	Box
Technotex	PowerGraphic	ISA/PCI	Box
Techware Computer Europe	aAT-P075M	ISA/PCI	AMI (1.00.03.BS0)
Todaytech Australia	Moebius P-166	ISA/PCI	Award (V4.50PG)
Topline Computervertiebs	Proline Pentium120	ISA/PCI	Award (4.50 GP    T1.02)
Toshiba Engineering Co.	DynaBook SS450	PCMCIA	Toshiba (1.55)
Toshiba Engineering Co.	J-3100 PV3000 5100/5200	PCI	AMI/Intel (1.00.03.CAOC)
Toshiba Engineering Co.	J-3100 PV3000 575	PCI	AMI/Intel (1.00.03.CAOC)
Toshiba Engineering Co.	PV3000 5100 121S	PCI	Box
Toshiba Engineering Co.	PV3000 5166CD	PCI	Box
Toshiba Engineering Co.	PV5000 5133 101CDS/W95	ISA/PCI	Intel (1.00.01.CH0)
Toshiba Engineering Co.	Windway 20/166S	ISA/PCI	Award (4.50PG)
Total Peripherals	TP Pentim 100 PnP (z)	ISA/PCI	AMI/Intel (1.00.03.BS0)
Total Peripherals	TP Pentim 120 PnP (z)	ISA/PCI	AMI/Intel (1.00.03.BS0)
Total Peripherals	TP Pentim 133 PnP (z)	ISA/PCI	AMI/Intel (1.00.03.BS0)
Total Peripherals	TP Pentim 75 PnP (z)	ISA/PCI	AMI/Intel (1.00.03.BS0)
Total Peripherals	TP Pentim 90 PnP (z)	ISA/PCI	AMI/Intel (1.00.03.BS0)
Total Peripherals	TP Pentium 75(s)	ISA/PCI	Award (4.50PG)
Total Peripherals	TP Pentium 90 PnP	ISA/PCI	Award (4.50G (6/2/95))
Tri-Star Computers	Tri-Star Pentium	PCI	Award (4.50 PG)
TriGem Computer	GemMaster 3430	ISA/PCI	AMI (1.01.084)
TriGem Computer	GemPower 4530	ISA/PCI	AMI (1.01.084)
TriGem Computer	GemPro 2430	ISA/PCI	AMI (1.01.084)
TriGem Computer	TG P54C/DT	ISA/PCI	AMI (1.01.084)
TriGem Computer	TG P54C/EP	ISA/PCI	AMI (1.01.084)
Tulip	Impression Line Comfort 4/100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Impression Line Comfort 4/66	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Impression Line Comfort 5/75	ISA/PCI	Phoenix (R4.04)
Tulip	Impression Line Compact 4/100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Impression Line Compact 4/66	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Impression Line Compact 5/75	ISA/PCI	Phoenix (R4.04)
Tulip	Impression Line Extend 4/100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Impression Line Extend 4/66	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Impression Line Extend 5/75	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line DE 4/100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Vision Line DE 4/66	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Vision Line DE 5/100	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line DE 5/120	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line DE 5/133	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line DE 5/75	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line DE 5/90	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Vision Line DS 4/100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Vision Line DS 4/66	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Vision Line DS 5/100	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line DS 5/120	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line DS 5/133	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line DS 5/75	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line DT 4/100	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Vision Line DT 4/66	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Vision Line DT 5/120	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line DT 5/75	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line DT 5/90	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Vision Line DT 5/90	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line id 4/100	PCMCIA	Phoenix (R4.04)
Tulip	Vision Line TR 5/100	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line TR 5/120	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line TR 5/133	ISA/PCI	Phoenix (R4.04)
Tulip	Vision Line TR 5/90	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Tulip	Vision Line WS 4/66	ISA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Unisys	CMT 510071	ISA/PCI	Award (4.60)
Unisys	CMT 512071	ISA/PCI	Award (4.60)
Unisys	CMT 513371	ISA/PCI	Award (4.60)
Unisys	CMT 57571	ISA/PCI	Award (4.60)
Unisys	CMT 59071	ISA/PCI	Award (4.60)
Unisys	CWP 510032	ISA/PCI	ibm (V2.0)
Unisys	CWP 510062	ISA/PCI	Award (4.60)
Unisys	CWP 512032	ISA/PCI	ibm (V2.0)
Unisys	CWP 512062	ISA/PCI	Award (4.60)
Unisys	CWP 513332	ISA/PCI	ibm (V2.0)
Unisys	CWP 513362	ISA/PCI	Award (4.60)
Unisys	CWP 57532	ISA/PCI	ibm (V2.0)
Unisys	CWP 57562	ISA/PCI	Award (4.60)
Unisys	CWP 59032	ISA/PCI	ibm (V2.0)
Unisys	CWP 59062	ISA/PCI	Award (4.60)
Video Computer	COMPUTER UNION PREMIUM 75	ISA/PCI	AMI/Intel (1.00.03.BS0)
Video Computer	PC MASTER PREMIUM 75	ISA/PCI	AMI/Intel (1.00.03.BS0)
Video Computer	Union Premium 75PCI	ISA/PCI	AMI/Intel (1.00.03.BS0)
Vierci Computers	Home 100+	ISA/PCI	AMI/Intel (1.00.03.CB0)
Vierci Computers	Katana 100	ISA/PCI	AMI/Intel (1.00.03.CB0)
Vierci Computers	Katana 120	ISA/PCI	AMI/Intel (1.00.03.CB0)
Vierci Computers	Katana 133	ISA/PCI	AMI/Intel (1.00.03.CB0)
Vierci Computers	Samurai 100	ISA/PCI	AMI/Intel (1.00.03.BS0)
Vierci Computers	Samurai 120	ISA/PCI	AMI/Intel (1.00.03.BS0)
Vierci Computers	Samurai 133	ISA/PCI	AMI/Intel (1.00.03.BS0)
Vierci Computers	Samurai 75	ISA/PCI	AMI/Intel (1.00.03.BS0)
Vierci Computers	Samurai 90	ISA/PCI	AMI/Intel (1.00.03.BS0)
Vierci Computers	Samurai Series	ISA/PCI	AMI/Intel (1.00.03.BS0)
Viglen	Contender PCI Executive Pentium	ISA/PCI	AMI/Intel (1.00.03.CA0)
Viglen	Contender PCI Pentium	ISA/PCI	AMI/Intel (1.00.03.CB0)
Viglen	Genie PCI Pentium	ISA/PCI	AMI/Intel (1.00.03.CB0)
Vikomt	Monsoon Attacus	ISA/PCI	AMI/Intel (1.00.03.BS0)
Vikomt	Monsoon Attacus 75	ISA/PCI	AMI/Intel (1.00.03.BS0)
Vikomt	Monsoon Attacus 90	ISA/PCI	AMI/Intel (1.00.03.BS0)
Vikomt	Monsoon Neptis	ISA/PCI	AMI/Intel (1.00.03.CB0)
Vikomt	Monsoon Papilio	ISA/PCI	AMI/Intel (1.00.03.CA0)
Vobis Microcomputer	Highscreen Colani Tower 400 ZE-100	ISA/PCI	Award (VBS 1.11PH ECS UM8810)
Vobis Microcomputer	Highscreen Colani Tower 500 ZE-100	ISA/PCI/VL	Award (VBS 1.14PH ECS SI54P AIO)
Vobis Microcomputer	Highscreen Colani Tower 500 ZE-120	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen Colani Tower 500 ZE-133	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen Colani Tower 500 ZE-75	ISA/PCI	Award (VBS 1.11PH PA 2000 FIC)
Vobis Microcomputer	Highscreen Colani Tower 500 ZE-90	ISA/PCI	AMI/Intel (1.00.03.CA0)
Vobis Microcomputer	Highscreen Indus Tower 400 ZE-100	ISA/PCI	Award (VBS 1.11PH ECS UM8810)
Vobis Microcomputer	Highscreen Indus Tower 500 ZE-100	ISA/PCI/VL	Award (VBS 1.14PH ECS SI54P AIO)
Vobis Microcomputer	Highscreen Indus Tower 500 ZE-120	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen Indus Tower 500 ZE-133	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen Indus Tower 500 ZE-75	ISA/PCI	Award (VBS 1.11PH PA 2000 FIC)
Vobis Microcomputer	Highscreen Indus Tower 500 ZE-90	ISA/PCI	AMI/Intel (1.00.03.CA0)
Vobis Microcomputer	Highscreen IndusDesk 486DX4-100	ISA/PCI	Award (VBS 1.22PH FIC VIPIO2)
Vobis Microcomputer	Highscreen IndusDesk P100	ISA/PCI/VL	Award (VBS 1.14PH ECS SI54P AIO)
Vobis Microcomputer	Highscreen IndusDesk P120	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen IndusDesk P133	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen IndusDesk P75	ISA/PCI	Award (VBS 1.11PH PA 2000 FIC)
Vobis Microcomputer	Highscreen IndusDesk P90	ISA/PCI	AMI/Intel (1.00.03.CA0)
Vobis Microcomputer	Highscreen Mini Tower 486DX4-100	ISA/PCI	Award (VBS 1.22PH FIC VIPIO2)
Vobis Microcomputer	Highscreen Mini Tower P100	ISA/PCI	Award (VBS 1.11PH ECS UM8810)
Vobis Microcomputer	Highscreen Mini Tower P120	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen Mini Tower P133	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen Mini Tower P75	ISA/PCI	Award (VBS 1.11PH PA 2000 FIC)
Vobis Microcomputer	Highscreen Mini Tower P90	ISA/PCI	AMI/Intel (1.00.03.CA0)
Vobis Microcomputer	Highscreen Sky Case 400 ZE-100	ISA/PCI	Award (VBS 1.11PH ECS UM8810)
Vobis Microcomputer	Highscreen Sky Case 500 ZE-100	ISA/PCI/VL	Award (VBS 1.14PH ECS SI54P AIO)
Vobis Microcomputer	Highscreen Sky Case 500 ZE-120	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen Sky Case 500 ZE-133	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen Sky Case 500 ZE-75	ISA/PCI	Award (VBS 1.11PH PA 2000 FIC)
Vobis Microcomputer	Highscreen Sky Case 500 ZE-90	ISA/PCI	AMI/Intel (1.00.03.CA0)
Vobis Microcomputer	Highscreen Sky Tower 400 ZE-100	ISA/PCI	Award (VBS 1.11PH ECS UM8810)
Vobis Microcomputer	Highscreen Sky Tower 500 ZE-100	ISA/PCI/VL	Award (VBS 1.14PH ECS SI54P AIO)
Vobis Microcomputer	Highscreen Sky Tower 500 ZE-120	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen Sky Tower 500 ZE-133	ISA/PCI	AMI/Intel (1.00.04.CB0 VBS 1.00)
Vobis Microcomputer	Highscreen Sky Tower 500 ZE-75	ISA/PCI	Award (VBS 1.11PH PA 2000 FIC)
Vobis Microcomputer	Highscreen Sky Tower 500 ZE-90	ISA/PCI	AMI/Intel (1.00.03.CA0)
Vobis Microcomputer	SAT1 Family PC	ISA/PCI/VL	Award (VBS 1.14PH ECS SI54P AIO)
VTech Computers	486CS100	PCI	Award (4.50PG VT1013)
VTech Computers	486CX100	PCI	Award (4.50PG VT1013)
VTech Computers	Laser Platinum NST 133	PCI	Award (07Dec95)
VTech Computers	Platinum NS120	PCI	Award (4.50PG 9-20-95)
VTech Computers	Platinum NST 133	PCI	Award (07Dec95)
VTech Computers	Platinum NSV133	PCI	Award (07Dec95)
VTech Computers	Platinum NX120	PCI	Award (4.50PG 9-20-95)
Wearnes Thakral	5000 AP	ISA/PCI	Award (4.50GP)
WIN Laboratories	586-IXXEV-PCI DT	ISA/PCI	AMI/Intel (1.00.03.CB0)
WIN Laboratories	586-IXXEV-PCI FT	ISA/PCI	AMI/Intel (1.00.03.CB0)
WIN Laboratories	586-IXXEV-PCI MT	ISA/PCI	AMI/Intel (1.00.03.CB0)
WIN Laboratories	586-iXXtr-PCI DT	ISA/PCI	AMI/Intel (0.05.03.CC0M)
WIN Laboratories	586-iXXtr-PCI FT	ISA/PCI	AMI/Intel (0.05.03.CC0M)
WIN Laboratories	586-iXXtr-PCI MT	ISA/PCI	AMI/Intel (0.05.03.CC0M)
Zenith Data Systems	Z-Select 100XE (DX2)	ISA/PCI	Phoenix (4.04)
Zenith Data Systems	Z-Select 100XE (DX4)	PCI	Phoenix (4.04)
Zenith Data Systems	Z-Select 510 (486DX2/50)	ISA/PCI	Phoenix (4.04)
Zenith Data Systems	Z-Select 510 (486DX4/100)	ISA/PCI	Phoenix (4.04)
Zenith Data Systems	Z-Select ES	ISA/PCI	Phoenix (4.04)
Zenith Data Systems	Z-Station GT	ISA/PCI	Box
Zenith Data Systems	Z-Station GT 500	ISA/PCI	Box
Zenith Data Systems	Z-Station GT P-100	PCI	AMI/Intel (0.01.06.BT0U)
Zenith Data Systems	Z-Station GT P-120	PCI	AMI/Intel (0.01.06.BT0U)
Zenith Data Systems	Z-Station GT P-133	PCI	AMI/Intel (0.01.06.BT0U)
Zenith Data Systems	Z-Station GT P-75	PCI	AMI/Intel (0.01.06.BT0U)
Zenith Data Systems	Z-Station GT P-90	PCI	AMI/Intel (0.01.06.BT0U)
Zenith Data Systems	Z-Station GT5100	ISA/PCI	AMI/Intel (1.00.02.CA0U)
Zenith Data Systems	Z-Station GT5100M	ISA/PCI	AMI/Intel (1.00.02.CA0U)
Zenith Data Systems	Z-Station LC	ISA/PCI	AMI (2.8)
Zenith Data Systems	Z-Station VP	ISA/PCI	AMI (1.6)
Zenith Data Systems	Z-Station VP (486)	ISA/PCI	AMI (2.8)
Zenon Technology	Dream Media	ISA/PCI	Award (A.501G)
Zenon Technology	Dream Media 100	ISA/PCI	Award (A.501G)
Zenon Technology	Dream Media 120	ISA/PCI	Award (A.501G)
Zenon Technology	Dream Media 133	ISA/PCI	Award (A.501G)
Zenon Technology	Dream Media 90	ISA/PCI	Award (A.501G)
Zeos	Ambra P-100	PCI	Phoenix (4.04 V2.0d 9/28/95)
Zeos	Pantera DX2-50	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Zeos	Pantera DX2-66	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Zeos	Pantera DX4-100	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Zeos	Pantera P-100	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Zeos	Pantera P-120	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Zeos	Pantera P-75	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Zeos	Pantera P-90	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Zeos	Pantera P-90 w/SCSI	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo System/Mobile

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : System/Mobile

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Acer	AcerNote 350	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 350C	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 350CX	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 350EC (Cyrix)	ISA/VL/PCMCIA	Acer (V2.0 R01A0)
Acer	AcerNote 350EC (IBM)	ISA/VL/PCMCIA	Acer (V2.0 R01A0)
Acer	AcerNote 350EC (TI)	ISA/VL/PCMCIA	Acer (V2.0 R01A0)
Acer	AcerNote 351	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 352	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 353	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 354	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 355	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 356	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 357	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 358	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 359	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote 370	PCI/PCMCIA	Acer (V2.0)
Acer	AcerNote 950	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote 950C	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote 950CX	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote 951	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote 952	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote 953	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote 954	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote 955	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote 956	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote 957	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote 958	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote 959	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acer	AcerNote Light 350	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote Light 350C	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote Light 351	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote Light 352	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote Light 353	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote Light 354	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote Light 355	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote Light 356	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote Light 357	ISA/PCMCIA/VL	Acer (2.0)
Acer	AcerNote Nuovo	ISA/PCI	Box
Acer	AcerNote Pro 950-959	ISA/PCMCIA/PCI	Phoenix (4.0R0.5)
Acom	Patriot 4000/4000A	PCMCIA	Phoenix (1.03.06.T02)
Acom	Patriot 4000F	PCMCIA	Phoenix (1.03.06.T02)
Advanced Logic Research	Express XP2	PCI	Phoenix (2.0)
Associates Mega Sub-System	NB85-EXACTB Power CD	PCI/PCMCIA	Phoenix (8/24/95)
AST Research	Ascentia 950N	ISA/PCMCIA	AST (3.01.01)
AST Research	Ascentia 950N P/120	ISA/PCMCIA	AST (3.01.01)
AST Research	Ascentia 950N P/75	ISA/PCMCIA	AST (3.01.01)
AST Research	Ascentia 950N P/90	ISA/PCMCIA	AST (3.01.01)
AST Research	Ascentia J Series J10 CSS10-P/75	PCI/PCMCIA	Phoenix (4.0 3.07)
AST Research	Ascentia J Series J10 CTS10-P/75	PCI/PCMCIA	Phoenix (4.0 1.06)
AST Research	Ascentia J Series J20 CSS11-P/100	PCI/PCMCIA	Phoenix (4.0 3.07)
AST Research	Ascentia J Series J30 CSS10-P/100	PCI/PCMCIA	Phoenix (4.0 3.07)
AST Research	Ascentia J Series J30 CTS10-P/100	PCI/PCMCIA	Phoenix (4.0 3.07)
AST Research	Ascentia J Series J30 CTS10-P/100	PCI/PCMCIA	Phoenix (4.0 1.06)
AST Research	Ascentia J Series J50 CTS10-P/133	PCI/PCMCIA	Phoenix (4.0 1.06)
AST Research	Ascentia J Series J50 CTS10-P/133	PCI/PCMCIA	Phoenix (4.0 3.07)
AST Research	Ascentia J Series J55 CTS11-P/133	PCI/PCMCIA	Phoenix (4.0 3.07)
AST Research	Ascentia J Series J60 CTS11-P/150	PCI/PCMCIA	Phoenix (4.0 3.07)
AT&T	Globalyst 130 DX4	PCMCIA	SystemSoft (3.00.3)
Canon Computer Systems	BJ Notebook BN200	ISA/PCMCIA/VL	Phoenix (1.03.06.T02)
Canon Computer Systems	Innova Book 1000 (DX4)	ISA/PCMCIA/VL	Phoenix (1.03(063-005))
Canon Computer Systems	Innova Book 1000 (Pentium)	ISA/PCMCIA/VL	Phoenix (1.03(063-005))
Canon Computer Systems	Innova Note	ISA/PCMCIA/VL	Phoenix (1.03.06.T02)
Canon Computer Systems	Libris BN200	ISA/PCMCIA/VL	Phoenix (1.03.06.T02)
Canon Computer Systems	NoteJet III	ISA/PCMCIA/VL	Phoenix (1.03.06.T02)
Canon Computer Systems	NoteJet III (486)	ISA/PCMCIA/VL	Phoenix (1.03.)
Chicony Electronics	SRa	ISA/VL	Phoenix (1.03.06.T02)
Clevo Corporation	862 Series	PCI/ISA	Phoenix (6.0)
Compaq	ARMADA 1120	ISA/PCMCIA	Compaq (6/20/96)
Compaq	ARMADA 4110	ISA/PCMCIA	Compaq (8/8/96)
Compaq	Contura 400	PCMCIA	Compaq (7-18-95)
Compaq	Contura 400C	PCMCIA	Compaq (7-18-95)
Compaq	Contura 400CX	PCMCIA	Compaq (7-18-95)
Compaq	Contura 410	PCMCIA	Compaq (7-18-95)
Compaq	Contura 410C	PCMCIA	Compaq (7-18-95)
Compaq	Contura 410CX	PCMCIA	Compaq (7-18-95)
Compaq	Contura 420CX	ISA	Compaq (8/01/95)
Compaq	Contura 430C	ISA	Compaq (8/01/95)
Compaq	Contura 430CX	ISA	Compaq (8/01/95)
Compaq	LTE 5000	PCMCIA	SystemSoft (P50)
Compaq	LTE 5300	ISA/PCMCIA	SystemSoft (4.02)
Compaq	LTE 5380	ISA/PCMCIA	SystemSoft (4.02)
Dell	Dell Latitude LM	PCI/PCMCIA	Phoenix (4.0)
Dell	Latitude LX4100D	PCMCIA	Phoenix (A01)
Dell	Latitude LX475D	PCMCIA	Phoenix (A01)
Dell	Latitude LXP-P75D	PCMCIA	Phoenix (A00)
Dell	Latitude LXP-P75T	PCMCIA	Phoenix (A00)
Dell	Latitude LXP-P90D	PCMCIA	Phoenix (A00)
Dell	Latitude LXP-P90ST	PCMCIA	Phoenix (A00)
Dell	Latitude LXP-P90T	PCMCIA	Phoenix (A00)
Dell	Latitude XP4100D	PCMCIA	Phoenix (A00)
Dell	Latitude XP475D	PCMCIA	Phoenix (A00)
Dell	Latitude XPi 100 SD	PCMCIA	Box
Dell	Latitude XPi 133	PCMCIA	Box
Digital Equipment	Hi Note Ultra II CTE 5100	PCMCIA	System Soft (2.02)
Digital Equipment	HiNote 433	VL/PCMCIA	SystemSoft (1.30)
Digital Equipment	HiNote CS450	VL/PCMCIA	SystemSoft (1.30)
Digital Equipment	HiNote CS475	VL/PCMCIA	SystemSoft (1.30)
Digital Equipment	HiNote CT450	VL/PCMCIA	SystemSoft (1.30)
Digital Equipment	HiNote CT475	VL/PCMCIA	SystemSoft (1.30)
Digital Equipment	HiNote Ultra 433	VL/PCMCIA	SystemSoft (1.30)
Digital Equipment	HiNote Ultra CS433	VL/PCMCIA	SystemSoft (1.30)
Digital Equipment	HiNote Ultra CS450	VL/PCMCIA	SystemSoft (1.30)
Digital Equipment	HiNote Ultra CS475	VL/PCMCIA	SystemSoft (1.30)
Digital Equipment	HiNote Ultra CT450	VL/PCMCIA	SystemSoft (1.30)
Digital Equipment	HiNote Ultra CT475	VL/PCMCIA	SystemSoft (1.30)
Digital Equipment	HiNote Ultra II CTS 5100	PCMCIA	System Soft (2.02)
Digital Equipment	HiNote Ultra II CTS 5120	PCMCIA	System Soft (2.02)
Digital Equipment	HiNote Ultra II CTS 5133	PCMCIA	System Soft (2.02)
Digital Equipment	HiNote Ultra II LTS 5133	PCMCIA	System Soft (2.02)
Digital Equipment	HiNote VP CSS5100	PCMCIA	Phoenix (1.03T)
Digital Equipment	HiNote VP CSS575	PCMCIA	Phoenix (1.03T)
Digital Equipment	HiNote VP CTS 5100	PCMCIA	Phoenix (1.03T)
Digital Equipment	HiNote VP LSS5100	PCI/PCMCIA	Box
Digital Equipment	HiNote VP LSS5100	PCMCIA	Phoenix (1.03T)
Digital Equipment	HiNote VP LSS5120	PCMCIA	Phoenix (1.03T)
Digital Equipment	HiNote VP LSS5120	PCI/PCMCIA	Phoenix (NoteBios 4.0 31G1009B)
Digital Equipment	HiNote VP LTS5120	PCMCIA	Phoenix (1.03T)
Digital Equipment	HiNote VP LTS5120	PCI/PCMCIA	Phoenix (NoteBios 4.0 31G1009B)
Digital Equipment	HiNote VP VTS5133	PCI/PCMCIA	Phoenix (NoteBios 4.0 31G1009B)
Epson	ActionNote 910C	PCMCIA	Phoenix (1)
Epson	Endeavor NT-600	VLB	Box
Epson	VN510ET	PCMCIA	Box
Epson	VN512ET	PCMCIA	Box
Epson	VN513ET	PCMCIA	Box
Featron Technologies	FT6600 Series Notebook	ISA/PCI/PCMCIA	Box
Fujitsu	FM PenNote L3	PCMCIA	Phoenix (4.04)
Fujitsu	FM PenNote R3	PCMCIA	Phoenix (4.04)
Fujitsu	FMV-4100NL/S	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-4100NL/T	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-4100NU/S	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-4100NU/T	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-4100NU/Y	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-475NU	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-475NU/S	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-475NU/T	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-499NA/T	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-499NU/S	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-499NU/T	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-5100NA/W	PCMCIA	Phoenix (4.04)
Fujitsu	FMV-5100NL/T	PCMCIA	Phoenix (4.05)
Fujitsu	FMV-5100NL/W	PCMCIA	Phoenix (4.05)
Fujitsu	FMV-5100NL/Y	PCMCIA	Phoenix (4.05)
Fujitsu	FMV-5100NU/W	PCMCIA	Phoenix (4.05)
Fujitsu	FMV-5100NU/Y	PCMCIA	Phoenix (4.05)
Fujitsu	FMV-5120NA/W	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-5120NA/X	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-5120NA2/W	PCMCIA	Phoenix (4.04)
Fujitsu	FMV-5133NA/W	PCMCIA	Phoenix (4.04)
Fujitsu	FMV-5133NA/X	PCMCIA	Phoenix (4.04)
Fujitsu	FMV-5133NA2/W	PCMCIA	Phoenix (4.04)
Fujitsu	FMV-575NA/T	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-575NA/X	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	FMV-575NL/S	PCMCIA	Phoenix (4.05)
Fujitsu	Milan	PCMCIA	Phoenix (4.05)
Fujitsu	Monte Carlo	PCMCIA	Phoenix (4.04)
Fujitsu	Montego	PCMCIA	Phoenix (4.05)
Fujitsu	OASYS V-475NU/S	PCMCIA	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Fujitsu	OASYS V-5100NU/W	PCMCIA	Phoenix (4.05)
Fujitsu	Stylistic 1000	PCMCIA	Phoenix (4.04)
Fujitsu ICL	ErgoLite s120CD	ISA/PCMCIA/VL	Acer (R01-H0)
Fujitsu ICL	ErgoLite s75	ISA/PCMCIA/VL	Acer (R01-H0)
Fujitsu ICL	ErgoLite s90CD	ISA/PCMCIA/VL	Acer (R01-H0)
Fujitsu ICL	ErgoLite x75	ISA/PCMCIA/VL	Acer (R01-H0)
Gateway 2000	Liberty DX2-100	PCMCIA	SystemSoft (136)
Gateway 2000	Liberty DX4-100	PCMCIA	SystemSoft (136)
Gateway 2000	P5-166	ISA/PCI	AMI/Intel (1.00.01.CN0T)
Gateway 2000	P5-166 Best Buy	ISA/PCI	AMI/Intel (1.00.01.CN0T)
Gateway 2000	P5-166XL	ISA/PCI	AMI/Intel (1.00.01.CN0T)
Gateway 2000	Solo	ISA/VL	SystemSoft (1.17.00)
Gateway 2000	Solo 2100	ISA/PCI	Phoenix (3.94)
Hewlett-Packard	OmniBook 4000C	ISA	bogus5 (4.10)
Hewlett-Packard	OmniBook 4000CT	ISA	bogus5 (4.10)
Hewlett-Packard	OmniBook 5500	ISA/PCI/PCMCIA	HP (2.00)
Hitachi	E-Series E 133T	PCI/PCMCIA	Box
Hitachi	FLORA 500NI	PCMCIA	Box
Hitachi	FLORA-NM1	PCMCIA	Box
Hitachi	H350	PCMCIA	Box
Hitachi	H380	ISA/PCMCIA/PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Hitachi	Hitachi Notebook M	PCMCIA	Box
IBM	ThinkPad 340CSE	ISA/PCMCIA	IBM (BUTUS3H)
IBM	ThinkPad 345C	ISA/PCI	IBM (BUTUS3H)
IBM	ThinkPad 345CS	ISA/PCI	IBM (BUTUS3H)
IBM	ThinkPad 360	ISA	IBM (BUTUS3H)
IBM	ThinkPad 360 CS	ISA	IBM (BUTUS3H)
IBM	ThinkPad 360C	ISA	IBM (BUTUS3H)
IBM	ThinkPad 360CE	ISA	IBM (BUTUS3H)
IBM	ThinkPad 360CE	ISA	IBM (BUTUS3H)
IBM	ThinkPad 360CSE	ISA	IBM (BUTUS3H)
IBM	ThinkPad 360P	ISA	IBM (BUTUS3H)
IBM	ThinkPad 360PE	ISA	IBM (BUTUS3H)
IBM	ThinkPad 365	ISA/PCMCIA/VL	Phoenix (1.0)
IBM	ThinkPad 365C	ISA/PCMCIA/VL	Phoenix (1.0)
IBM	ThinkPad 365CD	ISA/PCMCIA/VL	Phoenix (1.0)
IBM	ThinkPad 365CS	ISA/PCMCIA/VL	Phoenix (1.0)
IBM	ThinkPad 365CSD	ISA/PCMCIA/VL	Phoenix (1.0)
IBM	ThinkPad 365XD	ISA/PCI/PCMCIA	IBM (06/05/1996)
IBM	ThinkPad 370C	ISA/PCMCIA	IBM (BUTUS3H)
IBM	ThinkPad 530CS	ISA/VL/PCMCIA	IBM (vFC.01.00 (2-01-96))
IBM	ThinkPad 701C 486/DX2	ISA/PCMCIA	IBM (BUTUS3H)
IBM	ThinkPad 701C 486/DX4	ISA/PCMCIA	IBM (BUTUS3H)
IBM	ThinkPad 701CS 486/DX2	ISA/PCMCIA	IBM (BUTUS3H)
IBM	ThinkPad 701CS 486/DX4	ISA/PCMCIA	IBM (BUTUS3H)
IBM	ThinkPad 755 CE	ISA	IBM (BUTUS3H)
IBM	ThinkPad 755C	ISA	IBM (BUTUS3H)
IBM	ThinkPad 755CD	ISA	IBM (BUTUS3H)
IBM	ThinkPad 755CDV	ISA	IBM (BUTUS3H)
IBM	ThinkPad 755Cs	ISA	IBM (BUTUS3H)
IBM	ThinkPad 755CSE	ISA	IBM (BUTUS3H)
IBM	ThinkPad 755CX	ISA/PCMCIA/VL	IBM (BUTUS3H)
IBM	ThinkPad 760 CD	ISA/PCI	IBM (BUTUS3H)
IBM	ThinkPad 760 ED	PCI/ISA/PCMCIA	IBM (Bogus(02/27/965:28:29 PM1.401764E-02))
IBM	ThinkPad 760 ELD	PCI/ISA/PCMCIA	IBM (5/8/95)
IBM	ThinkPad 760C	ISA/PCI	IBM (BUTUS3H)
IBM	ThinkPad 760L	ISA/VL/PCMCIA	IBM (1.0)
IBM	ThinkPad 760LD	ISA/VL/PCMCIA	IBM (1.0)
IPC	Radiance R-100	PCMCIA	Phoenix (I3J11)
Micron	Millenia Transport P120	ISA/PCI/PCMCIA	Phoenix (NoteBIOS v4.0.6)
Micron	Millenia Transport P133	ISA/PCI/PCMCIA	Phoenix (NoteBIOS v4.0.6)
MITAC	4023	ISA/PCMCIA/VL	SystemSoft (R4.01A)
MITAC	4023	ISA/PCMCIA/VL	SystemSoft (R4.01A)
MITAC	4024	VL/PCMCIA	SystemSoft (R.105H)
Mitac	5023	PCI	Phoenix (4.04)
MITAC	5024	ISA/PCI/PCMCIA	Box
Mitsubishi	ApricotNOTE FX M3472-A152/A1C0	ISA/PCMCIA	Phoenix (4.0)
Mitsubishi	ApricotNOTE FX M3482-A181/A1C0	ISA/PCMCIA	Phoenix (4.0)
Mitsubishi	ApricotNOTE SX M3423-A152/A1C0	ISA/PCMCIA	Phoenix (4.0)
Mitsubishi	ApricotNOTE SX M3423-A181/A2C0	ISA/PCMCIA	Phoenix (4.0)
Mitsubishi	ApricotNOTE SX M3423C-A181/A2C0	ISA/PCMCIA	Phoenix (4.0)
NEC	Versa 2000C	ISA/PCMCIA	PTL/NEC (1.05.05)
NEC	Versa 2000D	ISA/PCMCIA	PTL/NEC (1.05.05)
NEC	Versa 2200C	PCMCIA	Phoenix (NEC 1.06)
NEC	Versa 2205C	PCMCIA	Phoenix (NEC 1.06)
NEC	Versa 4000C	ISA/PCMCIA	PTL/NEC (1.05.05)
NEC	Versa 4000D	ISA/PCMCIA	PTL/NEC (1.05.05)
NEC	Versa 4050C	ISA/PCMCIA	PTL/NEC (1.05.05)
NEC	Versa 4050H	ISA/PCMCIA	PTL/NEC (1.05.05)
NEC	Versa 4200	ISA/VL	Box
NEC	Versa 550D	PCMCIA	Phoenix (A486 1.03)
NEC	Versa 6000	ISA/PCI	Phoenix (1.01c)
NEC	Versa 6030H	ISA/PCI	Phoenix (1.01c)
OKI	ifNOTE 4100C	PCMCIA	Phoenix (1.03 R2.2)
OKI	ifNOTE 475S	PCMCIA	Phoenix (1.03 R2.2)
Quanta Computer	MP5	PCI/PCMCIA	Phoenix (4.0)
Quanta Computer	MQ6	PCI/PCMCIA	Phoenix (300)
Quanta Computer	MR6	PCI/PCMCIA	Box
Samsung	SEN800	ISA/PCMCIA	Phoenix (3.00)
Samsung	Sens 700	ISA/PCMCIA	Phoenix (3.00)
Samsung	SPC 5850N	ISA/PCMCIA	Phoenix (3.00)
Samsung	SPC 5900N	ISA/PCMCIA	Phoenix (3.00)
Sanyo	MBC-NJ10H5	ISA/PCMCIA	Phoenix (V1.03)
Sanyo	MBC-NJ10H5S	ISA/PCMCIA	Phoenix (V1.03)
Sanyo	MBC-NJ5H2	ISA/PCMCIA	Phoenix (BIOS V 1.03)
Sanyo	MBC-NJP7H5	ISA	SystemSoft (V3.0)
Sanyo	MBC-NJP9H10	ISA	SystemSoft (V3.0)
Sanyo	MBC-NW10H5	ISA/PCMCIA	Phoenix (V1.03)
Sanyo	MBC-NW10H5S	ISA/PCMCIA	Phoenix (V1.03)
Sanyo	MBC-NWP7H5	ISA	SystemSoft (V3.0)
Sanyo	MBC-NWP9H10	ISA	SystemSoft (V3.0)
Sanyo	Winkey MBC-S700	PCI/PCMCIA	Phoenix (Notebios 4.0)
Sanyo	Winkey MBC-S700N	PCI/PCMCIA	Phoenix (Notebios 4.0)
Sanyo	Winkey MBC-S705	PCI/PCMCIA	Phoenix (Notebios 4.0)
Sanyo	Winkey MBC-S705K	PCI/PCMCIA	Phoenix (Notebios 4.0)
Sanyo	Winkey MBC-S705N	PCI/PCMCIA	Phoenix (Notebios 4.0)
Sanyo	Winkey MBC-S720K	PCI/PCMCIA	Phoenix (Notebios 4.0)
Sanyo	Winkey MBC-S750K	PCI/PCMCIA	Phoenix (Notebios 4.0)
Sceptre Technologies	SoundX S3200	ISA/PCI/PCMCIA	Phoenix (PH00106A.T04)
Sharp	PC-3020	ISA	Phoenix (1.03.06.T02)
Sharp	PC-3060	ISA	Phoenix (1.03.06.T02)
Texas Instruments	Extensa 450	ISA/PCMCIA	Phoenix (1.03.06.T02)
Texas Instruments	Extensa 455	ISA/PCMCIA	Phoenix (1.03.06.T02)
Texas Instruments	Extensa 550	ISA/PCMCIA/PCI	Phoenix (Notebios 4.0)
Texas Instruments	Extensa 550 CD	ISA/PCMCIA/PCI	Phoenix (Notebios 4.0)
Texas Instruments	Extensa 550 CDT	ISA/PCMCIA/PCI	Phoenix (Notebios 4.0)
Texas Instruments	Extensa 555	ISA/PCMCIA/PCI	Phoenix (Notebios 4.0)
Texas Instruments	Extensa 555 CD	ISA/PCMCIA/PCI	Phoenix (Notebios 4.0)
Texas Instruments	Extensa 555 CDT	ISA/PCMCIA/PCI	Phoenix (Notebios 4.0)
Texas Instruments	Extensa 600	PCI/PCMCIA	Phoenix (4.05)
Texas Instruments	Extensa 650 CD	PCI/PCMCIA	Phoenix (4.0)
Texas Instruments	Extensa 650CDT	PCI/PCMCIA	Phoenix (4.0)
Texas Instruments	Extensa 655CD	PCI/PCMCIA	Phoenix (4.0)
Texas Instruments	Extensa 655CDT	PCI/PCMCIA	Phoenix (4.0)
Texas Instruments	TravelMate 5000	PCI	Phoenix (1.03 062695A)
Texas Instruments	TravelMate 5020	PCI/PCMCIA	Phoenix (082895a)
Texas Instruments	TravelMate 5020SE	PCI/PCMCIA	Phoenix (082895a)
Texas Instruments	TravelMate 5100	PCI/PCMCIA	Phoenix (082895a)
Texas Instruments	TravelMate 5200	PCI/PCMCIA	Phoenix (082895a)
Toshiba Engineering Co.	400CDT	PCMCIA	Toshiba (5.22)
Toshiba Engineering Co.	400CS	PCMCIA	Toshiba (5.22)
Toshiba Engineering Co.	Dynabook GT-S575	ISA/VL/PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	DynaBook SS475	PCMCIA	Toshiba (1.54)
Toshiba Engineering Co.	Portege 610 CT	PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	Satellite 100CS	ISA/VL/PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	Satellite 105CS	ISA/VL/PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	Satellite Pro T2150CDT	PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	Satellite T2110 CS	PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	Satellite T2130CDS	PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	T2115CS	PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	T2130CT	PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	T2135CS	PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	T2135CT	PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	T2150CDS	PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	T2155CDS	PCMCIA	Toshiba (5.00)
Toshiba Engineering Co.	Tecra 700CS	ISA/PCI/PCMCIA	Toshiba (5.04)
Toshiba Engineering Co.	Tecra 700CT	ISA/PCI/PCMCIA	Toshiba (5.04)
Toshiba Engineering Co.	Tecra 710	ISA/PCI/PCMCIA	Box
Toshiba Engineering Co.	Tecra 730	PCMCIA	Toshiba (5.0A)
Unisys	Travel Partner Pro	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5751041--50D	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5751041-50T	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5751041-80D	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5751041-80T	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5751041-ZFD	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5751041-ZFT	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5901041-50D	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5901041-50T	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5901041-80D	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5901041-80T	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5901041-ZFD	PCI/PCMCIA	Phoenix (4.0)
Unisys	Travel Partner Pro NBF5901041-ZFT	PCI/PCMCIA	Phoenix (4.0)
Vobis Microcomputer	Highscreen Module Note II	PCMCIA	SystemSoft (1.01 (R1.05H))
Zenith Data Systems	Z-Note GT	PCMCIA	Phoenix (4.0)
Zenith Data Systems	Z-Note MX	PCI	Phoenix (4.04 Ver. 2.1 Oct. 30 95)
Zenith Data Systems	Z-NoteFlex P	ISA	Phoenix (1.4I)
Zenith Data Systems	Z-STAR	ISA/PCMCIA	Phoenix (1.03.06.T02)
Zeos	Meridian 850	VL/PCMCIA	SystemSoft (1.01)
Zeos	Meridian 850C-75MHz	VL/PCMCIA	SystemSoft (1.01)
Zeos	Meridian 850C-90MHz	VL/PCMCIA	SystemSoft (1.01)

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Logo UPS

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft and carry the Designed for Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : UPS

Hardware Vendor	Device Name	Device Bus	Driver BIOS
American Power Conversion	Back UPS Pro 280	COM	WDL
American Power Conversion	Back UPS Pro 420	COM	WDL
American Power Conversion	Back UPS Pro 650	COM	WDL
Deltec Electronics	PowerRite Max	COM	WDL
Tripp Lite	Smart Series w/Plug and Play Adapter	COM	Box
ViewSonic	Opti-UPS 1000E	COM	WDL
ViewSonic	Opti-UPS 1400E	COM	WDL
ViewSonic	Opti-UPS 280E	COM	WDL
ViewSonic	Opti-UPS 420E	COM	WDL
ViewSonic	Opti-UPS 650E	COM	WDL

Click here if you would like the list of hardware products that are compatible with Windows 95. These products run on but are not necessarily optimized for Windows 95.


Compatible Audio

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Audio

Hardware Vendor	Device Name	Device Bus	Driver BIOS
AdLib	AdLib	ISA	Box
Advanced Digital Systems	Radio Rock-It RDS	ISA	Box
Analog Devices Inc.	AD1815 SoundComm Controller	ISA	Box
AST Research	Advantage 14400 voice/data/fax	ISA	WDL
AST Research	Advantage 2400 data/9600 fax	ISA	WDL
Avance Logic	ALS007	ISA	Box
Avance Logic	ALS100	ISA	Box
Aztech	Sound Galaxy Nova 16	ISA	Box
Aztech	Sound Galaxy Washington 16	ISA	Box
Aztech Systems	Multimedia Pro 16IIBO	ISA	Box
Aztech Systems	SND144AMSP Sound Card	ISA	Box
Aztech Systems	Sound Galaxy Nova 16 Extra II-3D	ISA	Box
Aztech Systems	Sound Galaxy NOVA 16 III	ISA	WDL
Aztech Systems	Sound Galaxy Oriole 16 SRS	ISA	WDL
Aztech Systems	Sound Galaxy Pro 16II	ISA	Box
Aztech Systems	Sound Galaxy Washington 16AB	ISA	Box
Aztech Systems	Sound Galaxy Wave Rider Pro 32-3D	ISA	WDL
Aztech Systems	Sound-2 144AM Sound Card	ISA	WDL
Compaq	Business Audio	ISA	Box
Creative Labs	CT3630 SB AWE32 "Value Edition""	ISA	WDL
Creative Labs	CT3636	ISA	WDL
Creative Labs	Sound Blaster	ISA	Box
Creative Labs	Sound Blaster 1.0 DSP	ISA	Box
Creative Labs	Sound Blaster 16 Multi-CD	ISA	Box
Creative Labs	Sound Blaster 16 Plug and Play	ISA	Box
Creative Labs	Sound Blaster 16 SCSI-2 CD	ISA	Box
Creative Labs	Sound Blaster 16 Value	ISA	Box
Creative Labs	Sound Blaster 16-ASP	ISA	Box
Creative Labs	Sound Blaster 2.0c	ISA	Box
Creative Labs	Sound Blaster AWE32	ISA	Box
Creative Labs	Sound Blaster MCA	MCA	Box
Creative Labs	Sound Blaster Pro	ISA	Box
Creative Labs	Sound Blaster Pro 2	ISA	Box
Creative Labs	Sound Blaster Pro MCA	MCA	Box
Creative Labs	Sound Blaster Vibra 16	ISA	Box
Creative Labs	Sound Blaster w/2.0 DSP	ISA	Box
ENSONIQ Corporation	SoundscapeVIVO	ISA	Box
ESS Technology	ES1488 AudioDrive	ISA	Box
ESS Technology	ES1688 AudioDrive	ISA	Box
ESS Technology	ES1688 Wavetable PNP	ISA	Box
ESS Technology	ES1878	ISA	WDL
ESS Technology	ES1878 with ES978	ISA	WDL
ESS Technology	ES488 AudioDrive	ISA	Box
ESS Technology	ES688 AudioDrive	ISA	Box
Formosa Industrial Computing Inc.	16 bit Audiostar	ISA	WDL
Formosa Industrial Computing Inc.	16 bit Audiostar Wave	ISA	WDL
Formosa Industrial Computing Inc.	Highscreen Sound Boostar 16	ISA	WDL
Formosa Industrial Computing Inc.	Highscreen Sound Boostar 16 Wave	ISA	WDL
Formosa Industrial Computing Inc.	Logon Audio 16	ISA	WDL
Formosa Industrial Computing Inc.	Logon Audio 16 Wave	ISA	WDL
Formosa Industrial Computing Inc.	Sound Conductor 16 PNP Model SC1671	ISA	WDL
Formosa Industrial Computing Inc.	Sound Engine 16	ISA	WDL
Formosa Industrial Computing Inc.	Sound Engine 16 Wave	ISA	WDL
Formosa Industrial Computing Inc.	Yakumo 16 bit Sound Star	ISA	WDL
Formosa Industrial Computing Inc.	Yakumo 16 bit Sound Star Wave	ISA	WDL
Media Vision	Pro Audio Deluxe/ProSonic/Jazz-16	ISA	Box
Media Vision	Pro Audio Spectrum 16/Basic	ISA	Box
Media Vision	Pro Audio Spectrum 16/Studio+SCSI	ISA	Box
Media Vision	Pro Audio Spectrum Plus	ISA	Box
Media Vision	Pro/Premium 3D	ISA	Box
Media Vision	Thunder Board	ISA	Box
Microsoft	Portable Sound Digispeech	ISA	WDL
Microsoft	Windows Sound System	ISA	Box
MusicQuest	MQX-32M	ISA	Box
New Media	Wav Jammer	PCMCIA	Box
Oak Technology	Mozart Sound System	ISA	WDL
OPTi	MAD16 Pro PnP (Opti925)	ISA	Box
OPTi	SAB-2100 Rev. 1.1	ISA	WDL
OPTi	Sound PnP Device (Opti931)	ISA	Box
Roland	LAPC1	ISA	Box
Roland	MPU-IPC-T	ISA	Box
Roland	SCC-1	ISA	Box

Click here to see the list of logo'd products


Compatible CPU

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : CPU

There are no products available at this time for the hardware category you selected.

Click here to see the list of logo'd products


Compatible Display Adapter

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Display Adapter

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Actix	GraphicsEngine 32I VL (S3)	VL	Box
Actix	GraphicsEngine 32VL Plus (S3)	VL	Box
Actix	GraphicsEngine 64 (S3)	PCI	Box
Actix	GraphicsEngine Ultra 64 (S3)	PCI	Box
Actix	GraphicsEngine Ultra Plus (S3)	ISA	Box
Actix	GraphicsEngine Ultra VL Plus (S3)	VL	Box
ATI	8514-Ultra (mach8)	ISA	Box
ATI	Graphics Expression (mach64CT)	PCI	WDL
ATI	Graphics Pro Turbo (mach64)	ISA	Box
ATI	Graphics Ultra (mach8)	ISA	Box
ATI	Graphics Ultra Pro (mach32)	ISA	Box
ATI	Graphics Ultra Pro EISA (mach32)	EISA	Box
ATI	Graphics Ultra Pro PCI (mach32)	PCI	Box
ATI	Graphics Vantage (mach8)	ISA	Box
ATI	Graphics Wonder (mach32) - ISA	ISA	Box
ATI	Graphics Wonder (mach32) - VL	VL	Box
ATI	Graphics Xpression (mach64)	VL	Box
ATI	VGA Wonder	ISA	Box
ATI	WinBoost PCI (mach64 CT)	PCI	Box
ATI	WinTurbo (mach64) - PCI	PCI	Box
ATI	WinTurbo (mach64) - VL	VL	Box
Boca	SuperVGA (Cirrus Logic)	ISA	Box
Boca	SuperX (Cirrus Logic)	ISA	Box
Boca	Vortek (IIT)	ISA	Box
Boca	Voyager (C&T)	VL	Box
Chips & Tech	64310 PCI	PCI	Box
Chips & Tech	65545 PCI	PCI	Box
Chips & Tech	65548 PCI	PCI	Box
Chips & Tech	Accelerator	Chip	Box
Cirrus Logic	5422/26/28	Chip	Box
Cirrus Logic	5429/30/34	Chip	Box
Compaq	Advanced VGA (AVGA)	ISA	Box
Compaq	EISA Advanced VGA (AVGA)	EISA	Box
Compaq	Notebook Display (WD)	ISA	Box
Compaq	QVision 1024/E	EISA	Box
Compaq	QVision 1024/I	ISA	Box
Compaq	QVision 1280/E	EISA	Box
Compaq	QVision 1280/I	ISA	Box
Compaq	QVision 2000 (MGA)	PCI	Box
Compaq	QVision PCI	PCI	Box
Diamond	SpeedStar (Tseng)	ISA	Box
Diamond	SpeedStar 24 (Tseng)	ISA	Box
Diamond	SpeedStar 24X (WD)	ISA	Box
Diamond	SpeedStar Pro (Cirrus Logic) - PCI	PCI	Box
Diamond	SpeedStar Pro (Cirrus Logic) - VL	VL	Box
Diamond	Stealth 24 (S3) - ISA	ISA	Box
Diamond	Stealth 24 (S3) - VL	VL	Box
Diamond	Stealth 32 (Tseng) - PCI	PCI	Box
Diamond	Stealth 32 (Tseng) - VL	VL	Box
Diamond	Stealth 64 (S3) - PCI	PCI	Box
Diamond	Stealth 64 (S3) - VL	VL	Box
Diamond	Stealth 64 VRAM (S3) - PCI	PCI	Box
Diamond	Stealth 64 VRAM (S3) - VL	VL	Box
Diamond	Stealth Pro (S3) - PCI	PCI	Box
Diamond	Stealth Pro (S3) - VL	VL	Box
Diamond	Stealth SE (S3) - PCI	PCI	Box
Diamond	Stealth SE (S3) - VL	VL	Box
Diamond	Stealth VRAM (S3)	ISA	Box
Diamond Multimedia Systems	SpeedStar 64	PCI	WDL
Diamond Multimedia Systems	SpeedStar 64 (ISA)	ISA	WDL
Diamond Multimedia Systems	SpeedStar Pro SE	PCI	WDL
Diamond Multimedia Systems	SpeedStar Pro SE (ISA)	ISA	WDL
Diamond Multimedia Systems	Viper PCI	PCI	WDL
Diamond Multimedia Systems	Viper VL	VLB	WDL
Genoa	Phantom 32I (Tseng)	VL	Box
Genoa	Phantom 64 (S3)	VL	Box
Hercules	Dynamite (Tseng)	VL	Box
Hercules	Dynamite Pro (Tseng)	VL	Box
Hercules	Graphite (IIT)	ISA	Box
Hercules	Graphite 64 (S3)	VL	Box
Hercules	Graphite Power (IIT)	ISA	Box
Hercules	Graphite Pro (IIT)	ISA	Box
Hercules	Graphite Terminator 64 (S3)	VL	Box
Hercules	Graphite Terminator Pro (S3)	VL	Box
IBM	XGA	MCA	Box
IBM	XGA/2	MCA	Box
IIT	AGX	Chip	Box
Matrox	MGA Impression Lite -  VL	VL	Box
Matrox	MGA Impression Lite - PCI	PCI	Box
Matrox	MGA Impression Plus - PCI	PCI	Box
Matrox	MGA Impression Plus - VL	VL	Box
Matrox	MGA Impression Plus 220 - PCI	PCI	Box
Matrox	MGA Impression Plus 220 - VL	VL	Box
Matrox	MGA Ultima Plus - PCI	PCI	Box
Matrox	MGA Ultima Plus - VL	VL	Box
Matrox	MGA Ultima Plus 200 - PCI	PCI	Box
Matrox	MGA Ultima Plus 200 - VL	VL	Box
Microsoft	8514-Compatible	ISA	WDL
Microsoft	VGA-Compatible	ISA	WDL
Number Nine	FlashPoint 32 (Cirrus Logic)	ISA	Box
Number Nine	FlashPoint 64 (Cirrus Logic)	VL	Box
Number Nine	GXE (S3)	VL	Box
Number Nine Computer	#9GXE64 - VL	VLB	Box
Number Nine Computer	#9GXE64 Pro - Vl	VLB	Box
Number Nine Computer	9FX Motion 531 - VL	VLB	Box
Number Nine Computer	9FX Motion 771 - VL	VLB	Box
Number Nine Computer	9FX Vision 330 - VL	VLB	Box
Orchid	Celsius (IIT)	ISA	Box
Orchid	Fahrenheit 1280 Plus (S3)	VL	Box
Orchid	Fahrenheit Pro 64 (S3)	VL	Box
Orchid	Fahrenheit VA (S3)	ISA	Box
Orchid	Kelvin 64 (Cirrus Logic)	VL	Box
Orchid	Kelvin EZ (Cirrus Logic)	VL	Box
Orchid	ProDesigner II (Tseng)	ISA	Box
Paradise	Accelerator Ports O'Call (WD)	ISA	Box
Paradise	Accelerator Pro (IIT)	ISA	Box
Paradise	Accelerator VL Plus (WD)	VL	Box
Paradise	Bahamas (S3)	ISA	Box
Paradise	Barbados 64 (S3)	ISA	Box
Paradise	Super VGA (WD)	ISA	Box
S3	801/805/805i	Chip	Box
S3	911/924	Chip	Box
S3	928	Chip	Box
S3	Trio32	Chip	Box
S3	Trio64	Chip	Box
S3	Vision 864/964	Chip	Box
S3	Vision 868/968	Chip	Box
Spider	32 VLB (Cirrus Logic)	VL	Box
STB	Ergo MCX (Tseng)	ISA	Box
STB	Horizon (Cirrus Logic) - ISA	ISA	Box
STB	Horizon (Cirrus Logic) - VL	VL	Box
STB	Horizon Plus (Cirrus Logic)	VL	Box
STB	LightSpeed (Tseng)	VL	Box
STB	MVP-2X (Tseng)	ISA	Box
STB	MVP-4X (Tseng)	ISA	Box
STB	Nitro (Cirrus Logic) - ISA	ISA	Box
STB	Nitro (Cirrus Logic) - VL	VL	Box
STB	Pegasus (S3)	ISA	Box
STB	PowerGraph Pro (S3)	ISA	Box
STB	PowerGraph VL-24 (S3)	VL	Box
Trident Microsystems	F65548 VL	VLB	WDL
Trident Microsystems	TGUI 9400 CXi - VL	VLB	WDL
Trident Microsystems	TGUI 9440 AGi - PCI	PCI	WDL
Trident Microsystems	TGUI 9440 AGi - VL	VLB	WDL
Tseng Labs	ET4000	ISA	Box
Tseng Labs	ET4000/W32, W32i, W32p	Chip	Box
Video Logic	928Movie (S3) - ISA	ISA	Box
Video Logic	928Movie (S3) - VL	VL	Box
Video Seven	VRAM/VRAM II	ISA	Box
Western Digital	90C00/30	ISA	Box
Western Digital	90C24/31/33	ISA	Box

Click here to see the list of logo'd products


Compatible Display Monitor

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Display Monitor

Hardware Vendor	Device Name	Device Bus	Driver BIOS
NEC	MultiSync XE21	DDC	Box

Click here to see the list of logo'd products


Compatible Imaging

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Imaging

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Hewlett-Packard	ScanJet 4s	COM	WDL
Visioneer	PaperPort Vx	COM	WDL

Click here to see the list of logo'd products


Compatible Input/Game

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Input/Game

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Creative Labs	Blaster GamePad	COM	WDL
Dynamics Marketing	DY ComPRO 3DEE	Game	Box
Logitech	3001 WingMan Joystick	Game	Box
Logitech	3002 WingMan Extreme Joystick	Game	Box
Spacetec IMC	Spaceball Avenger 3D Game Controller	COM	WDL
ThrustMaster	ACM Game Card	ISA	Box
ThrustMaster	Formual T1 Driving Controls	GP	Box
ThrustMaster	Mark II Flight Control System	GP	Box
ThrustMaster	Pro Flight Control System	GP	Box
ThrustMaster	Rudder Control System	GP	Box
ThrustMaster	XL Action Controller	GP	Box

Click here to see the list of logo'd products


Compatible Input/Keyboard

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Input/Keyboard

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Cirque	Cirque Glidepoint Wave Keyboard	Keyboard	Box

Click here to see the list of logo'd products


Compatible Input/Pointing Drawing

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Input/Pointing Drawing

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Cirque	Cirque Glidepoint Desktop	COM/PS2	Box
Cirque	Cirque Glidepoint Portable	COM/PS2	Box
Cirque	GlidePoint Desktop	COM	Box
Kensington Microware	Mouse-in-a-Box	COM	Box
Logitech	T-MACST2 First Trackball	COM	Box
Touche Technologies	Touche Touch Pad	PS/2	Box

Click here to see the list of logo'd products


Compatible International/German Network Adapter

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/German Network Adapter

There are no products available at this time for the hardware category you selected.

Click here to see the list of logo'd products


Compatible International/Japanese 3Mode Floppy Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese 3Mode Floppy Drive

Hardware Vendor	Device Name	Device Bus	Driver BIOS
AT&T	Globalyst 510 , 515	IDE	Box
AT&T	Globalyst 520 , 530 , 550 , 590	IDE	Box
AT&T	Globalyst 600 , 620 , 630	IDE	Box
AT&T	Wavestation/E series	IDE	Box
Canon	Innova notebook	IDE	Box
Compaq	Contura 400 series	IDE	Box
Compaq	Contura series	IDE	Box
Compaq	Deskpro series	IDE	Box
Compaq	LTE series	IDE	Box
Compaq	Presario 4/25, 4/33 series	IDE	Box
Compaq	Presario 500 series	IDE	Box
Compaq	Prolinea MT series	IDE	Box
Compaq	Prolinea series	IDE	Box
DEC	Celebris XL series	IDE	Box
DEC	HiNote/HiNote Ultra series	IDE	Box
DEC	Venturis 4xx series	IDE	Box
DEC	Venturis 5xx	IDE	Box
Fujitsu	FM PenNote L3	IDE	Box
Fujitsu	FMV-4100C2	IDE	Box
Fujitsu	FMV-4100D4	IDE	Box
Fujitsu	FMV-425D	IDE	Box
Fujitsu	FMV-425N/T1	IDE	Box
Fujitsu	FMV-425sD2	IDE	Box
Fujitsu	FMV-433D	IDE	Box
Fujitsu	FMV-433N/S1	IDE	Box
Fujitsu	FMV-433N/T2	IDE	Box
Fujitsu	FMV-433sD2	IDE	Box
Fujitsu	FMV-450N/S1	IDE	Box
Fujitsu	FMV-450NL	IDE	Box
Fujitsu	FMV-450NL/S	IDE	Box
Fujitsu	FMV-450NL/T	IDE	Box
Fujitsu	FMV-450sD2	IDE	Box
Fujitsu	FMV-450sD3	IDE	Box
Fujitsu	FMV-466C	IDE	Box
Fujitsu	FMV-466D	IDE	Box
Fujitsu	FMV-466D2	IDE	Box
Fujitsu	FMV-466D3	IDE	Box
Fujitsu	FMV-466D4	IDE	Box
Fujitsu	FMV-475N/T2	IDE	Box
Fujitsu	FMV-475NU	IDE	Box
Fujitsu	FMV-475NU/S	IDE	Box
Fujitsu	FMV-475NU/T	IDE	Box
Fujitsu	FMV-499D2	IDE	Box
Fujitsu	FMV-499D3	IDE	Box
Fujitsu	FMV-499NA/T	IDE	Box
Fujitsu	FMV-499NU/S	IDE	Box
Fujitsu	FMV-499NU/T	IDE	Box
Fujitsu	FMV-5100D4	IDE	Box
Fujitsu	FMV-5120T2	IDE	Box
Fujitsu	FMV-560D3	IDE	Box
Fujitsu	FMV-560DE	IDE	Box
Fujitsu	FMV-575D4	IDE	Box
Fujitsu	FMV-575DE2	IDE	Box
Fujitsu	FMV-575NA/T	IDE	Box
Fujitsu	FMV-575NA/X	IDE	Box
Fujitsu	FMV-590D2	IDE	Box
Fujitsu	FMV-590D3	IDE	Box
Fujitsu	FMV-590DE	IDE	Box
Fujitsu	FMV-590DE2	IDE	Box
Fujitsu	FMV-590T	IDE	Box
Fujitsu	FMV-590T2sp	IDE	Box
Fujitsu	FMV-590Tsp	IDE	Box
Hitachi	FLORA 1010DG	IDE	Box
Hitachi	FLORA 1010DG II	IDE	Box
Hitachi	FLORA 1010DJ	IDE	Box
Hitachi	FLORA 1010DJ II	IDE	Box
Hitachi	FLORA 1010DK	IDE	Box
Hitachi	FLORA 1010DL	IDE	Box
Hitachi	FLORA 1010DM	IDE	Box
Hitachi	FLORA 1010MA	IDE	Box
Hitachi	FLORA 1010NC	IDE	Box
Hitachi	FLORA 3010CT	IDE	Box
Hitachi	FLORA 3010CU	IDE	Box
Hitachi	FLORA 3010DU	IDE	Box
Hitachi	FLORA 3010DU II	IDE	Box
Hitachi	FLORA 3010DW	IDE	Box
Mitsubishi	Apricot NOTE NS M3452	IDE	Box
Mitsubishi	Apricot NOTE NS M3462	IDE	Box
Mitsubishi	Apricot NOTE NS M3472	IDE	Box
Mitsubishi	Apricot XEN-PC M3436-B model	IDE	Box
Mitsubishi	Apricot XEN-PC M3456	IDE	Box
Mitsubishi	Apricot XEN-PC M3466	IDE	Box
Oki	if Note 450	IDE	Box
Oki	if Station /DE, if Server 466/SL	IDE	Box
Oki	if Station /DL	IDE	Box
Oki	if Station 590/DG	IDE	Box
Olivetti	Echos 20 series	IDE	Box
Olivetti	Echos 40 series	IDE	Box
Olivetti	Echos 48,Echos 50 series	IDE	Box
Olivetti	Philos 40 series	IDE	Box
Panasonic	CF-32/40/41	IDE	Box
Seiko Epson	3-mode Floppy VM466R/VD466R	IDE	Box
Seiko Epson	3-mode Floppy VT512R/VT575R/VD512R/VD575R	IDE	Box
Toshiba Engineering Co.	DynaBook 486A	IDE	Box
Toshiba Engineering Co.	DynaBook 486FV	IDE	Box
Toshiba Engineering Co.	DynaBook SS/GT	IDE	Box
Toshiba Engineering Co.	J-3100 PV	IDE	Box
Toshiba Engineering Co.	J-3100 PV2/PV3000	IDE	Box
Toshiba Engineering Co.	J-3100 PV590	IDE	Box

Click here to see the list of logo'd products


Compatible International/Japanese CD-ROM Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese CD-ROM Drive

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Pioneer	DR-U124X	SCSI	Box
Pioneer	DR-UP124X	IDE	Box
Pioneer	DRM-624X	SCSI	Box

Click here to see the list of logo'd products


Compatible International/Japanese Modem

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese Modem

Hardware Vendor	Device Name	Device Bus	Driver BIOS
AIWA	PV-A12	COM	Box
AIWA	PV-A1200	COM	Box
AIWA	PV-A1200MK2	COM	Box
AIWA	PV-A1200MK3	COM	Box
AIWA	PV-A144B5	COM	Box
AIWA	PV-A2400	COM	Box
AIWA	PV-A2400MNP4	COM	Box
AIWA	PV-A24B5	COM	Box
AIWA	PV-A24MNP5	COM	Box
AIWA	PV-A24V42	COM	Box
AIWA	PV-A24V5	COM	Box
AIWA	PV-A24VM5	COM	Box
AIWA	PV-A96UB5	COM	Box
AIWA	PV-A96V42	COM	Box
AIWA	PV-A96V5	COM	Box
AIWA	PV-AF144	COM	Box
AIWA	PV-AF144V5	COM	Box
AIWA	PV-AF24V5	COM	Box
AIWA	PV-AF288	COM	Box
AIWA	PV-AFV144	COM	Box
AIWA	PV-BF144	COM	Box
AIWA	PV-BF288	COM	Box
AIWA	PV-BFV144	COM	Box
AIWA	PV-CAF144	COM	Box
AIWA	PV-F24MNP5	COM	Box
AIWA	PV-JF144	PCMCIA	Box
AIWA	PV-M12	COM	Box
AIWA	PV-M24	COM	Box
AIWA	PV-M24B5	COM	Box
AIWA	PV-M24V5	COM	Box
AIWA	PV-M24VM5	COM	Box
AIWA	PV-P24	COM	Box
AIWA	PV-PF144	COM	Box
AIWA	PV-PF24	COM	Box
AIWA	PV-PF24MK2	COM	Box
AIWA	PV-PF288	COM	Box
AIWA	PV-PFV144	COM	Box
B.U.G.	B.U.G. Linkboy (ISDN)	PCMCIA	Box
Fujitsu	FMFX-311	COM	Box
Fujitsu	FMV-411C2	COM	Box
Fujitsu	FMV-JMD311,OAFC-931	PCMCIA	Box
Fujitsu	FMV-JMD711	PCMCIA	Box
Fujitsu	FMV-JMD712	PCMCIA	Box
Fujitsu	FMV-JMD713	PCMCIA	Box
Fujitsu	FMV-MD511	COM	Box
Fujitsu	FMV-MD711	COM	Box
Fujitsu	FMV-MD731	COM	Box
Hucom	Microcom V.34 ES II	COM	Box
I-O Data Device	PCF-144	COM	Box
IBM	Data-Fax Modem 144(AT) Japan	COM	Box
IBM	Fax-Voice Modem 144(AT) Aptiva-Japan	COM	Box
IBM	PCMCIA 2400 Data Modem Japan	PCMCIA	Box
IBM	PCMCIA Data-Fax Modem(24-96) Japan	PCMCIA	Box
IBM	PCMCIA Push-Pop Modem(144) Japan	PCMCIA	Box
Integran	Megahertz XJ2144	PCMCIA	Box
Integran	MP1414F	COM	Box
Megasoft	POWER FAX 1414 (PF-1414)	COM	Box
Megasoft	STARFAX 1414 (SFA-1414)	COM	Box
Megasoft	STARFAX 9624 (SFA-9624)	COM	Box
Megasoft	STARFAX CARD 1414(SFI-1414)	PCMCIA	Box
Megasoft	STARFAX model25 (SFC-25)	COM	Box
Micro Core	MC14400FX(1)	COM	Box
Micro Core	MC14400FX(2)	COM	Box
Micro Core	MC14400VX	COM	Box
Micro Core	MC144FC5	COM	Box
Micro Core	MC144FXi	COM	Box
Micro Core	MC24FA5-P	COM	Box
Micro Core	MC24FC5	COM	Box
Micro Core	MC24PA5	COM	Box
Micro Core	MC288XL	COM	Box
NEC	AtermIT30	COM	Box
NEC	PC-9801N-J01	PCMCIA	Box
NEC	PC-9801N-J05	PCMCIA	Box
NEC	PC-9801N-J06	PCMCIA	Box
Oki	PCLINK TA/296	COM	Box
Oki	V17 V32bis JI-FAX-DATA PCMCIA Modem	PCMCIA	Box
Oki	V22bis JI-DATA PCMCIA Modem	PCMCIA	Box
Oki	V22bis JX-DATA PCMCIA Modem	PCMCIA	Box
Oki	V29 V22bis JI-FAX-DATA PCMCIA Modem	PCMCIA	Box
Oki	V29 V22bis JX-FAX-DATA PCMCIA Modem	PCMCIA	Box
Oki	V29 V22bis WX-FAX-DATA PCMCIA Modem	PCMCIA	Box
Omron	MD144FB5V	COM	Box
Omron	MD144XT10V-W	COM	Box
Omron	MD24FB10V	COM	Box
Omron	MD24FL10V	COM	Box
Omron	MD24XL10V	COM	Box
Omron	MD24XT10V	COM	Box
Omron	MD96FB5V	COM	Box
Omron	MD96XT10V-W	COM	Box
Omron	ME1414B	COM	Box
Omron	ME1414P	COM	Box
Omron	ME1414VB2(B2)	COM	Box
Omron	ME2496P	COM	Box
Omron	ME2496P2	COM	Box
Omron	ME2814B	COM	Box
Omron	MT96FS5V	COM	Box
Panasonic	TO-706C	PCMCIA	Box
Ratoc System	REX-5567&9867	PCMCIA	Box
Suntac	MS144AF	COM	Box
Suntac	MS144AVF	COM	Box
Suntac	MS144CF PCMCIA DATA-FAX Modem Card	PCMCIA	Box
Suntac	MS24A+	COM	Box
Suntac	MS288AF	COM	Box
TDK	DF1414B-M	PCMCIA	Box
TDK	DF2496B-M	PCMCIA	Box
Toshiba Engineering Co.	MDFCA00A	PCMCIA	Box

Click here to see the list of logo'd products


Compatible International/Japanese Network Adapter

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese Network Adapter

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Allied Telesis	RE2000	ISA	Box
Fujitsu	FMV-181	ISA	Box
Fujitsu	FMV-182	ISA	Box
Fujitsu	FMV-J181	PCMCIA	Box
Fujitsu	FMV-J182	PCMCIA	Box
Melco	LGY-AT	ISA	Box
Soliton	SB-AT01-T/2	ISA	Box
TDK	LANX LAN Card	ISA	Box
Toshiba Engineering Co.	ISA/Dyna Ether Adapter	ISA	Box
Toshiba Engineering Co.	PC-Card Ether Adapter	PCMCIA	Box

Click here to see the list of logo'd products


Compatible International/Japanese Printer

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese Printer

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Apple	LaserWriter II NTX-J	LPT	Box
Apple	LaserWriter Pro 400	LPT	Box
Apple	LaserWriter Pro 405	LPT	Box
Apple	LaserWriter Select 610	LPT	Box
APTi	E760 PowerLaser 2Fonts	LPT	Box
APTi	E760 PowerLaser 5Fonts	LPT	Box
Canon	BJ-10v	LPT	Box
Canon	BJ-10v Custom	LPT	Box
Canon	BJ-10v Lite	LPT	Box
Canon	BJ-10v Select	LPT	Box
Canon	BJ-130J	LPT	Box
Canon	BJ-15v	LPT	Box
Canon	BJ-15v Pro	LPT	Box
Canon	BJ-220JC	LPT	Box
Canon	BJ-220JC II	LPT	Box
Canon	BJ-220JS	LPT	Box
Canon	BJ-220JS II	LPT	Box
Canon	BJ-300J	LPT	Box
Canon	BJ-30v	LPT	Box
Canon	BJ-330J	LPT	Box
Canon	BJC-35v	LPT	Box
Canon	BJC-400J	LPT	Box
Canon	BJC-600J	LPT	Box
Canon	BJC-680J ESC/P 2	LPT	Box
Canon	BJC-680J LIPS4c	LPT	Box
Canon	BJC-820J	LPT	Box
Canon	BJC-880J LIPS4c	LPT	Box
Canon	LBP-5585i	LPT	Box
Canon	LBP-730 LIPS4	LPT	Box
Canon	LBP-A304E LIPS3	LPT	Box
Canon	LBP-A304E2 LIPS3	LPT	Box
Canon	LBP-A304G2 LIPS3	LPT	Box
Canon	LBP-A309G2 LIPS3	LPT	Box
Canon	LBP-A404 LIPS2	LPT	Box
Canon	LBP-A404 LIPS3	LPT	Box
Canon	LBP-A404E LIPS3	LPT	Box
Canon	LBP-A404F LIPS3	LPT	Box
Canon	LBP-A404G2 LIPS3	LPT	Box
Canon	LBP-A404PS	LPT	Box
Canon	LBP-A404PS Lite	LPT	Box
Canon	LBP-A405Jr. LIPS3	LPT	Box
Canon	LBP-A408 LIPS2	LPT	Box
Canon	LBP-B406 LIPS2	LPT	Box
Canon	LBP-B406D LIPS2	LPT	Box
Canon	LBP-B406D LIPS3	LPT	Box
Canon	LBP-B406E LIPS3	LPT	Box
Canon	LBP-B406E2 LIPS3	LPT	Box
Canon	LBP-B406G LIPS3	LPT	Box
Canon	LBP-B406G2 LIPS3	LPT	Box
Canon	LBP-B406PS	LPT	Box
Canon	LBP-B406PS Lite	LPT	Box
Canon	LBP-B406S LIPS2	LPT	Box
Canon	LBP-B406S LIPS3	LPT	Box
Canon	PS-GP Unit Kanji	LPT	Box
Canon	PS-IPU Color Laser Copier	LPT	Box
Canon	PS-JET Color BJ Copier	LPT	Box
Casio	CP-2100	LPT	Box
Casio	CP-2120	LPT	Box
Casio	CP-2150	LPT	Box
Casio	CP-2200	LPT	Box
Casio	CP-2200W	LPT	Box
Casio	CP-3250	LPT	Box
Casio	CP-3500	LPT	Box
Casio	CP-500S	LPT	Box
Casio	CP-500U	LPT	Box
Dainippon_Screen	ColorSysAM	LPT	Box
Dainippon_Screen	ColorSysAM (7JFonts)	LPT	Box
Dainippon_Screen	DT-R1035AM	LPT	Box
Dainippon_Screen	DT-R1035AM (7JFonts)	LPT	Box
Dainippon_Screen	DT-R1065AM	LPT	Box
Dainippon_Screen	DT-R1065AM (7JFonts)	LPT	Box
Dainippon_Screen	DT-R2035AM	LPT	Box
Dainippon_Screen	DT-R2035AM (7JFonts)	LPT	Box
Dainippon_Screen	DT-R2065AM	LPT	Box
Dainippon_Screen	DT-R2065AM (7JFonts)	LPT	Box
Dainippon_Screen	FP-350JAM	LPT	Box
Dainippon_Screen	FP-350JAM (2JFonts)	LPT	Box
Dainippon_Screen	FT-R1035AM	LPT	Box
Dainippon_Screen	FT-R1035AM (7JFonts)	LPT	Box
Dainippon_Screen	FT-R1050AM	LPT	Box
Dainippon_Screen	FT-R1050AM (7JFonts)	LPT	Box
Dainippon_Screen	MonoSysAM	LPT	Box
Dainippon_Screen	MonoSysAM (7JFonts)	LPT	Box
Dainippon_Screen	MT-R1080AM	LPT	Box
Dainippon_Screen	MT-R1080AM (7JFonts)	LPT	Box
Dainippon_Screen	MT-R1100AM	LPT	Box
Dainippon_Screen	MT-R1100AM (7JFonts)	LPT	Box
Dainippon_Screen	MT-R1120AM	LPT	Box
Dainippon_Screen	MT-R1120AM (7JFonts)	LPT	Box
Dainippon_Screen	PI-R1080AM	LPT	Box
Dainippon_Screen	PI-R1080AM (7JFonts)	LPT	Box
Dainippon_Screen	SDP-2600AM	LPT	Box
Dainippon_Screen	SDP-2600AM (7JFonts)	LPT	Box
DEC	DEClaser 5100/Net	LPT	Box
DEC	LN82R-AJ	LPT	Box
DEC	PrintServer 17/J F2	LPT	Box
DEC	PrintServer 17/J F2/Net	LPT	Box
DEC	PrintServer 17/J F5	LPT	Box
DEC	PrintServer 17/J F5/Net	LPT	Box
DEC	PrintServer 17/J F7	LPT	Box
DEC	PrintServer 17/J F7/Net	LPT	Box
DEC	PrintServer 32/J	LPT	Box
DEC	PrintServer 32/J/Net	LPT	Box
DEC	PrintServer 40 Plus/J	LPT	Box
DEC	PrintServer40Plus/J/Net	LPT	Box
DEC	Turbo PrintServer 20/J	LPT	Box
DEC	TurboPrintServer20J/Net	LPT	Box
Epson	AP-1000	LPT	Box
Epson	AP-1000V2	LPT	Box
Epson	AP-300	LPT	Box
Epson	AP-400V2	LPT	Box
Epson	AP-500	LPT	Box
Epson	AP-550	LPT	Box
Epson	AP-550EX	LPT	Box
Epson	AP-600	LPT	Box
Epson	AP-700	LPT	Box
Epson	AP-800	LPT	Box
Epson	AP-850	LPT	Box
Epson	AP-900	LPT	Box
Epson	FBP-3000	LPT	Box
Epson	HG-2000	LPT	Box
Epson	HG-2550	LPT	Box
Epson	HG-3000	LPT	Box
Epson	HG-4000	LPT	Box
Epson	HG-4800	LPT	Box
Epson	HG-5130	LPT	Box
Epson	HG-800	LPT	Box
Epson	LP-1500	LPT	Box
Epson	LP-1500S	LPT	Box
Epson	LP-1600	LPT	Box
Epson	LP-2000	LPT	Box
Epson	LP-3000	LPT	Box
Epson	LP-3000PS F2	LPT	Box
Epson	LP-3000PS F5	LPT	Box
Epson	LP-7000	LPT	Box
Epson	LP-7000G	LPT	Box
Epson	LP-8000	LPT	Box
Epson	LP-8000S	LPT	Box
Epson	LP-8000SE	LPT	Box
Epson	LP-8000SX	LPT	Box
Epson	LP-8500	LPT	Box
Epson	LP-9000	LPT	Box
Epson	LP-9000PS2 F2	LPT	Box
Epson	LP-9000PS2 F5	LPT	Box
Epson	LP-9100PS2 F2	LPT	Box
Epson	LP-9100PS2 F5	LPT	Box
Epson	MJ-1000	LPT	Box
Epson	MJ-1000V2	LPT	Box
Epson	MJ-1010	LPT	Box
Epson	MJ-1050	LPT	Box
Epson	MJ-1050V2	LPT	Box
Epson	MJ-400	LPT	Box
Epson	MJ-450	LPT	Box
Epson	MJ-500	LPT	Box
Epson	MJ-5000C	LPT	Box
Epson	MJ-500V2	LPT	Box
Epson	MJ-700V2C	LPT	Box
Epson	VP-1000	LPT	Box
Epson	VP-1047	LPT	Box
Epson	VP-1100	LPT	Box
Epson	VP-1350	LPT	Box
Epson	VP-1500	LPT	Box
Epson	VP-1600	LPT	Box
Epson	VP-1700	LPT	Box
Epson	VP-2000	LPT	Box
Epson	VP-2050	LPT	Box
Epson	VP-2061	LPT	Box
Epson	VP-2600	LPT	Box
Epson	VP-300	LPT	Box
Epson	VP-3000	LPT	Box
Epson	VP-4000	LPT	Box
Epson	VP-4800	LPT	Box
Epson	VP-500	LPT	Box
Epson	VP-5000	LPT	Box
Epson	VP-5074	LPT	Box
Epson	VP-5085	LPT	Box
Epson	VP-5150F	LPT	Box
Epson	VP-550	LPT	Box
Epson	VP-600	LPT	Box
Epson	VP-6000	LPT	Box
Epson	VP-800	LPT	Box
Epson	VP-850	LPT	Box
Epson	VP-870	LPT	Box
Epson	VP-900	LPT	Box
Epson	VP-950	LPT	Box
Epson	VP-960	LPT	Box
Epson	XP-2000	LPT	Box
Fuji_Xerox	4150PS J2	LPT	Box
Fuji_Xerox	4150PS J5	LPT	Box
Fuji_Xerox	4160 J2	LPT	Box
Fuji_Xerox	4160 J5	LPT	Box
Fuji_Xerox	A color SM ICS	LPT	Box
Fuji_Xerox	DocuStation DP300	LPT	Box
Fujitsu	ESC/P	LPT	Box
Fujitsu	FMJP-101G	LPT	Box
Fujitsu	FMJP-211	LPT	Box
Fujitsu	FMLBP	LPT	Box
Fujitsu	FMLBP101	LPT	Box
Fujitsu	FMLBP102	LPT	Box
Fujitsu	FMLBP111	LPT	Box
Fujitsu	FMLBP112	LPT	Box
Fujitsu	FMLBP114	LPT	Box
Fujitsu	FMLBP114A	LPT	Box
Fujitsu	FMLBP115	LPT	Box
Fujitsu	FMLBP115A	LPT	Box
Fujitsu	FMLBP121	LPT	Box
Fujitsu	FMLBP211PS	LPT	Box
Fujitsu	FMLBP211PS FMLBP	LPT	Box
Fujitsu	FMLBP212	LPT	Box
Fujitsu	FMLBP212A	LPT	Box
Fujitsu	FMLBP222	LPT	Box
Fujitsu	FMLBP222A	LPT	Box
Fujitsu	FMLBP223D	LPT	Box
Fujitsu	FMLBP223D2	LPT	Box
Fujitsu	FMLBP224	LPT	Box
Fujitsu	FMLBP225PS 2Fonts	LPT	Box
Fujitsu	FMLBP225PS 5Fonts	LPT	Box
Fujitsu	FMLBP226	LPT	Box
Fujitsu	FMLBP227	LPT	Box
Fujitsu	FMLP-351	LPT	Box
Fujitsu	FMLP-371E	LPT	Box
Fujitsu	FMP-PR121G	LPT	Box
Fujitsu	FMPR 180	LPT	Box
Fujitsu	FMPR 360	LPT	Box
Fujitsu	FMPR-101B	LPT	Box
Fujitsu	FMPR-101W	LPT	Box
Fujitsu	FMPR-102G	LPT	Box
Fujitsu	FMPR-204B	LPT	Box
Fujitsu	FMPR-204W	LPT	Box
Fujitsu	FMPR-221G	LPT	Box
Fujitsu	FMPR-302A2	LPT	Box
Fujitsu	FMPR-302G2	LPT	Box
Fujitsu	FMPR-303G	LPT	Box
Fujitsu	FMPR-353A2	LPT	Box
Fujitsu	FMPR-353G2	LPT	Box
Fujitsu	FMPR-359F1	LPT	Box
Fujitsu	FMPR-361	LPT	Box
Fujitsu	FMPR-366	LPT	Box
Fujitsu	FMPR-371A	LPT	Box
Fujitsu	FMPR-372	LPT	Box
Fujitsu	FMPR-373	LPT	Box
Fujitsu	FMPR-374	LPT	Box
Fujitsu	FMPR-375E	LPT	Box
Fujitsu	FMPR-455	LPT	Box
Fujitsu	FMPR-456	LPT	Box
Fujitsu	FMPR-601	LPT	Box
Fujitsu	FMPR-654	LPT	Box
Fujitsu	FMPR-671	LPT	Box
Fujitsu	FMPR-672	LPT	Box
Fujitsu	XL-2000W	LPT	Box
Fujitsu	XL-5000	LPT	Box
Fujitsu	XL-5100	LPT	Box
Fujitsu	XL-5600	LPT	Box
Hewlett-Packard	DeskJet 300J	LPT	Box
Hewlett-Packard	DeskJet 500J	LPT	Box
Hewlett-Packard	DeskJet 505J	LPT	Box
Hewlett-Packard	DeskJet 560J	LPT	Box
Hewlett-Packard	LaserJet 4LJ Pro	LPT	Box
Hewlett-Packard	LaserJet 4PJ	LPT	Box
IBM	5573-G02	LPT	Box
IBM	5573-H02	LPT	Box
IBM	5575-B02/F02/H02	LPT	Box
IBM	5577-B02/F02/G02/H02	LPT	Box
IBM	5577-J02/K02	LPT	Box
IBM	5579-H02/K02	LPT	Box
IBM	5584-G02/H02	LPT	Box
IBM	5585-H01	LPT	Box
IBM	5587-H01	LPT	Box
IBM	5588-H02	LPT	Box
IBM	5589-H01	LPT	Box
Kodak	ColorEase PS Printer	LPT	Box
Kyocera	L-1500	LPT	Box
Kyocera	L-580	LPT	Box
Kyocera	L-780	LPT	Box
Kyocera	L-880	LPT	Box
Kyocera	L-880S	LPT	Box
Kyocera	L-980	LPT	Box
Kyocera	LS-1550	LPT	Box
Kyocera	LS-3500	LPT	Box
Kyocera	LS-3550	LPT	Box
Kyocera	LS-6500	LPT	Box
Linotype-Hell	Herkules PMJ	LPT	Box
Linotype-Hell	Linotronic 200_230J	LPT	Box
Linotype-Hell	Linotronic 260J	LPT	Box
Linotype-Hell	Linotronic 300J	LPT	Box
Linotype-Hell	Linotronic 330J	LPT	Box
Linotype-Hell	Linotronic 500J	LPT	Box
Linotype-Hell	Linotronic 530J	LPT	Box
Linotype-Hell	Linotronic 560J	LPT	Box
Linotype-Hell	Linotronic 630_630JP	LPT	Box
Linotype-Hell	Linotronic 830J	LPT	Box
Linotype-Hell	Linotronic 930J	LPT	Box
Linotype-Hell	Linotronic PR60J	LPT	Box
Linotype-Hell	QuasarJ	LPT	Box
NEC	MultiWriter 1000EW NPDL2	LPT	Box
NEC	MultiWriter 1000EW WPS	LPT	Box
NEC	MultiWriter 2000E NPDL2	LPT	Box
NEC	MultiWriter 2000E WPS	LPT	Box
NEC	MultiWriter 2000FW NPDL2	LPT	Box
NEC	MultiWriter 2000FW WPS	LPT	Box
NEC	MultiWriter 2200NW NPDL2	LPT	Box
NEC	MultiWriter 2200NW WPS	LPT	Box
NEC	NM-2010	LPT	Box
NEC	NM-4150	LPT	Box
NEC	NM-5020/5020L	LPT	Box
NEC	NM-9700	LPT	Box
NEC	NM-9900	LPT	Box
NEC	NM-9950/9950II	LPT	Box
NEC	PC-PR100/40	LPT	Box
NEC	PC-PR1000	LPT	Box
NEC	PC-PR1000/2	LPT	Box
NEC	PC-PR1000/4	LPT	Box
NEC	PC-PR1000/4R	LPT	Box
NEC	PC-PR1000E/4	LPT	Box
NEC	PC-PR1000E/4W NPDL2	LPT	Box
NEC	PC-PR1000FX/4	LPT	Box
NEC	PC-PR101	LPT	Box
NEC	PC-PR101/60	LPT	Box
NEC	PC-PR101/63	LPT	Box
NEC	PC-PR101/J110	LPT	Box
NEC	PC-PR101/J110R	LPT	Box
NEC	PC-PR101/J180	LPT	Box
NEC	PC-PR101/T103	LPT	Box
NEC	PC-PR101/T165	LPT	Box
NEC	PC-PR101/T165A	LPT	Box
NEC	PC-PR101/T165R	LPT	Box
NEC	PC-PR101/T67	LPT	Box
NEC	PC-PR101/TN103	LPT	Box
NEC	PC-PR101/TN103A	LPT	Box
NEC	PC-PR101/TN103R	LPT	Box
NEC	PC-PR101E	LPT	Box
NEC	PC-PR101E2	LPT	Box
NEC	PC-PR101F	LPT	Box
NEC	PC-PR101F2	LPT	Box
NEC	PC-PR101G	LPT	Box
NEC	PC-PR101G2	LPT	Box
NEC	PC-PR101GS	LPT	Box
NEC	PC-PR101L	LPT	Box
NEC	PC-PR150N	LPT	Box
NEC	PC-PR150T	LPT	Box
NEC	PC-PR150V	LPT	Box
NEC	PC-PR150VH	LPT	Box
NEC	PC-PR150VL	LPT	Box
NEC	PC-PR2000	LPT	Box
NEC	PC-PR2000/2	LPT	Box
NEC	PC-PR2000/4	LPT	Box
NEC	PC-PR2000/4R NPDL2	LPT	Box
NEC	PC-PR2000/4R WPS	LPT	Box
NEC	PC-PR2000/4W NPDL2	LPT	Box
NEC	PC-PR2000/4W WPS	LPT	Box
NEC	PC-PR2000/6W NPDL2	LPT	Box
NEC	PC-PR2000/6W WPS	LPT	Box
NEC	PC-PR201	LPT	Box
NEC	PC-PR201/40	LPT	Box
NEC	PC-PR201/45	LPT	Box
NEC	PC-PR201/45L	LPT	Box
NEC	PC-PR201/47	LPT	Box
NEC	PC-PR201/60	LPT	Box
NEC	PC-PR201/60A	LPT	Box
NEC	PC-PR201/63	LPT	Box
NEC	PC-PR201/63A	LPT	Box
NEC	PC-PR201/65	LPT	Box
NEC	PC-PR201/65A	LPT	Box
NEC	PC-PR201/65LA	LPT	Box
NEC	PC-PR201/80A	LPT	Box
NEC	PC-PR201/80LA	LPT	Box
NEC	PC-PR201/87LA	LPT	Box
NEC	PC-PR201/T180	LPT	Box
NEC	PC-PR201/TC100	LPT	Box
NEC	PC-PR201B	LPT	Box
NEC	PC-PR201CL	LPT	Box
NEC	PC-PR201F	LPT	Box
NEC	PC-PR201F2	LPT	Box
NEC	PC-PR201G	LPT	Box
NEC	PC-PR201GS	LPT	Box
NEC	PC-PR201H	LPT	Box
NEC	PC-PR201H2	LPT	Box
NEC	PC-PR201H3	LPT	Box
NEC	PC-PR201HC	LPT	Box
NEC	PC-PR201J	LPT	Box
NEC	PC-PR201V	LPT	Box
NEC	PC-PR201V2	LPT	Box
NEC	PC-PR201X	LPT	Box
NEC	PC-PR3000PS	LPT	Box
NEC	PC-PR3000PS/4	LPT	Box
NEC	PC-PR3000PS/4F	LPT	Box
NEC	PC-PR350	LPT	Box
NEC	PC-PR4000/4	LPT	Box
NEC	PC-PR4000E/4	LPT	Box
NEC	PC-PR601	LPT	Box
NEC	PC-PR602	LPT	Box
NEC	PC-PR602PS	LPT	Box
NEC	PC-PR602R	LPT	Box
NEC	PC-PR700/55A	LPT	Box
NEC	PC-PR700J	LPT	Box
NEC	PC-PR700X	LPT	Box
NEC	PC-PR750/150	LPT	Box
NEC	PC-PR800PS/3	LPT	Box
NEC	PC-PR820/3	LPT	Box
NEC	WPS Printer	LPT	Box
OKI	ET-5320SL	LPT	Box
OKI	ET-5330S	LPT	Box
OKI	ET-5350	LPT	Box
OKI	ET-8345S	LPT	Box
OKI	ET-8350S	LPT	Box
OKI	ET-8370	LPT	Box
OKI	ET-8370S	LPT	Box
OKI	ET-8560S	LPT	Box
OKI	ET-8570	LPT	Box
OKI	Microline 400	LPT	Box
OKI	Microline 400CL	LPT	Box
OKI	Microline 400PSII	LPT	Box
OKI	Microline 5320SE	LPT	Box
OKI	Microline 5320SV	LPT	Box
OKI	Microline 800PSII LT	LPT	Box
OKI	Microline 801PS	LPT	Box
OKI	Microline 801PS+F	LPT	Box
OKI	Microline 801PSII	LPT	Box
OKI	Microline 801PSII+F	LPT	Box
OKI	Microline 802PSII	LPT	Box
OKI	Microline 802PSII+F	LPT	Box
OKI	Microline 803PSII	LPT	Box
OKI	Microline 803PSII+F	LPT	Box
OKI	Microline 810PSII LT	LPT	Box
OKI	Microline 8340SE	LPT	Box
OKI	Microline 8340SV	LPT	Box
Oki	Microline 8350SE	LPT	Box
Oki	Microline 8370SE	LPT	Box
OKI	Microline 8370SV	LPT	Box
OKI	OPP6008AII	LPT	Box
OKI	OPP6008PS	LPT	Box
QMS	1060 (Kanji F2)	LPT	Box
QMS	1660 (Kanji F2)	LPT	Box
QMS	1660 (Kanji F6)	LPT	Box
QMS	1725 (Kanji F6)	LPT	Box
QMS	2025 (Kanji F6)	LPT	Box
QMS	3225 (Kanji F6)	LPT	Box
QMS	860 (Kanji F2)	LPT	Box
QMS	860 (Kanji F6)	LPT	Box
QMS	CS210 (Kanji F6)	LPT	Box
QMS	CS230 (Kanji F6)	LPT	Box
QMS	CSL1000 (Kanji F6)	LPT	Box
QMS	Magicolor (Kanji F2)	LPT	Box
QMS	Magicolor (Kanji F6)	LPT	Box
Ricoh	CJ-720	LPT	Box
Ricoh	Fiery 200i-PRETER	LPT	Box
Ricoh	IMAGIO 530/PJ2	LPT	Box
Ricoh	IMAGIO 530/PJ5	LPT	Box
Ricoh	IMAGIO MF-P250(T) RPDL	LPT	Box
Ricoh	Imagio MF-P250(T) RPS	LPT	Box
Ricoh	IMAGIO MF-P355 RPDL	LPT	Box
Ricoh	Imagio MF-P355 RPS	LPT	Box
Ricoh	IMAGIO MF150 RPDL	LPT	Box
Ricoh	IMAGIO MF150e RPDL	LPT	Box
Ricoh	IMAGIO MF530 RPDL	LPT	Box
Ricoh	LP7200-UX	LPT	Box
Ricoh	PC CONTROLLER RPS	LPT	Box
Ricoh	PRETER TYPE A	LPT	Box
Ricoh	PRETER TYPE B	LPT	Box
Ricoh	SP-10PS Pro RPDL	LPT	Box
Ricoh	SP-10PS Pro RPS	LPT	Box
Ricoh	SP-10PS Pro/6F RPDL	LPT	Box
Ricoh	SP-10PS Pro/6F RPS	LPT	Box
Ricoh	SP-10PS RPDL	LPT	Box
Ricoh	SP-10PS RPS	LPT	Box
Ricoh	SP-10PSmkII 3F RPS	LPT	Box
Ricoh	SP-10PSmkII 6F RPS	LPT	Box
Ricoh	SP-10PSmkII(D)/3F RPDL	LPT	Box
Ricoh	SP-10PSmkII(D)/6F RPDL	LPT	Box
Ricoh	SP2000	LPT	Box
Ricoh	SP2100	LPT	Box
Ricoh	SP2200	LPT	Box
Ricoh	SP4mkII(+) RPDL	LPT	Box
Ricoh	SP5(+) RPDL	LPT	Box
Ricoh	SP7 RPDL	LPT	Box
Ricoh	SP7mkII(D) RPDL	LPT	Box
Ricoh	SP8 RPDL	LPT	Box
Ricoh	SP80 RPDL	LPT	Box
Ricoh	SP8mkII(D) RPDL	LPT	Box
Ricoh	SP9 RPDL	LPT	Box
Sanyo	SPX-406J	LPT	Box
SII	ColorPoint PSJ	LPT	Box
SII	ColorPoint2 PSFJ	LPT	Box
SII	ColorPoint2 PSFJ-7	LPT	Box
Sony/Tektronix	Phaser 140	LPT	Box
Sony/Tektronix	Phaser 140J 2JF	LPT	Box
Sony/Tektronix	Phaser 200e 39(4)	LPT	Box
Sony/Tektronix	Phaser 200J 0JF (2)	LPT	Box
Sony/Tektronix	Phaser 200J 2JF (2)	LPT	Box
Sony/Tektronix	Phaser 200J 5JF (2)	LPT	Box
Sony/Tektronix	Phaser 220e 39	LPT	Box
Sony/Tektronix	Phaser 220J 0JF	LPT	Box
Sony/Tektronix	Phaser 220J 2JF	LPT	Box
Sony/Tektronix	Phaser 220J 5JF	LPT	Box
Sony/Tektronix	Phaser 300J 0JF	LPT	Box
Sony/Tektronix	Phaser 300J 2JF	LPT	Box
Sony/Tektronix	Phaser 300J 5JF	LPT	Box
Sony/Tektronix	Phaser 340J 0JF	LPT	Box
Sony/Tektronix	Phaser 340J 2JF	LPT	Box
Sony/Tektronix	Phaser 340J 5JF	LPT	Box
Sony/Tektronix	Phaser 340PJ 0JF	LPT	Box
Sony/Tektronix	Phaser 340PJ 2JF	LPT	Box
Sony/Tektronix	Phaser 340PJ 5JF	LPT	Box
Sony/Tektronix	Phaser 440J 0JF	LPT	Box
Sony/Tektronix	Phaser 440J 2JF	LPT	Box
Sony/Tektronix	Phaser 440J 5JF	LPT	Box
Sony/Tektronix	Phaser 480J 0JF	LPT	Box
Sony/Tektronix	Phaser 480J 2JF	LPT	Box
Sony/Tektronix	Phaser 480J 5JF	LPT	Box
Sony/Tektronix	Phaser 540J 0JF	LPT	Box
Sony/Tektronix	Phaser 540J 2JF	LPT	Box
Sony/Tektronix	Phaser 540J 5JF	LPT	Box
Sony/Tektronix	Phaser II PXe 17	LPT	Box
Sony/Tektronix	Phaser II PXe 39	LPT	Box
Sony/Tektronix	Phaser II PXiJ 0JF	LPT	Box
Sony/Tektronix	Phaser II PXiJ 2JF	LPT	Box
Sony/Tektronix	Phaser II PXiJ 5JF	LPT	Box
Sony/Tektronix	Phaser III PXiJ(2)0JF	LPT	Box
Sony/Tektronix	Phaser III PXiJ(2)2JF	LPT	Box
Sony/Tektronix	Phaser III PXiJ(2)5JF	LPT	Box
Sony/Tektronix	Phaser IISD	LPT	Box
Sony/Tektronix	Phaser IISDJ 0JF	LPT	Box
Sony/Tektronix	Phaser IISDJ 2JF	LPT	Box
Sony/Tektronix	Phaser IISDJ 5JF	LPT	Box
Star	Star BR-2415	LPT	Box
Star	Star CR-3410CL ESC/P	LPT	Box
Star	Star CR-3415CL ESC/P	LPT	Box
Star	Star JJ-100A ESC/P	LPT	Box
Star	Star JP-100	LPT	Box
Star	Star JP-200	LPT	Box
Star	Star JR-100 ESC/P	LPT	Box
Star	Star JR-100CL ESC/P	LPT	Box
Star	Star JR-200 ESC/P	LPT	Box
Star	Star JR-200CL ESC/P	LPT	Box
Star	Star JS-1001CL ESC/P	LPT	Box
Star	Star JS-1002CL ESC/P	LPT	Box
Star	Star JS-2001CL ESC/P	LPT	Box
Star	Star JS-2002CL ESC/P	LPT	Box
Star	Star JT-100CL ESC/P	LPT	Box
Star	Star LS-5TT	LPT	Box
Toshiba Engineering Co.	J31DHP01	LPT	Box
Toshiba Engineering Co.	J31DHP02	LPT	Box
Toshiba Engineering Co.	J31DMP01 ESC/P	LPT	Box
Toshiba Engineering Co.	J31DMP02 ESC/P	LPT	Box
Toshiba Engineering Co.	J31DMP03 ESC/P	LPT	Box
Toshiba Engineering Co.	J31DMP04 ESC/P	LPT	Box
Toshiba Engineering Co.	J31DMP05 ESC/P	LPT	Box
Toshiba Engineering Co.	J31DMP06 ESC/P	LPT	Box
Toshiba Engineering Co.	J31DPR01	LPT	Box
Toshiba Engineering Co.	J31DPR02	LPT	Box
Toshiba Engineering Co.	J31DPR03	LPT	Box
Toshiba Engineering Co.	J31IJP01	LPT	Box
Toshiba Engineering Co.	J31LBP01 201PL	LPT	Box
Toshiba Engineering Co.	J31LBP01 ESC/P	LPT	Box
Toshiba Engineering Co.	J31LBP02	LPT	Box
Toshiba Engineering Co.	J31LBP03	LPT	Box
Toshiba Engineering Co.	PPRA3001	LPT	Box
Toshiba Engineering Co.	PPRA3002	LPT	Box
Toshiba Engineering Co.	PPRA4002	LPT	Box

Click here to see the list of logo'd products


Compatible International/Japanese Removable Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Japanese Removable Drive

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Fujitsu	M2512A2FL	SCSI	Box
Olympus/Deltis	MOS1300	SCSI	Box
Olympus/Deltis	MOS321	SCSI	Box
Panasonic	LF-3200JD	SCSI	Box
Toshiba Engineering Co.	OD-S370A	SCSI	Box

Click here to see the list of logo'd products


Compatible International/Korean Printer

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Korean Printer

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Daewoo	DLP-400E	LPT	Box
Daewoo	DLP-6000	LPT	Box
First Technology	JP-3300	LPT	Box
First Technology	JP-3311	LPT	Box
First Technology	JP-3400	LPT	Box
First Technology	JP-4500	LPT	Box
First Technology	JP-5600	LPT	Box
First Technology	JP-B250	LPT	Box
First Technology	JP-B330	LPT	Box
First Technology	JP-L300	LPT	Box
First Technology	JP-L300SF	LPT	Box
First Technology	JP-L500	LPT	Box
First Technology	JP-L500SF	LPT	Box
First Technology	JP-L600	LPT	Box
First Technology	JP-L600SF	LPT	Box
Hewlett-Packard	7470A	LPT	Box
Hewlett-Packard	7475A	LPT	Box
Hewlett-Packard	7550A	LPT	Box
Hewlett-Packard	7580A	LPT	Box
Hewlett-Packard	7580B	LPT	Box
Hewlett-Packard	7585A	LPT	Box
Hewlett-Packard	7585B	LPT	Box
Hewlett-Packard	7586B	LPT	Box
Hewlett-Packard	Color LaserJet (MS)	LPT	Box
Hewlett-Packard	ColorPro	LPT	Box
Hewlett-Packard	ColorPro with GEC	LPT	Box
Hewlett-Packard	DeskJet 1200C (MS)	LPT	Box
Hewlett-Packard	DeskJet 310	LPT	Box
Hewlett-Packard	DeskJet 320	LPT	Box
Hewlett-Packard	DeskJet 500C	LPT	Box
Hewlett-Packard	DeskJet 500K	LPT	Box
Hewlett-Packard	DeskJet 505K	LPT	Box
Hewlett-Packard	DeskJet 520	LPT	Box
Hewlett-Packard	DeskJet 550C	LPT	Box
Hewlett-Packard	DeskJet 560C	LPT	Box
Hewlett-Packard	DeskJet 560K	LPT	Box
Hewlett-Packard	DeskJet Portable	LPT	Box
Hewlett-Packard	DraftMaster I	LPT	Box
Hewlett-Packard	DraftMaster II	LPT	Box
Hewlett-Packard	DraftPro	LPT	Box
Hewlett-Packard	DraftPro DXL	LPT	Box
Hewlett-Packard	DraftPro EXL	LPT	Box
Hewlett-Packard	LaserJet 4P/4MP PostScript	LPT	Box
Hewlett-Packard	LaserJet 4Si/4SiMX PS	LPT	Box
Hewlett-Packard	LaserJet 5P/5MP PostScript	LPT	Box
Hewlett-Packard	LaserJet IID PS Cartridge	LPT	Box
Hewlett-Packard	LaserJet III PostScript+	LPT	Box
Hewlett-Packard	LaserJet III PS Cartridge	LPT	Box
Hewlett-Packard	LaserJet IIID PostScript+	LPT	Box
Hewlett-Packard	LaserJet IIID PS Cartridge	LPT	Box
Hewlett-Packard	LaserJet IIIP PostScript+	LPT	Box
Hewlett-Packard	LaserJet IIIP PS Cartridge	LPT	Box
Hewlett-Packard	LaserJet IIP PS Cartridge	LPT	Box
Hewlett-Packard	PaintJet XL 300	LPT	Box
Hewlett-Packard	PaintJet XL300 PostScript	LPT	Box
Hyper Tech	HL-550	LPT	Box
Hyper Tech	HL-550s	LPT	Box
LG Electronics	GLP-1150	LPT	Box
LG Electronics	GLP-1250	LPT	Box
LG Electronics	GLP-1450	LPT	Box
LG Electronics	GLP-1550	LPT	Box
LG Electronics	GLP-630	LPT	Box
LG Electronics	GLP-660	LPT	Box
LG Electronics	PRT-2750	LPT	Box
LG Electronics	PRT-2950	LPT	Box
LG Electronics	PRT-3750N	LPT	Box
LG Electronics	PRT-3950	LPT	Box
LG Electronics	PRT-5750	LPT	Box
LG Electronics	PRT-5850U	LPT	Box
Lotte Cannon	BJ-10e	LPT	Box
Lotte Cannon	BJ-10ex	LPT	Box
Lotte Cannon	BJ-15k	LPT	Box
Lotte Cannon	BJ-20	LPT	Box
Lotte Cannon	BJ-230	LPT	Box
Lotte Cannon	BJ-230K	LPT	Box
Lotte Cannon	BJ-330	LPT	Box
Lotte Cannon	BJ-330K	LPT	Box
Lotte Cannon	BJC-600	LPT	Box
Lotte Cannon	BJC-800	LPT	Box
Posdata	POS-LBP3000	LPT	Box
Posdata	POS-LBP4000	LPT	Box
Qnix	QBJ 3630A	LPT	Box
Qnix	QBJ 3630B	LPT	Box
Qnix	QBJ 3630E	LPT	Box
Qnix	QLBP LS	LPT	Box
Qnix	QLBP SF I	LPT	Box
Qnix	QLBP SF I+	LPT	Box
Qnix	QLBP SF II	LPT	Box
Qnix	QLBP SF II+	LPT	Box
Qnix	QLBP SF III	LPT	Box
Qnix	QLBP SF IIIg	LPT	Box
Qnix	QP180	LPT	Box
Qnix	QP2100	LPT	Box
Qnix	QP2700	LPT	Box
Qnix	QP3100	LPT	Box
Qnix	QP3300	LPT	Box
Qnix	QP4800	LPT	Box
Samsung	Finale  5000+ (3205H/E)	LPT	Box
Samsung	Finale  8000+ (3208H/E)	LPT	Box
Samsung	MyLaser II-5 (3105V)	LPT	Box
Samsung	MyLaser II-5 (3105V+)	LPT	Box
Samsung	MyLaser II-8 (3108H)	LPT	Box
Samsung	SP-2411HW	LPT	Box
Samsung	SP-2412HW	LPT	Box
Samsung	SP-2417HW	LPT	Box
Samsung	SP-2421HW	LPT	Box
Samsung	SP-2422HW	LPT	Box
Samsung	SP-2433HW	LPT	Box
Samsung	SP-4011	LPT	Box
Samsung	SP-4012	LPT	Box
Samsung	SP-4017	LPT	Box
Samsung	SP-4021	LPT	Box
Samsung	SP-4022	LPT	Box
Samsung	SP-4033	LPT	Box
Sindoricho	ExecJet 4072	LPT	Box
Sindoricho	ExecJet 4076 II C	LPT	Box
Sindoricho	LP1220S	LPT	Box
Sindoricho	LP1230S	LPT	Box
Sindoricho	LP4037-5E	LPT	Box
Sindoricho	LP4039-10R	LPT	Box
Sindoricho	LP4039-12R	LPT	Box
Sindoricho	LP4039-16L	LPT	Box
SsangYong	Laser-Art	LPT	Box
SsangYong	Page-Art SP-3101	LPT	Box
SsangYong	Page-Art SP-3200V	LPT	Box
SsangYong	Page-Art SP-4301	LPT	Box
SsangYong	Page-Art SP-4400V	LPT	Box
Sunjin Tech	Atlas T-604	LPT	Box
Sunjin Tech	Atlas X-11	LPT	Box
Sunjin Tech	Atlas X-15	LPT	Box
Trigem	DLQ-4000H	LPT	Box
Trigem	EP-2000	LPT	Box
Trigem	GP-2800	LPT	Box
Trigem	GP-2800P	LPT	Box
Trigem	LQ-1270H	LPT	Box
Trigem	LQ-1550H	LPT	Box
Trigem	LQ-1550H+	LPT	Box
Trigem	LQ-1570H	LPT	Box
Trigem	LQ-2500H	LPT	Box
Trigem	LQ-2550H	LPT	Box
Trigem	LQ-3000H	LPT	Box
Trigem	LQ-550H	LPT	Box
Trigem	LQ-570H	LPT	Box
Trigem	LQ-570H+	LPT	Box
Trigem	LQ-850H	LPT	Box
Trigem	SQ-2570H	LPT	Box
Trigem	SQ-850H	LPT	Box
Trigem	Stylus 1000H	LPT	Box
Trigem	Stylus 1000H+	LPT	Box
Trigem	Stylus 300H	LPT	Box
Trigem	Stylus 800H	LPT	Box
Trigem	Stylus 800H+	LPT	Box
Trigem	TGLBP-1000	LPT	Box
Trigem	TGLBP-1000G	LPT	Box
Trigem	TGLBP-2000	LPT	Box
Trigem	TGLBP-2000G	LPT	Box
Trigem	TGLBP-3000	LPT	Box
Trigem	TGLBP-500	LPT	Box
Trigem	TGLBP-600A	LPT	Box
Trigem	TGLBP-650A	LPT	Box
Trigem	TGLBP-650G	LPT	Box
Trigem	TGLBP-660G	LPT	Box
Trigem	TGLBP-700B	LPT	Box
Trigem	TGLBP-800BP	LPT	Box
Trigem	TGLBP-850BP	LPT	Box
Trigem	TGLBP-850G	LPT	Box
Xerox	a-1100	LPT	Box
Xerox	a-1100Z	LPT	Box
Xerox	a-800S	LPT	Box
Xerox	a-800Z	LPT	Box
Xerox	a-8630	LPT	Box
Xerox	XP-11	LPT	Box
Yangjae	GeulChoRong A344*	LPT	Box
Yangjae	GeulChoRong A345	LPT	Box
Yangjae	GeulChoRong C1601	LPT	Box
Yangjae	GeulChoRong K100	LPT	Box
Yangjae	GeulChoRong K200	LPT	Box
Yangjae	GeulChoRong Y300	LPT	Box
Yangjae	GeulChoRong Y600	LPT	Box
Yangjae	GeulChoRong Z100	LPT	Box
Yangjae	GeulChoRong Z200	LPT	Box

Click here to see the list of logo'd products


Compatible International/PRC Printer

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/PRC Printer

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Epson	LQ1600K	LPT	Box
Epson	LQ1800K	LPT	Box
Epson	LQ1900K	LPT	Box
Star	AR4400	LPT	Box
Star	CR3240	LPT	Box

Click here to see the list of logo'd products


Compatible International/Taiwanese Printer

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : International/Taiwanese Printer

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Epson	DLQ-3000C	LPT	Box
Epson	EPL-3000	LPT	Box
Epson	EPL-5200C	LPT	Box
Epson	EPL-5200C+	LPT	Box
Epson	EPL-7050C LQ-MODE	LPT	Box
Epson	EPL-9000C	LPT	Box
Epson	LQ-1000C	LPT	Box
Epson	LQ-1010C	LPT	Box
Epson	LQ-1050C	LPT	Box
Epson	LQ-1055C	LPT	Box
Epson	LQ-1060C	LPT	Box
Epson	LQ-1070C	LPT	Box
Epson	LQ-1070C+	LPT	Box
Epson	LQ-1170C	LPT	Box
Epson	LQ-2500C	LPT	Box
Epson	LQ-2550C	LPT	Box
Epson	LQ-500C	LPT	Box
Epson	LQ-550C	LPT	Box
Epson	LQ-570C	LPT	Box
Epson	LQ-570C+	LPT	Box
Epson	Stylus 1000C	LPT	Box
Epson	Stylus 800+ ESC/P 2	LPT	Box
Epson	Stylus 800C	LPT	Box
Epson	Stylus 800C+	LPT	Box
NEC	Pinwriter P3800	LPT	Box
NEC	Pinwriter P3800 (Color)	LPT	Box
NEC	Pinwriter P3900	LPT	Box
NEC	Pinwriter P3900 (Color)	LPT	Box
NEC	Pinwriter P6200C	LPT	Box
NEC	Pinwriter P6300(i)C	LPT	Box
NEC	Pinwriter P7300	LPT	Box
NEC	Pinwriter P7300 (Color)	LPT	Box
NEC	Pinwriter P9300C	LPT	Box
NEC	Pinwriter PZ200	LPT	Box
NEC	Pinwriter PZ300	LPT	Box
NEC	SilentWriter S62P	LPT	Box
Panasonic	KX-P1124C	LPT	Box
Panasonic	KX-P1624C	LPT	Box
Panasonic	KX-P1654C	LPT	Box
Panasonic	KX-P2624C AR-µ"t¦C	LPT	Box
Star	NX-1010	LPT	Box
Star	NX-2420HT	LPT	Box
Star	NX-2440	LPT	Box
Star	NX-2460	LPT	Box
Star	NX-2460C	LPT	Box
Star	XB-2415HT	LPT	Box
Star	XB-2425HT	LPT	Box

Click here to see the list of logo'd products


Compatible Miscellaneous

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Miscellaneous

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Microsoft	HP Omnibook 600	ISA	WDL

Click here to see the list of logo'd products


Compatible Modem/Analog

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Modem/Analog

Hardware Vendor	Device Name	Device Bus	Driver BIOS
3x	Wysiwyf 296D	COM	Box
3x	Wysiwyf 296DBX	COM	Box
3x	Wysiwyf 396DBX	COM	Box
3x	Wysiwyf 396DP	COM	Box
3x	Wysiwyf 496D	COM	Box
3x	Wysiwyf 496DB	COM	Box
3x	Wysiwyf 514D	COM	Box
3x	Wysiwyf 514DB	COM	Box
3x	Wysiwyf 514DBX	COM	Box
3x	Wysiwyf 514DP	COM	Box
3x	Wysiwyf 514DPX	COM	Box
3x	Wysiwyf 514DS	COM	Box
3x	Wysiwyf 514DSX	COM	Box
3x	Wysiwyf 628D	COM	Box
3x	Wysiwyf 628DB	COM	Box
3x	Wysiwyf 628DBX	COM	Box
3x	Wysiwyf 628DP	COM	Box
3x	Wysiwyf 628DPX	COM	Box
3x	Wysiwyf 628DS	COM	Box
3x	Wysiwyf 628DSX	COM	Box
Aceex	DM-1414P	COM	Box
Aceex	DM-1414PC	COM	Box
Aceex	DM-1414V	COM	Box
Aceex	DM-1414VH	COM	Box
Aceex	DM-2400E	COM	Box
Aceex	DM-2400H	COM	Box
Aceex	DM-2400V	COM	Box
Aceex	DM-2814 & DM-1414VH	COM	Box
Aceex	DM-2814PC	COM	Box
Aceex	DM-2814V	COM	Box
Aceex	DM-2814VH	COM	Box
Aceex	DM-9624E	COM	Box
Aceex	DM-9624H	COM	Box
Aceex	DM-9624PC	COM	Box
Aceex	DM-9624V	COM	Box
Adtech	Comm-Panion Pocket 14,400 BPS V.32Bis	COM	Box
Angia	14.4 PCMCIA (FAX-PCM2-NL)	PCMCIA	Box
Angia	14.4 PCMCIA (PCM144)	PCMCIA	Box
Angia	14.4 PCMCIA Modem	PCMCIA	Box
Angia	Safejack 28.8, V.34 PCMCIA	PCMCIA	Box
Angia	Safejack Terbo 19200 Data Fax	PCMCIA	Box
Apex	Data-Fax PCA-1414	COM	Box
Apex	Data-Fax PCR-1414	COM	Box
Apex	V.34 Cellular PCMCIA	PCMCIA	Box
Archtek	Smartlink 14.4	COM	Box
Archtek	SmartLink 1414 AV	COM	Box
ARN	ARNDX-MC2	PCMCIA	Box
ARN	ARNDX-NOTA	COM	Box
ARN	ARNDX-PC	COM	Box
Askey Computer	1428VQE-R Data+fax External	COM	Box
Askey Computer	1428VQH-R Data+Fax Internal	ISA	Box
AST Research	14.4D-14.4F Data Fax PCMCIA	PCMCIA	Box
AST Research	Advantage 14.4 Modem	COM	Box
AST Research	Advantage 14.4 Modem+Speakerphone	COM	Box
AST Research	EXCA 24-96 Data Fax PCMCIA	PCMCIA	Box
AST Research	PNB 24D-96F Data Fax PCMCIA	PCMCIA	Box
AT&T	Comsphere 3800 Series	COM	Box
AT&T	Comsphere 3810 Plus	COM	Box
AT&T	Comsphere 3820 Plus	COM	Box
AT&T	DataPort 14.4-FAX External	COM	Box
AT&T	DataPort 14.4-FAX Internal	COM	Box
AT&T	DataPort 2001	COM	Box
AT&T	DataPort Express External	COM	Box
AT&T	DataPort Express Internal	COM	Box
AT&T	DSP-based	COM	Box
AT&T	KeepInTouch Express Card	PCMCIA	Box
ATI	14400 ETC-E	COM	Box
ATI	14400 ETC-EXPRESS	COM	Box
ATI	14400 ETC-I	COM	Box
ATI	19200 ETC-E	COM	Box
ATI	19200 ETC-I	COM	Box
ATI	9600 ETC-E	COM	Box
AXOS Computer	Formel 14.4fax	COM	Box
AXOS Computer	Formel 2496fax	COM	Box
Aztech	PB144AMSP	COM	Box
Bausch Datacom	1414AV Terbo	COM	Box
Bausch Datacom	CN-9642 SAM	COM	Box
Bausch Datacom	euro Scout	COM	Box
Best Data	Smart One 1442F (FT, RPI)	COM	Box
Best Data	Smart One 1442F Modem	COM	Box
Best Data	Smart One 1442FX (FTX, RPI)	COM	Box
Best Data	Smart One 1442FX Modem	COM	Box
Best Data	Smart One 2400B Modem	COM	Box
Best Data	Smart One 2400X Modem	COM	Box
Best Data	Smart One 2834F Modem	COM	Box
Best Data	Smart One 2834FX Modem	COM	Box
Best Data	Smart One 9624FQ Modem	COM	Box
Best Data	Smart One 9648FX Modem	COM	Box
Blatzheim	GM 144 Vbis+FAX	COM	Box
Blatzheim	GM 144H Vbis+FAX	COM	Box
Blatzheim	GM 24 Vbis+Fax	COM	Box
Blatzheim	GM 288 Vbis+fax	COM	Box
Blatzheim	GM-144HVbis+Fax-1	COM	Box
Blatzheim	GM-144Vbis+-1	COM	Box
Boca Research	14.4 Kbps Multimedia FDV14I	COM	Box
Boca Research	14.4 Kbps V.32BIS M1440E	COM	Box
Boca Research	14.4 Kbps V.32BIS M1440I	COM	Box
Boca Research	14.4 Kbps V.32BIS M1440IW	COM	Box
Boca Research	14.4 Kbps V.32BIS M144IW	COM	Box
Boca Research	14.4 Kbps V.32BIS PCMCIA	COM	Box
Boca Research	28.8 Kbps V.34 MV.34I	COM	Box
Boca Research	28.8 V.Fast MV24KE	COM	Box
Boca Research	28.8 V.Fast MV28KI	COM	Box
Boca Research	Bocamodem 14.4kbps V.32bis Data-Fax	COM	Box
Boca Research	Bocamodem 1440E	COM	Box
Boca Research	Complete Ofc Communicator 14.4 Data-Fax	ISA	Box
Calcom	1442F Modem	COM	Box
COM1	MC214 Data Fax	COM	Box
COM1	MC216	COM	Box
COM1	MC217 V32bis Voice PCMCIA	COM	Box
COM1	MV129	COM	Box
COM1	MV216	COM	Box
COM1	PCMCIA AJ 1448 V32bis Fax-Modem	PCMCIA	Box
COM1	PCMCIA S214 V22bis Fax-Modem	PCMCIA	Box
COM1	PCMCIA S217 V32bis Fax-Modem	PCMCIA	Box
COM1	PCMCIA S218 V34 Fax-Modem	PCMCIA	Box
COM1	PCMCIA SLIM144 Fax-Modem	PCMCIA	Box
COM1	PCMCIA SLIMFAXII Fax-Modem	PCMCIA	Box
COM1	PCMCIA SLIMV34 Fax-Modem	PCMCIA	Box
COM1	SA MC214 2400	PCMCIA	Box
COM1	SA MC214 Data-Fax	COM	Box
COM1	SA MC216	COM	Box
COM1	SA MC216 14.4	PCMCIA	Box
COM1	SA MC217 14.4	PCMCIA	Box
COM1	SA MC217 V32bis Voice	PCMCIA	Box
COM1	SA MC218 V.34 PCMCIA	PCMCIA	Box
COM1	SA MV129	COM	Box
COM1	SA MV129 V22bis Data-Fax	PCMCIA	Box
COM1	SA MV216	COM	Box
COM1	SA MV216 SA V32bis Data-Fax	PCMCIA	Box
ComCom	SPIRIT II	COM	Box
ComCom	SPIRIT III	COM	Box
ComCom	SPIRIT Rocket V.34	COM	Box
ComCom	SPIRIT Rocket V.Fast	COM	Box
ComCom	SPIRIT Swift	COM	Box
Communicate	Connexion 1440	COM	Box
Communicate	Connexion 1440C	COM	Box
Communicate	Connexion 2496	COM	Box
Communicate	Connexion 2880	PCMCIA	Box
Communicate	Connexion 2880C	PCMCIA	Box
Communicate	Connexion GSM	PCMCIA	Box
Compaq	288 PCMCIA Modem	COM	Box
Compaq	Enhanced 144 Data+Fax	COM	Box
Compaq	Enhanced 2400 Data+Fax	COM	Box
Compaq	Enhanced 9600 Data	COM	Box
Compaq	Enhanced 9600 Data+Fax	COM	Box
Compaq	Enhanced 9600 Modem	COM	Box
Compaq	International 2400 Data	COM	Box
Compaq	PCMCIA 144	PCMCIA	Box
Compaq	PCMCIA 2400-9600	PCMCIA	Box
Compaq	Presario 144 Data+Fax+Voice	COM	Box
Compaq	Presario 24-96 Data+Fax+Voice	COM	Box
Compaq	Presario Int'l 24-96 Data+Fax+Voice	COM	Box
Compaq	SpeedPaq 144 Enhanced COM	PCMCIA	Box
Compaq	SpeedPaq 144-I	PCMCIA	Box
Compaq	SpeedPaq 144-P	PCMCIA	Box
Compaq	SpeedPaq 19.2 Kbps PCMCIA Modem	PCMCIA	Box
Compaq	SpeedPaq 192 PCMCIA Modem	PCMCIA	Box
Compaq	SpeedPaq 192S PCMCIA Modem	PCMCIA	Box
Computer Periph.	CPI Viva Modem 24	COM	Box
Computer Periph.	Viva 14.4 Data Fax	COM	Box
Computer Periph.	Viva 14.4 Data FAX Internal	COM	Box
Computer Periph.	Viva 14.4 Data FAX PCMCIA	COM	Box
Computer Periph.	Viva 14.4 FAX-P Pocket	COM	Box
Computer Periph.	Viva 14.4i Data FAX	COM	Box
Computer Periph.	Viva 2400 Data-Fax External	COM	Box
Computer Periph.	Viva 2400 Data-Fax Internal	COM	Box
Computer Periph.	Viva 2442if	COM	Box
Computer Periph.	Viva 2496p Pocket	COM	Box
Computer Periph.	Viva 24i	COM	Box
Computer Periph.	Viva 28.8, V.34 External	COM	Box
Computer Periph.	Viva 28.8, V.34 Internal	COM	Box
Computer Periph.	Viva 300-1200-2400	COM	Box
Computer Periph.	Viva Hookup 2400	COM	Box
Computer Periph.	Viva Hookup 2400SE	COM	Box
Computer Periph.	Viva Message Center	COM	Box
CPV	Delta 14.4 extern	COM	Box
CPV	Delta 2.400 extern	COM	Box
CPV	Delta 28.8 extern	COM	Box
CPV	Delta V.34	COM	Box
CPV	MC 218 Modem Card 28.8	COM	Box
CPV	Pico T 14.4 Fax extern	COM	Box
CPV	Sirius I PCMCIA	COM	Box
CPV	Sirius II PCMCIA	COM	Box
Creative Labs	Modem Blaster 14.4 PCMCIA	COM	Box
Creative Labs	Modem Blaster 19.2	COM	Box
Creatix	14.4	COM	Box
Creatix	LC144	COM	Box
Creatix	LC144i	COM	Box
Creatix	LC144VF Firmware 1.41	COM	Box
Creatix	LC144VF Firmware 1.5	COM	Box
Creatix	LC144VF Firmware 1.61	COM	Box
Creatix	LC144VFi	COM	Box
Creatix	LC288 V.34 Firmware 1.10a	COM	Box
Creatix	LC288FC Firmware 0.51	COM	Box
Creatix	LC288FC Firmware 1.0	COM	Box
Creatix	LC288FV.34i	COM	Box
Creatix	LC288VFV.34	COM	Box
Creatix	LC288VFV.34i	COM	Box
Creatix	PC144SF	COM	Box
Creatix	SG144 Firmware 1.6	COM	Box
Creatix	SG144 Firmware 1.61	COM	Box
Creatix	SG144i	COM	Box
Creatix	SR2496	COM	Box
Data Race	RediCARD Data 14.4 Fax 9600	COM	Box
Data Race	RediCARD Data 2400 Fax 9600	COM	Box
DEC	14.4 Data FAX PCMCIA	COM	Box
DEC	28.8 Data FAX PCMCIA	COM	Box
Digicom	9624AR External	COM	Box
Digicom	9624AR+ External	COM	Box
Digicom	9624E External	COM	Box
Digicom	9624E+ External	COM	Box
Digicom	9624LE External	COM	Box
Digicom	9624LE+ External	COM	Box
Digicom	9624LR External	COM	Box
Digicom	9624LR+ External	COM	Box
Digicom	9624PC+ Internal	COM	Box
Digicom	CCM 44 F	COM	Box
Digicom	CCM 44 P	COM	Box
Digicom	Connection 144+ Internal	COM	Box
Digicom	Connection 144+FAX Internal	COM	Box
Digicom	Connection 144DF Internal	COM	Box
Digicom	Connection 96+ Internal	COM	Box
Digicom	Connection Pro 19.2 Internal	COM	Box
Digicom	FaxModem 1442PC Internal	COM	Box
Digicom	Scout 14400 PCMCIA Fax Modem	COM	Box
Digicom	Scout Classic 144 External	COM	Box
Digicom	Scout External	COM	Box
Digicom	Scout Internal	COM	Box
Digicom	Scout Plus External	COM	Box
Digicom	Scout Plus Internal	COM	Box
Digicom	Scout Plus Terbo External	COM	Box
Digitan	28.8, V.34 Data-Fax	COM	Box
Digitan	28.8, V.34 Data-Fax-Voice	COM	Box
Discovery	1414 CX	COM	Box
Discovery	1414 HX	COM	Box
Discovery	1414 VIP	COM	Box
Discovery	1442 AM  1414 AX security	COM	Box
Discovery	1942 AM  1914 AX V32terbo-security	COM	Box
Discovery	2400 A, second revison	COM	Box
Discovery	2400 AM with MNP & V.42(bis)	COM	Box
Discovery	2400 C	COM	Box
Discovery	2400 C with Send Only Fax support	COM	Box
Discovery	2400 CM or QM with MNP	COM	Box
Discovery	2400 CM or QM with MNP & V.42(bis)	COM	Box
Discovery	2400 H	COM	Box
Discovery	2400 H with Send Only Fax support	COM	Box
Discovery	2400 HM	COM	Box
Discovery	2400 P	COM	Box
Discovery	2400 P with Send Only Fax support	COM	Box
Discovery	2400 PM	COM	Box
Discovery	2400 V, 2nd revision	COM	Box
Discovery	2400 VM	COM	Box
Discovery	2496 CX	COM	Box
Discovery	2496 HX	COM	Box
Discovery	2496 PX	COM	Box
Discovery	2814 CX	COM	Box
Discovery	9632 AM or AX with V32bis	COM	Box
Discovery	9632 AX or AX with V32	COM	Box
Discovery	Victory 14400 E, 1st revision	COM	Box
Discovery	Victory 14400 I	COM	Box
Discovery	Victory 2400 E	COM	Box
Discovery	Victory 2400 I with jumper-selection	COM	Box
Discovery	Victory 2423 E	COM	Box
Discovery	Victory 2423 I with jumper-selection	COM	Box
Dr. Neuhaus	Fury 14400 TI	COM	Box
Dr. Neuhaus	Fury 14400 TI SL-II	COM	Box
Dr. Neuhaus	Fury 19.2 TI	COM	Box
Dr. Neuhaus	Fury 19200 TI	COM	Box
Dr. Neuhaus	Fury 2403 TI	COM	Box
Dr. Neuhaus	Fury Card 14.4	PCMCIA	Box
Dr. Neuhaus	Fury Card 14400	PCMCIA	Box
Dr. Neuhaus	Fury Card 2400	PCMCIA	Box
Dr. Neuhaus	Smarty 14.4 TI	COM	Box
Dr. Neuhaus	Smarty 14400 TI	COM	Box
Dr. Neuhaus	Smarty 19.2 TI, 19.2 VOICE	COM	Box
Dr. Neuhaus	Smarty 19200 TI	COM	Box
Dr. Neuhaus	Smarty 24 PC	COM	Box
Dr. Neuhaus	Smarty 24 TI	COM	Box
Dr. Neuhaus	Smarty 24 TI, 24 PC	COM	Box
Dynalink	1414 VE	COM	Box
Dynalink	1414 VH	COM	Box
Dynalink	1414 VQC	COM	Box
Dynalink	1414 VQE	COM	Box
Dynalink	1414 VQH	COM	Box
Dynalink	2400 MH	COM	Box
Dynalink	2400 MP	COM	Box
Dynalink	2400 VH	COM	Box
Dynalink	2400 VP	COM	Box
Dynalink	9624 AH	COM	Box
Dynalink	9624 VAH	COM	Box
Dynalink	9624 VAP	COM	Box
Dynalink	9624 VQE	COM	Box
Dynalink	9624 VQH	COM	Box
Dynalink	9624 VQP	COM	Box
Dynalink	EVQ 1414	COM	Box
Dynalink	IVQ 1414	COM	Box
Dynalink	V9624 VQE	COM	Box
E-Tech	C1414AX FAX PCMCIA	COM	Box
E-Tech	P1496MX FAX	COM	Box
Elproma Electr.	MOD144	COM	Box
Elproma Electr.	MOD144i	COM	Box
Elproma Electr.	MOD288	COM	Box
Elproma Electr.	MOD288i	COM	Box
ELSA GmbH	ELISA 144	COM	Box
ELSA GmbH	ELISA 144V	COM	Box
ELSA GmbH	MicroLink 14.4 T - TM - TL	COM	Box
ELSA GmbH	MicroLink 14.4MC	COM	Box
ELSA GmbH	MicroLink 14.4PC	COM	Box
ELSA GmbH	MicroLink 14.4TL	COM	Box
ELSA GmbH	MicroLink 14.4TQ	COM	Box
ELSA GmbH	MicroLink 14.4TQV	COM	Box
ELSA GmbH	MicroLink 2440T	COM	Box
ELSA GmbH	MicroLink 2440TR	COM	Box
ELSA GmbH	MicroLink 2460MC	COM	Box
ELSA GmbH	MicroLink 2460PC	COM	Box
ELSA GmbH	MicroLink 2460TL	COM	Box
ELSA GmbH	MicroLink 24oooTL	COM	Box
ELSA GmbH	MicroLink 28.8TQ	COM	Box
ELSA GmbH	MicroLink 28.8TQV	COM	Box
ELSA GmbH	MicroLink 288ooTL	COM	Box
ELSA GmbH	MicroLink ISDN TD	COM	Box
ELSA GmbH	MicroLink ISDN TL	COM	Box
ELSA GmbH	MicroLink ISDN TL PRO	COM	Box
ELSA GmbH	ZIFF 144	COM	Box
Epson	Data Fax 24-96	PCMCIA	Box
Ericsson AS	2314C	COM	Box
Ericsson AS	2319TZ	COM	Box
Ericsson AS	SBN 1496A	COM	Box
Ericsson AS	SBN 2314C	COM	Box
Ericsson AS	SBN 2319C	COM	Box
Ericsson AS	ZAT 14.4 14.4-7	COM	Box
Ericsson AS	ZAT19.2 19.2-7	COM	Box
Exar	Internal 24-96 Fax	COM	Box
Exar	ROHM Card 24-96 Data-Fax	COM	Box
EXP Computer	1414CL Fax-Data PCMCIA	COM	Box
EXP Computer	14400-14400 Fax-Data PCMCIA	COM	Box
EXP Computer	144i Fax-Data PCMCIA	COM	Box
EXP Computer	28.8i Fax-Data PCMCIA	COM	Box
EXP Computer	9600-2400 Fax-Data PCMCIA	COM	Box
EXP Computer	9600-9600 Fax-Data PCMCIA	COM	Box
EYP Telecom.	BV32B	COM	Box
EYP Telecom.	MicroV32B	COM	Box
EYP Telecom.	MV32 Plus	COM	Box
EYP Telecom.	MV32B#	COM	Box
EYP Telecom.	MVMNP	COM	Box
EYP Telecom.	MVMUL	COM	Box
EYP Telecom.	PCMNP	COM	Box
EYP Telecom.	PCMUL	COM	Box
EYP Telecom.	PCVOX	COM	Box
Galaxy	Apollo	COM	Box
Galaxy	UFO	COM	Box
Gateway 2000	2400-9600 Internal	COM	Box
Gateway 2000	2400-9600 PCMCIA	PCMCIA	Box
Gateway 2000	TelePath	COM	Box
Gateway 2000	Telepath 14.4-14.4 PCMCIA	PCMCIA	Box
Gateway 2000	Telepath 14.4-14.4 XJack PCMCIA	PCMCIA	Box
Gateway 2000	Telepath II 14400 Internal	COM	Box
GVC	External 28800 Fax Modem	COM	Box
GVC	External Fax Modem 9648	COM	Box
GVC	External Fax Modem 9696	COM	Box
GVC	External Super Modem 2400	COM	Box
GVC	Fax Modem 14400 V.42bis-MNP5	COM	Box
GVC	Internal FAX Modem F-1114HV-R2	COM	Box
GVC	PCMCIA Faxmodem FM144-144V(P)	PCMCIA	Box
GVC	PCMCIA Faxmodem PFM-964824	PCMCIA	Box
Haeussler	H-144	COM	Box
Hayes	Accura 144 + FAX144	COM	Box
Hayes	Accura 144B + FAX144	COM	Box
Hayes	Accura 24 EC + FAX96	COM	Box
Hayes	Accura 2400	COM	Box
Hayes	Accura 24B EC + FAX96	COM	Box
Hayes	Accura 288 V.FC + FAX	COM	Box
Hayes	Accura 96 + FAX96	COM	Box
Hayes	Accura 96B + FAX96	COM	Box
Hayes	Compatible 2400	COM	Box
Hayes	Compatible 9600	COM	Box
Hayes	Optima 144	COM	Box
Hayes	Optima 144 + FAX144	COM	Box
Hayes	Optima 144 + FAX144 PCMCIA	PCMCIA	Box
Hayes	Optima 144 + FAX144 Pocket Edition	COM	Box
Hayes	Optima 144B + FAX144	COM	Box
Hayes	Optima 24	COM	Box
Hayes	Optima 24 + FAX96	COM	Box
Hayes	Optima 24 + FAX96 PCMCIA	PCMCIA	Box
Hayes	Optima 24B + FAX96	COM	Box
Hayes	Optima 288 V.34 + FAX	COM	Box
Hayes	Optima 288 V.34 + FAX PCMCIA	PCMCIA	Box
Hayes	Optima 288 V.FC + FAX	COM	Box
Hayes	Optima 288 V.FC + FAX (UK)	COM	Box
Hayes	Optima 288B V.FC + FAX	COM	Box
Hayes	Optima 96	COM	Box
Hayes	Optima 96 + FAX96	COM	Box
Hayes	Optima 96B + FAX96	COM	Box
Hayes	Pocket Modem 2400	COM	Box
Hayes	Smartmodem 1200	COM	Box
Hayes	Smartmodem 1200B	COM	Box
Hayes	Smartmodem 2400	COM	Box
Hayes	Smartmodem 9600	COM	Box
Hayes	Ultra 24 Smartmodem 2400 + Express 96	COM	Box
Hayes	V-series Smartmodem 9600	COM	Box
Hayes	V-series Ultra Smartmodem 14400	COM	Box
Hayes	V-series Ultra Smartmodem 9600	COM	Box
Hidem Tech.	1200	COM	Box
Hidem Tech.	1200BS	COM	Box
Hidem Tech.	14400DLX	COM	Box
Hidem Tech.	14400FAX	COM	Box
Hidem Tech.	14400I DLX	COM	Box
Hidem Tech.	14400I FAX	COM	Box
Hidem Tech.	14400P FAX	COM	Box
Hidem Tech.	2400CD	COM	Box
Hidem Tech.	2400DLX	COM	Box
Hidem Tech.	2400H	COM	Box
Hidem Tech.	2442FAX	COM	Box
Hidem Tech.	2442I FAX	COM	Box
Hidem Tech.	2442P FAX	COM	Box
Hidem Tech.	9600DLX	COM	Box
Hidem Tech.	9600I DLX	COM	Box
Hidem Tech.	Prodem 2400M	COM	Box
Hidem Tech.	Vida 2400SNI	COM	Box
Hidem Tech.	Vida 2442FAX	COM	Box
Hotline	Handy 144 CC	PCMCIA	Box
Hotline	Handy 9672 CC	PCMCIA	Box
IBM	2400, SM-24HN-1	COM	Box
IBM	2400-9600 Data FAX	COM	Box
IBM	Aptiva 14.4 Data FAX	COM	Box
IBM	Aptiva 2400-9600 Data FAX	COM	Box
IBM	MWave	COM	Box
IBM	PS-1 Internal Fax	COM	Box
IBM	Push-Pop 14.4 Data FAX PCMCIA	COM	Box
IBM	Thinkpad 701 Internal	COM	Box
ICO	ALPHA Speed 14.4	COM	Box
ICO	DAGO Speed	COM	Box
ICO	Escom Black Power Modem 14.4	COM	Box
ICO	NYTECH 14.4	COM	Box
ICO	SIMBA 14.4	COM	Box
Infotel	1414VQE	COM	Box
Infotel	1414VQH	COM	Box
Infotel	1414VQP	COM	Box
Infotel	1428VQE	COM	Box
Infotel	1428VQH-R	COM	Box
Infotel	144I	COM	Box
Infotel	2400 SF	COM	Box
Infotel	2400 SM-24N-S	COM	Box
Infotel	9624H-S	COM	Box
Infotel	9624P	COM	Box
INSYS	Onbit 144 Fax	COM	Box
INSYS	Onbit 144 Fax Plusversion	COM	Box
INSYS	Onbit 288 Fax	COM	Box
INSYS	Onbit 288 Plusversion Fax	COM	Box
INSYS	Onbit 288FAX	COM	Box
INSYS	Onbit 288FAX mit Display	COM	Box
INSYS	Onbit 9624 Fax	COM	Box
INSYS	PC Steckarte 288	COM	Box
INSYS	PC Steckkarte 144	COM	Box
INSYS	PC Steckkarte 144 BA	COM	Box
InteCom	InteCom	COM	Box
Intel	14.4EX	COM	Box
Intel	2400 PCMCIA	COM	Box
Intel	2400e V.42bis Modem	COM	Box
Intel	9600EX	COM	Box
Intel	Cellular Faxmodem 14.4 PCMCIA	COM	Box
Intel	Faxmodem 14.4 PCMCIA (MBFM6830)	COM	Box
Intel	Faxmodem 14.4 PCMCIA (MBFM6831)	COM	Box
Intel	Faxmodem 144-144e	COM	Box
Intel	Faxmodem 144-144i	COM	Box
Intel	Faxmodem 24-96 PCMCIA	PCMCIA	Box
Intel	Faxmodem 24-96i	COM	Box
Intel	Faxmodem 24v-96e	COM	Box
Intel	Faxmodem 24v-96i	COM	Box
Intel	Faxmodem 96-96e	COM	Box
Intel	Faxmodem 96-96i	COM	Box
Intel	Faxmodem 9600 PCMCIA (MBFM6820)	PCMCIA	Box
Intel	Faxmodem 9600 PCMCIA (MBFM6821)	PCMCIA	Box
Intel	International Faxmodem 14.4 PCMCIA	PCMCIA	Box
Intel	International Faxmodem 24-96 PCMCIA	PCMCIA	Box
Intel	SatisFAXtion Classic	COM	Box
Intel	SatisFAXtion Modem 300	COM	Box
Intertex	IX33 28.8	COM	Box
Intertex	IX33 ext 14.4	COM	Box
Intertex	IX33 intern 14.4	COM	Box
Intertex	IX33 PCMCIA	COM	Box
Intertex	IX33 PCMCIA28.8	COM	Box
Intertex	IX33 voice 14.4	COM	Box
Intertex	IX34 extern	COM	Box
Intertex	IX34 intern	COM	Box
Intertex	IX34 PCMCIA	COM	Box
Intertex	IX34 voice	COM	Box
Kingston	DataRex 14.4 PCMCIA	COM	Box
KORTEX Int'l	KX PRO 144	COM	Box
KORTEX Int'l	KX PRO 144 Box Pocket	COM	Box
KORTEX Int'l	KX PRO 144 PCMCIA	COM	Box
KORTEX Int'l	KX PRO 2400 & KX TEL FAX Box Pocket	COM	Box
KORTEX Int'l	KX PRO 2400 & KX TEL FAX Carte	COM	Box
KORTEX Int'l	KX PRO 2400 LECAM Box Pocket	COM	Box
KORTEX Int'l	KX PRO 2400 LECAM Carte	COM	Box
KORTEX Int'l	KX PRO 2400 PCMCIA	COM	Box
KORTEX Int'l	KX PRO 288 & KX PRO NUMERIS 288	COM	Box
KORTEX Int'l	KX PRO 288 Box Pocket	COM	Box
KORTEX Int'l	KX PRO 288 PCMCIA	COM	Box
KORTEX Int'l	KX PRO NUMERIS 144 RTC  Carte	COM	Box
KORTEX Int'l	KX PRO NUMERIS Modem 144	COM	Box
KORTEX Int'l	KX PRO NUMERIS Modem 288	COM	Box
KORTEX Int'l	KX PRO NUMERIS PAD	COM	Box
KORTEX Int'l	KX TEL FAX PS	COM	Box
KORTEX Int'l	NOVAFAX 144 Box Pocket	COM	Box
KORTEX Int'l	NOVAFAX 144 Carte	COM	Box
KORTEX Int'l	NOVAFAX 144 PCMCIA	COM	Box
KORTEX Int'l	NOVAFAX 2400 Box Pocket	COM	Box
KORTEX Int'l	NOVAFAX 2400 Carte	COM	Box
KORTEX Int'l	NOVAFAX 2400 PCMCIA	COM	Box
KORTEX Int'l	NOVAFAX 288 Box Pocket	COM	Box
KORTEX Int'l	NOVAFAX 288 Carte	COM	Box
KORTEX Int'l	NOVAFAX 288 PCMCIA	COM	Box
LASAT Commun.	CREDIT 144	COM	Box
LASAT Commun.	CREDIT 288	COM	Box
LASAT Commun.	PCM144 Fax	COM	Box
LASAT Commun.	Unique 144	COM	Box
LASAT Commun.	Unique 24/96	COM	Box
LASAT Commun.	Unique 288	COM	Box
LCE	124	COM	Box
LCE	124 V23	COM	Box
LCE	144P	COM	Box
Logicode	14.4 Data-Fax External	COM	Box
Logicode	14.4 Data-Fax Internal 1414HV	COM	Box
Logicode	14.4 Data-Fax-Voice External	COM	Box
Logicode	14.4 Data-Fax-Voice Internal	COM	Box
Logicode	14.4 Data-Fax-Voice PCMCIA	COM	Box
Logicode	28.8, V.34 External	COM	Box
Logicode	28.8, V.34 Internal	COM	Box
Logicode	9624 Data-Fax External	COM	Box
Logicode	9624 Data-Fax Internal	COM	Box
Longshine	14.4K 9600 bps External Modem Fax	COM	Box
Macronix	1200 bps	COM	Box
MagicRam	Mercury 9624 Voice-Fax	COM	Box
Martignoni Elec.	Bullet 100E V.34	COM	Box
Martignoni Elec.	Bullet E1414MX	COM	Box
Martignoni Elec.	Bullet ModemMan	COM	Box
Martignoni Elec.	Bullet ModemMan Plus	COM	Box
Martignoni Elec.	Bullet ModemMan V.terbo	COM	Box
Martignoni Elec.	Bullet PC1414MX	COM	Box
Martignoni Elec.	Bullet PC192MX	COM	Box
Martignoni Elec.	Bullet PCMCIA 1414M	PCMCIA	Box
Martignoni Elec.	CashCom	COM	Box
Martignoni Elec.	SpiderMan	COM	Box
Megahertz	C5144 for Compaq LTE	COM	Box
Megahertz	C596FM	COM	Box
Megahertz	C6144	COM	Box
Megahertz	C696FM	COM	Box
Megahertz	CC2144 V.32bis PCMCIA Modem	PCMCIA	Box
Megahertz	CC324FM V.22bis PCMCIA Modem	PCMCIA	Box
Megahertz	CC396FM PCMCIA Modem	PCMCIA	Box
Megahertz	CC4144 V.32bis PCMCIA Modem	PCMCIA	Box
Megahertz	EM1144-T PCMCIA Modem+Net Card	PCMCIA	Box
Megahertz	P2144 V.32bis Pocket Modem	COM	Box
Megahertz	P224FMV	COM	Box
Megahertz	P296FMV	COM	Box
Megahertz	PCMCIA Modem	PCMCIA	Box
Megahertz	T3144	COM	Box
Megahertz	T396FM	COM	Box
Megahertz	TX3144	COM	Box
Megahertz	XJ124FM V.22bis PCMCIA Modem	PCMCIA	Box
Megahertz	XJ196FM PCMCIA Modem	PCMCIA	Box
Megahertz	Z3144	COM	Box
Megahertz	Z396FM	COM	Box
Megahertz	Z5144	COM	Box
Megahertz	Z596FM	COM	Box
Microcom	DeskPorte	COM	Box
Microcom	DeskPorte 28.8P	COM	Box
Microcom	DeskPorte 28.8P Parallel	COM	Box
Microcom	DeskPorte ES 14.4	COM	Box
Microcom	DeskPorte FAST	COM	Box
Microcom	DeskPorte FAST EP 28.8	COM	Box
Microcom	DeskPorte FAST EP 28.8 Parallel	COM	Box
Microcom	DeskPorte FAST ES 28.8	COM	Box
Microcom	DeskPorte FAST Parallel	COM	Box
Microcom	MicroPorte 4232bis	COM	Box
Microcom	TravelCard 28.8P	COM	Box
Microcom	TravelCard 28.8P Serial	COM	Box
Microcom	TravelCard FAST	COM	Box
Microcom	TravelCard FAST Serial	COM	Box
Microcom	TravelPorte	COM	Box
Microcom	TravelPorte FAST	COM	Box
Microcom	TravelPorte FAST Parallel	COM	Box
Microsoft	UnImodem/Telephony	COM	WDL
Mitsubishi	14.4 PCMCIA	COM	Box
Motorola	3260	COM	Box
Motorola	3260 FAST	COM	Box
Motorola	CELLect 144	COM	Box
Motorola	CELLect 144 PC Card	COM	Box
Motorola	Codex 3265	COM	Box
Motorola	Codex 3265FAST	COM	Box
Motorola	Codex 3265FAST (V.34)	COM	Box
Motorola	Codex 3266	COM	Box
Motorola	Codex 3266FAST	COM	Box
Motorola	Codex 3266FAST (V.34)	COM	Box
Motorola	Codex 3267	COM	Box
Motorola	Codex 3267FAST	COM	Box
Motorola	Codex 3267FAST (V.34)	COM	Box
Motorola	Codex 3268	COM	Box
Motorola	Codex 3268FAST	COM	Box
Motorola	Codex 3268FAST (V.34)	COM	Box
Motorola	FasTalk 32x	COM	Box
Motorola	FasTalk FAX32bx	COM	Box
Motorola	FasTalk II	COM	Box
Motorola	HMTA 200	COM	Box
Motorola	Lifestyle 14.4 PC Card	COM	Box
Motorola	Lifestyle 28.8 External	External	Box
Motorola	Lifestyle 28.8 V.34	COM	Box
Motorola	Modem	COM	Box
Motorola	PCTA120	COM	Box
Motorola	Power 28.8 V.34	COM	Box
Motorola	Power Series PCMCIA	COM	Box
Motorola	TA110 - TA120	COM	Box
Motorola	TA210	COM	Box
Motorola	V.34R	COM	Box
Motorola	V3225	COM	Box
Motorola	V3227	COM	Box
Motorola	V3229	COM	Box
Motorola	V3257	COM	Box
Motorola	V3400	COM	Box
Multi-Tech	MultiModem MT1432BA	COM	Box
Multi-Tech	MultiModem MT1432BC	COM	Box
Multi-Tech	MultiModem MT1432LT	COM	Box
Multi-Tech	MultiModem MT1432MG	COM	Box
Multi-Tech	MultiModem MT1432MU	COM	Box
Multi-Tech	MultiModem MT1432ZDX	COM	Box
Multi-Tech	MultiModem MT1932BA	COM	Box
Multi-Tech	MultiModem MT1932BL	COM	Box
Multi-Tech	MultiModem MT1932PCS	COM	Box
Multi-Tech	MultiModem MT1932ZDX	COM	Box
Multi-Tech	MultiModem MT1932ZPX	COM	Box
Multi-Tech	MultiModem MT224BA	COM	Box
Multi-Tech	MultiModem MT224BAF	COM	Box
Multi-Tech	MultiModem MT2834BA	COM	Box
Multi-Tech	MultiModem MT2834BL	COM	Box
Multi-Tech	MultiModem MT2834LT PCMCIA V.34	PCMCIA	Box
Multi-Tech	MultiModem MT2834PCS	COM	Box
Multi-Tech	MultiModem MT2834ZDX	COM	Box
Multi-Tech	MultiModem MT932BA	COM	Box
Multi-Tech	MultiModem MT932EA	COM	Box
Multi-Tech	MultiModem MT932EAB	COM	Box
NEC	14.4 Kbps Data-Fax Card	COM	Box
NEC	PC-9801N-J01	COM	Box
NEC	PC-9801N-J05	COM	Box
NEC	PC-9801N-J06	COM	Box
New Media	14.4 DataFax	PCMCIA	Box
Nissei Electric	FM2814 V34 fax	COM	WDL
Nissei Electric	V.32bis External Modem FM1414	COM	WDL
Nokia	14.4 PCMCIA	PCMCIA	Box
Nokia	Cellular Data Card DTP-2	COM	Box
Noteworthy	NW144CR Cellular PCMCIA	PCMCIA	Box
Noteworthy	T144NW PCMCIA	PCMCIA	Box
Noteworthy	T144NWX PCMCIA	PCMCIA	Box
Noteworthy	T24NW PCMCIA	PCMCIA	Box
NovaLink Tech.	Novamodem 14.4 Data-Fax-Voice	COM	Box
NovaLink Tech.	Novamodem 28.8 Data-Fax-Voice	COM	Box
NovaLink Tech.	Novapak 14.4-32 Data-Fax-Voice-Pager	COM	Box
NovaLink Tech.	Novapak 28.8 Data-Fax-Voice-Pager	COM	Box
NSC	TYIN2000	COM	Box
Olitec	Fax/Modem 14400 Internal	COM	WDL
Olitec	Fax/Modem 28800 Internal	COM	WDL
Pacific Communication Sciences	PCSI Ubiquity Modems	COM	WDL
Packard Bell	14.4AM(SP) Modem-Soundcard	COM	Box
Packard Bell	24DBF Data Fax Modem	COM	Box
Packard Bell	F-114 Modem Fax	COM	Box
Piiceon	14.4 Data 14.4 Fax	COM	Box
Piiceon	Dispatcher 14.4 for LTE and Contura	COM	Box
Piiceon	Dispatcher 14.4 for Toshiba	COM	Box
Piiceon	Dispatcher 14.4 PCMCIA	PCMCIA	Box
Piiceon	Dispatcher Modem	COM	Box
Piiceon	Dispatcher V.34 for LTE and Contura	COM	Box
PNB	Amazone Pocket	COM	Box
PNB	Baby RIO	COM	Box
PNB	Baby Samantha	COM	Box
PNB	Compouce TT2324	COM	Box
PNB	Niagara 2400 MNP5	COM	Box
PNB	RIO Grande PCMCIA	PCMCIA	Box
PNB	RIO PC V32bis	COM	Box
PNB	RIO Voice PCMCIA	PCMCIA	Box
PNB	Samantha PCMCIA	PCMCIA	Box
Practical Periph.	PC144HC	COM	Box
Practical Periph.	PC144LCD	COM	Box
Practical Periph.	PC144MT	COM	Box
Practical Periph.	PC144T2-EZ PCMCIA	PCMCIA	Box
Practical Periph.	PC288HC V.34	COM	Box
Practical Periph.	PC288HC VFC	COM	Box
Practical Periph.	PC288LCD VFC	COM	Box
Practical Periph.	PC288MT II V.34	COM	Box
Practical Periph.	PC288MT VFC	COM	Box
Practical Periph.	PC288SA VFC	COM	Box
Practical Periph.	PC288T2-EZ PCMCIA	PCMCIA	Box
Practical Periph.	PM14400FX	COM	Box
Practical Periph.	PM14400FX MT	COM	Box
Practical Periph.	PM14400FX PKT	COM	Box
Practical Periph.	PM14400FX PS-2	COM	Box
Practical Periph.	PM14400FXSA	COM	Box
Practical Periph.	PM144HC II	COM	Box
Practical Periph.	PM144MT II	COM	Box
Practical Periph.	PM2400	COM	Box
Practical Periph.	PM2400 PS-2	COM	Box
Practical Periph.	PM2400EFX	COM	Box
Practical Periph.	PM2400EFX SA	COM	Box
Practical Periph.	PM2400FX	COM	Box
Practical Periph.	PM2400FX96SA	COM	Box
Practical Periph.	PM2400FXMT	COM	Box
Practical Periph.	PM2400SA	COM	Box
Practical Periph.	PM288HC II V.34	COM	Box
Practical Periph.	PM288HCII VFC	COM	Box
Practical Periph.	PM288MT II V.34	COM	Box
Practical Periph.	PM288MTII VFC	COM	Box
Practical Periph.	PM288PKT VFC	COM	Box
Practical Periph.	PM9600	COM	Box
Practical Periph.	PM9600 V.32-V.42bis	COM	Box
Practical Periph.	PM9600FX	COM	Box
Practical Periph.	PM9600FX MT	COM	Box
Practical Periph.	PM9600HC II	COM	Box
Practical Periph.	PM9600MT II	COM	Box
Practical Periph.	PM9600SA	COM	Box
Practical Periph.	PractiCARD 144	COM	Box
Premax	28.8, VFC PCMCIA	PCMCIA	Box
Prometheus	14.4 Modem	COM	Box
Psion	Dacom Gold V.32 PCMCIA Card	PCMCIA	Box
Quantum Data Systems	Active 144UB Plus Internal	ISA	WDL
Quantum Data Systems	Active 144UF Plus External	COM	WDL
Quantum Data Systems	Active 288UB Internal	ISA	WDL
Quantum Data Systems	Active 288UF External	COM	WDL
Rockwell	14400 bps Data-Fax	COM	Box
Simplecomputing Australia	Simplemodem 288f V.34	COM	Box
SMART Modular	ST 1414 Cell PCMCIA	PCMCIA	Box
SMART Modular	ST 1414 PCMCIA	PCMCIA	Box
SMART Modular	ST 2814 V.34 PCMCIA	PCMCIA	Box
SMART Modular	ST 9624 PCMCIA	PCMCIA	Box
SMART Modular	ST 9624E PCMCIA	PCMCIA	Box
Sonix Commun.	Canzona	COM	Box
Sord	Data/Fax/Voice PCMCIA	PCMCIA	Box
Spectrum	Envoy (14400 bps)	COM	Box
Spectrum	Envoy (2400 bps)	COM	Box
Spectrum	Envoy (9600 bps)	COM	Box
Supra	SupraExpress 144 Plus	COM	Box
Supra	SupraFAXModem 144i	COM	Box
Supra	SupraFAXModem 144LC	COM	Box
Supra	SupraFAXModem 288	COM	Box
Supra	SupraFAXModem 288i	COM	Box
Supra	SupraFAXModem V.32	COM	Box
Supra	SupraFAXModem V.32bis	COM	Box
Supra	SupraFAXModem V.32bis or 144i	COM	Box
TDK	DF1414	COM	Box
TDK	DF1414 14400 Data + Fax Modem	COM	Box
TDK	DF1414B/M	PCMCIA	Box
TDK	DF2496	COM	Box
TDK	DF2496 2400 Data + 9600 Fax Modem	COM	Box
TDK	DF2496B/M	COM	Box
TDK	DF2814B V.FC	COM	Box
TDK	DF2814B V.FC Serial	COM	Box
TDK	DF2814V V.34	COM	Box
TDK	DF2814V V.34 Serial	COM	Box
Telebit	Fastblazer 8840	COM	Box
Telebit	QBlazer	COM	Box
Telebit	QBlazer Plus	COM	Box
Telebit	T1600	COM	Box
Telebit	T2500	COM	Box
Telebit	T3000	COM	Box
Telebit	TrailBlazer Plus	COM	Box
Telebit	TrailBlazer Plus 2400	COM	Box
Telebit	V.34  28800	COM	Box
Telebit	WorldBlazer	COM	Box
Telelink	Cardline V32bis	COM	Box
Telelink	IMS-08 Faxline+	COM	Box
Telelink	SAFEline	COM	Box
Telelink	Swissmod III FAST	COM	Box
Telelink	Swissmod III SWITCH	COM	Box
Texas Instruments	TravelMate 14400 Data, 14400 Fax	COM	Box
Texas Instruments	TravelMate 14400 Data, 9600 Fax	COM	Box
Texas Instruments	TravelMate 2400 Send Fax Modem	COM	Box
TKR	SlimLine 144	COM	Box
TKR	TerboLine 19k2	COM	Box
Tornado	FM 144 E	COM	Box
Tornado	FM 144 H	COM	Box
Tornado	FM 288 e	COM	Box
Tornado	FM 288 h	COM	Box
Toshiba Engineering Co.	BC 14.400 Fax-Data PCMCIA	PCMCIA	Box
Toshiba Engineering Co.	T144D-F	COM	Box
Toshiba Engineering Co.	T144PF4 PCMCIA	PCMCIA	Box
Toshiba Engineering Co.	T24D-F	COM	Box
Toshiba Engineering Co.	T24DX	COM	Box
Toshiba Engineering Co.	T24M	COM	Box
Toshiba Engineering Co.	T24SL PCMCIA	PCMCIA	Box
Toshiba Engineering Co.	TPCV32BF PCMCIA	PCMCIA	Box
Toshiba Engineering Co.	UK Advanced PCMCIA	PCMCIA	Box
Turbomodem	14.4 Data FAX Modem	COM	Box
Turbomodem	Plus FM-144VR-1	COM	Box
US Robotics	Courier 14,400 Dual Standard	COM	Box
US Robotics	Courier 14,400 Dual Standard PC	COM	Box
US Robotics	Courier 14,400 HST	COM	Box
US Robotics	Courier 14,400 HST PC	COM	Box
US Robotics	Courier 14,400 V32bis FAX	COM	Box
US Robotics	Courier 14,400 V32bis FAX PC	COM	Box
US Robotics	Courier 14,400 V32bis-V42bis PC	COM	Box
US Robotics	Courier 16,800 Dual Standard Fax	COM	Box
US Robotics	Courier 16,800 Dual Standard Fax PC	COM	Box
US Robotics	Courier 16,800 HST	COM	Box
US Robotics	Courier 16,800 HST PC	COM	Box
US Robotics	Courier 2400	COM	Box
US Robotics	Courier 2400 V42bis	COM	Box
US Robotics	Courier 2400 V42bis PC	COM	Box
US Robotics	Courier 9600 HST	COM	Box
US Robotics	Courier 9600 HST PC	COM	Box
US Robotics	Courier 9600 V32	COM	Box
US Robotics	Courier 9600 V32 PC	COM	Box
US Robotics	Courier Dual Standard V.34 Ready FAX	COM	Box
US Robotics	Courier HST Dual Standard Fax+ASL	COM	Box
US Robotics	Courier HST Dual Standard V.32bis+ASL	COM	Box
US Robotics	Courier Terbo Dual Standard Fax	COM	Box
US Robotics	Courier Terbo Dual Standard Fax PC	COM	Box
US Robotics	Courier Terbo V32bis Fax	COM	Box
US Robotics	Courier Terbo V32bis Fax PC	COM	Box
US Robotics	Courier V.Everything	COM	Box
US Robotics	Courier V32bis with ASL	COM	Box
US Robotics	Courier V32bis-V42bis	COM	Box
US Robotics	Sportster 28800 External	COM	Box
US Robotics	Sportster 28800 Internal	COM	Box
US Robotics	Worldport 1200 (Touchbase Systems)	COM	Box
US Robotics	Worldport 14400	PCMCIA	Box
US Robotics	Worldport 14400 FAX	COM	Box
US Robotics	Worldport 14400 PCMCIA	PCMCIA	Box
US Robotics	Worldport 16800 Dual Standard Fax	PCMCIA	Box
US Robotics	Worldport 2400 (EXAR)	COM	Box
US Robotics	Worldport 2400 V.42bis (EXAR)	COM	Box
US Robotics	Worldport 2400 V.42bis FAX (EXAR)	COM	Box
US Robotics	Worldport 2496 PCMCIA	PCMCIA	Box
US Robotics	Worldport 2496 V.42bis FAX	COM	Box
US Robotics	Worldport 2496itd V.42bis FAX	COM	Box
US Robotics	Worldport 9600 MNP 5	COM	Box
US Robotics	Worldport 9600 V.42bis	COM	Box
US Robotics	Worldport 9696 V.42bis FAX	COM	Box
US Robotics	Worldport Lite 14400	COM	Box
US Robotics	Worldport Lite 2400	COM	Box
VAYRIS, S.A.	MD-304	COM	Box
VAYRIS, S.A.	NL-144	COM	Box
VAYRIS, S.A.	NL-24	COM	Box
VAYRIS, S.A.	VY-502	COM	Box
Ven-Tel	9600 Plus Fax Modem	COM	Box
Ven-Tel	9600 Plus II Fax Modem	COM	Box
Ven-Tel	PCM14400 Fax Modem	COM	Box
Ven-Tel	PCM9600 Fax Modem	COM	Box
Winbook	14.4 Data FAX	COM	Box
WOERLEIN	DATAPHON	COM	Box
WOERLEIN	DATAPHON MIT DISPLAY	COM	Box
Xircom	CEM2 CreditCard Ethernet+Modem II	COM	Box
Xircom	PEM	COM	Box
Zenith Data Systems	Z-Note 14.4 Data-Fax	COM	Box
Zoltrix	14.4, 144 ATI	COM	Box
Zoltrix	14.4, ZX144 ATI	COM	Box
Zoltrix	28.8, 288 SI	COM	Box
Zoltrix	28.8, ZX288 ACI	COM	Box
Zoom	2400 V.42bis	COM	Box
Zoom	FC 9624	COM	Box
Zoom	FC 9624V	COM	Box
Zoom	FX 9624	COM	Box
Zoom	FX 9624V	COM	Box
Zoom	HC 2400	COM	Box
Zoom	PCMCIA 14.4C	PCMCIA	Box
Zoom	PCMCIA LC	PCMCIA	Box
Zoom	PKT 14.4	COM	Box
Zoom	V.34I	COM	Box
Zoom	V.34X	COM	Box
Zoom	VFDI	COM	Box
Zoom	VFDX	COM	Box
Zoom	VFP 14.4V	COM	Box
Zoom	VFP 19.2	COM	Box
Zoom	VFP 24K	COM	Box
Zoom	VFP 28.8	COM	Box
Zoom	VFP V.32bis	COM	Box
Zoom	VFX 14.4V	COM	Box
Zoom	VFX 19.2	COM	Box
Zoom	VFX 24K	COM	Box
Zoom	VFX 28.8	COM	Box
Zoom	VFX or VFP V.32bis	COM	Box
Zoom	VFX V.32bis	COM	Box
Zoom	VP V.32	COM	Box
Zoom	VP V.32bis	COM	Box
Zoom	VX V.32	COM	Box
Zoom	VX V.32bis	COM	Box
Zypcom	Z32b-PX Pocket	COM	Box
Zypcom	Z32b-SX	COM	Box
Zypcom	Z32t-SX	COM	Box
Zypcom	Z34-SX	COM	Box
ZyXEL	Fax U-1496B	COM	Box
ZyXEL	Fax U-1496B Plus	COM	Box
ZyXEL	Fax U-1496E Plus	COM	Box
ZyXEL	Fax U-1496P	COM	Box
ZyXEL	Fax U-1496RE	COM	Box
ZyXEL	Fax U-1496RE Plus	COM	Box
ZyXEL	Fax Voice U-1496 Plus	COM	Box
ZyXEL	Fax Voice U-1496E	COM	Box

Click here to see the list of logo'd products


Compatible Modem/ISDN

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Modem/ISDN

There are no products available at this time for the hardware category you selected.

Click here to see the list of logo'd products


Compatible Motion Video

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Motion Video

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Orchid	Videola	ISA	Box
Orchid	Videola Premium	ISA	Box
Sigma Designs	REALmagic PRO	ISA	WDL

Click here to see the list of logo'd products


Compatible Network/ATM

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Network/ATM

There are no products available at this time for the hardware category you selected.

Click here to see the list of logo'd products


Compatible Network/ISDN

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Network/ISDN

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Digi International	DataFire-S/T	ISA	WDL
Digi International	DataFire-U	ISDN	WDL
Digi International	DataFire/4-S/T	ISA	WDL
Digi International	PCIMAC-ISA	ISA	WDL
Digi International	PCIMAC/4	ISA	WDL
Eicon Technology	(G. Diehl ISDN) DIVA Adapter	ISA	WDL
Eicon Technology	DIVA	ISA	WDL
Elmic Systems	Surf2Surf ISDN Adapter	ISA	WDL
U.S. Robotics/Megahertz	Sportster 128k ISDN Internal Adapter	ISA	WDL

Click here to see the list of logo'd products


Compatible Network/LAN

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Network/LAN

Hardware Vendor	Device Name	Device Bus	Driver BIOS
3Com	3C503 EtherLink II/IITP	ISA	Box
3Com	3C505 EtherLink Plus	ISA	WDL
3Com	3C507 EtherLink 16	ISA	Box
3Com	3C523 EtherLink MC	MCA	Box
3Com	3C529 EtherLink MC32	MCA	Box
3Com	3C579 EtherLink EISA	EISA	Box
3Com	3C592-C Etherlink III (Rev 6B)	EISA	WDL
3Com	3C592-TPO Etherlink III (REV 2B)	EISA	WDL
3Com	3C597-TX Fast Etherlink III (REV C)	EISA	WDL
3Com	3C603 TokenLink III	ISA	Box
3Com	3C603B TokenLink III EISA	EISA	Box
3Com	3C689 TokenLink III 16/4	PCMCIA	Box
Alta Research	Ethernet PCMCIA LAN	PCMCIA	Box
AMD	AM1500t	ISA	Box
AMD	AM2100	ISA	Box
AMD	PCnet VL	VLB	Box
Artisoft/Eagle	AE-1	ISA	Box
Artisoft/Eagle	AE-2	ISA	Box
Artisoft/Eagle	AE-2 MCA	MCA	Box
Artisoft/Eagle	AE-3	ISA	Box
Artisoft/Eagle	AE-3 MCA	MCA	Box
Artisoft/Eagle	NE200T	PCMCIA	Box
AT&T	AT&T Stralan 10 LanPACER +	ISA	WDL
AT&T	Starlan 10 LanPacer+	ISA	WDL
Boca Research	BOCALANcard	ISA	Box
Boca Research	PCMCIA 10Base-T Ethernet	PCMCIA	Box
Cabletron	E2000 Series	ISA	Box
Cabletron	E2100 Series	ISA	Box
Cabletron	E3000 Series	MCA	Box
Cabletron	E3100 Series	MCA	Box
Cabletron	T2000 Series	ISA	Box
Cogent	eMaster + EM960 PCI	PCI	Box
Compaq	Contura Integrated	Chip	Box
Compaq	Elite Ethernet	ISA	Box
Compaq	Ethernet 16E	ISA	Box
Compaq	NetFlex Ethernet	EISA	Box
Compaq	NetFlex Token Ring	EISA	Box
Compaq	NetFlex-2 Ethernet	EISA	Box
Compaq	NetFlex-2 Token Ring	EISA	Box
DCA	IRMAtrac Convertible	ISA	WDL
DCA	IRMAtrac Convertible MCA	MCA	WDL
DCA	IRMAtrac HardTop ISA 4/16	ISA	WDL
DEC	DE100 EtherWORKS LC	ISA	Box
DEC	DE101 EtherWORKS LC/TP	ISA	Box
DEC	DE102 EtherWORKS LC/TP_BNC	ISA	Box
DEC	DE200 EtherWORKS Turbo	EISA	Box
DEC	DE201 EtherWORKS Turbo/TP	EISA	Box
DEC	DE202 EtherWORKS Turbo/TP_BNC	EISA	Box
DEC	DE203 EtherWORKS 3 /BNC	ISA	WDL
DEC	DE204 EtherWORKS 3 /TP	ISA	WDL
DEC	DE205 EtherWORKS 3 /COMBO	ISA	WDL
DEC	DE210 EtherWORKS MC	MCA	Box
DEC	DE211 EtherWORKS MC/TP	MCA	Box
DEC	DE212 EtherWORKS MC/TP_BNC	MCA	Box
DEC	DE425 EtherWORKS Turbo EISA	EISA	Box
DEC	DE434 EtherWORKS Turbo/TP PCI	PCI	Box
DEC	DE435 EtherWORKS Turbo/TP PCI	PCI	Box
DEC	DE500 Fast Ethernet	PCI	Box
DEC	DECpc 433 WS	Chip	Box
DEC	DEPCA	ISA	Box
DEC	EE101 (built-in)	ISA	Box
DEC	Token Ring Auto 16/4 PCMCIA	PCMCIA	Box
Everex	SpeedLink /PC16 (EV2027)	ISA	WDL
Exos	105	ISA	Box
Farallon	EtherWave PC-ISA	ISA	Box
Farallon	EtherWave PCMCIA	PCMCIA	Box
Farallon	EtherWave Plug and Play	ISA	Box
Fujitsu	MBH10302	PCMCIA	Box
Gateway 2000	PCMCIA Ethernet Infomover	PCMCIA	Box
Hewlett-Packard	HP27245 PC LAN/8 TP	ISA	Box
Hewlett-Packard	HP27247A PC LAN/16 TP	ISA	Box
Hewlett-Packard	HP27247B PC LAN/16 TP Plus	ISA	Box
Hewlett-Packard	HP27250 PC LAN/8 TL	ISA	Box
Hewlett-Packard	HP27252 PC LAN/16 TL Plus	ISA	Box
Hewlett-Packard	HPJ2573A 10/100VG Selectable	ISA	WDL
Hewlett-Packard	HPJ2577A 10/100VG Selectable	EISA	WDL
IBM	Auto 16/4 ISA Token Ring	ISA	WDL
IBM	Auto 16/4 Token Ring ISA	ISA	WDL
IBM	Auto LANStreamer MC 32	MCA	WDL
IBM	Dual EtherStreamer MC 32	MCA	WDL
IBM	Dual LANStreamer MC 32	MCA	WDL
IBM	EtherStreamer MC 32	MCA	WDL
IBM	ISA Ethernet	ISA	Box
IBM	LANStreamer (need specific name)	ISA/PCI/MCA	WDL
IBM	LANStreamer MC 32	MCA	WDL
IBM	PCMCIA Ethernet CreditCard	PCMCIA	Box
IBM	PCMCIA Ethernet CreditCard II	PCMCIA	Box
IBM	Token Ring - ISA	ISA	Box
IBM	Token Ring - MCA	MCA	Box
IBM	Token Ring 4/16	ISA	Box
IBM	Token Ring 4/16 MCA	MCA	Box
IBM	Token Ring CreditCard	PCMCIA	Box
IBM	Token Ring CreditCard II	PCMCIA	Box
IBM	Token Ring II	ISA	Box
IBM	Token Ring II/Short	ISA	Box
IBM	Token Ring MCA	MCA	Box
Intel	EtherExpress (TM) PRO/100B PCI LAN Adapter for TX (PILA8465B)	PCI	WDL
Intel	EtherExpress 16	ISA	Box
Intel	EtherExpress 16 MCA	MCA	Box
Intel	EtherExpress 16 Pro	ISA	Box
Intel	EtherExpress 16TP	ISA	Box
Intel	EtherExpress 32 EISA	EISA	Box
Intel	EtherExpress PRO	ISA	Box
Intel	EtherExpress PRO PNP	ISA	Box
Intel	EtherExpress Pro/10	ISA	WDL
Intel	EtherExpress PRO/10 PCI LAN adapter (PILA8400)	PCI	WDL
Intel	EtherExpress PRO/100 EISA	EISA	Box
Intel	TokenExpress 16/4	ISA	Box
Intel	TokenExpress 32 EISA 16/4	EISA	WDL
Intel	TokenExpress EISA 16/4	EISA	Box
Intel	TokenExpress MCA 16/4	MCA	Box
Kingston Technology	KNE-PCM/T Etherx Ethernet	PCMCIA	Box
Kingston Technology	KTR-PCM16/4 Token Ring 16/4	PCMCIA	Box
LinkSys	Ether16 LAN Card	ISA	Box
LinkSys	EtherFast LAN	PCI	Box
Madge	Blue 16/4 ISA	ISA	WDL
Madge	Smart 16/4 AT Plus Ringnode	ISA	Box
Madge	Smart 16/4 AT Ringnode	ISA	Box
Madge	Smart 16/4 EISA Ringnode	EISA	Box
Madge	Smart 16/4 ISA Client Plus Ringnode	ISA	Box
Madge	Smart 16/4 ISA Client Ringnode	ISA	Box
Madge	Smart 16/4 MC Ringnode	MCA	Box
Madge	Smart 16/4 MC32 Ringnode	MCA	Box
Madge	Straight Blue Line - ISA	ISA	Box
Madge	Straight Blue Line - MCA	MCA	Box
Microdyne	IRMAtrac 16/4 Convertable (ISA)	ISA	WDL
Microdyne	IRMAtrac 16/4 Convertable (MCA)	MCA	WDL
Microdyne	IRMAtrac 16/4 Convertible	ISA	WDL
Microdyne	IRMAtrac 4/16 MCA	MCA	WDL
Microdyne	NE2500/NE2500T Ethernet	ISA	Box
Microdyne	Novell NE4000 PCMCIA	PCMCIA	Box
Microdyne	PCI Ethernet	PCI	Box
Mitron	LX-2100+ Ethernet	ISA	Box
Mitron	PCI Local Bus Ethernet	VL	Box
NCR	StarCard	ISA	WDL
NCR	StarLAN 16/4 ISA Token Ring NAU	ISA	WDL
NCR	StarLAN 16/4 MCA Token Ring NAU	MCA	WDL
NCR	StarLAN 4 ISA Token Ring NAU	ISA	WDL
NCR	WaveLan AT	ISA	WDL
NCR	WaveLan MC	MCA	WDL
NDC	Credit Card Ethernet	PCMCIA	Box
Novell	NE/2	MCA	Box
Novell	NE1000	ISA	Box
Novell	NE1500T	ISA	Box
Novell	NE2000	ISA	Box
Novell	NE2000 Plus	ISA	Box
Novell	NE2000plus	ISA	Box
Novell	NE2100	ISA	Box
NSC	AT/LANTIC EtherNODE 16-AT3	ISA	Box
NSC	InfoMover NE2000Plus	ISA	Box
NSC	InfoMover NE4100	PCMCIA	Box
Number Nine Computer	3C509 Etherlink III	ISA	WDL
Olicom	32-bit Token Ring Server	EISA	WDL
Olicom	OC-3117 ISA 16/4 Token Ring	ISA	Box
Olicom	OC-3117 ISA 16/4 Token Ring Adapter	ISA	Box
Olicom	OC-3129 MCA 16/4 Token Ring	MCA	Box
Olicom	OC-3133 EISA 16/4 Token Ring	EISA	Box
Olicom	OC-3133 Token Ring EISA	EISA	Box
Ositech	Jack of Diamonds Multi-function	PCMCIA	Box
Piiceon	PCMCIA LAN	PCMCIA	Box
Proteon	P1340 ISA Token Ring	ISA	WDL
Proteon	P1342 ISA Token Ring	ISA	WDL
Proteon	P1346 ISA Token Ring	ISA	WDL
Proteon	P1347 ISA Token Ring	ISA	WDL
Proteon	P1390 ISA Token Ring	ISA	Box
Proteon	P1392 ISA Token Ring	ISA	Box
Proteon	P1392+ ISA Token Ring	ISA	Box
Proteon	P1392+ proNET 4/16 Token Ring	ISA	Box
Proteon	P1840 MCA Token Ring	MCA	WDL
Proteon	P1892 ProNET 4/16	MCA	WDL
Proteon	P1892 proNET 4/16 Token Ring	MCA	WDL
Proteon	P1990 Token Ring	EISA	Box
Proteon	P1990+ EISA ProNET 4/16	EISA	Box
Proteon	P1990+ proNET 4/16 Token Ring	EISA	Box
Pure Data	PDI5016+	ISA	Box
Pure Data	PDI508+	ISA	Box
Pure Data	PDI9025-32	EISA	Box
Pure Data	PDuC9025 16/4	ISA	Box
Racal	ES3210 EISA Ethernet	EISA	WDL
Racal	NI5210/16	ISA	WDL
Racal	NI5210/8	ISA	WDL
Racal	NI6510	ISA	WDL
Racal Guardata	ES3210	EISA	Box
Realtek	RTL8019 PnP LAN	ISA	Box
Silicom	Modular Pocket Ethernet	LPT	Box
SMC	8003 Series	ISA	WDL
SMC	8013 EtherCard	ISA	WDL
SMC	8013 EtherCard Plus/A	MCA	WDL
SMC	8216 EtherCard Elite16 Ultra	ISA	WDL
SMC	9000 Ethernet	ISA	Box
SMC	ARCnet PC100	ISA	Box
SMC	ARCnet PC110	ISA	Box
SMC	ARCnet PC120	ISA	Box
SMC	ARCnet PC130/E	ISA	Box
SMC	ARCnet PC200	ISA	Box
SMC	ARCnet PC210	ISA	Box
SMC	ARCnet PC220	ISA	Box
SMC	ARCnet PC250	ISA	Box
SMC	ARCnet PC260	ISA	Box
SMC	ARCnet PC270/E	ISA	Box
SMC	ARCnet PC600W	ISA	Box
SMC	ARCnet PC650W	ISA	Box
SMC	ARCnet PS110	ISA	Box
SMC	ARCnet PS210	ISA	Box
Socket Communication	EA/EA+ Ethernet	PCMCIA	Box
SysKonnect	SK-NET FDDI EISA	EISA	WDL
SysKonnect	SK-NET FDDI ISA	ISA	WDL
SysKonnect	SK-NET FDDI MCA	MCA	WDL
SysKonnect	SK-NET G16 Ethernet	ISA	WDL
SysKonnect	SK-NET G32+ Ethernet	EISA	WDL
SysKonnect	SK-NET TR 4/16+	ISA	WDL
Thomas-Conrad	TC-Card PCMCIA	PCMCIA	Box
Thomas-Conrad	TC4035	ISA	Box
Thomas-Conrad	TC4045	ISA	Box
Thomas-Conrad	TC4046	MCA	Box
Thomas-Conrad	TC4145 PNP	ISA	Box
Thomas-Conrad	TC5041 Ethernet PCMCIA	PCMCIA	Box
Thomas-Conrad	TC5048 T2	PCI	Box
Thomas-Conrad	TC6042	ISA	Box
Thomas-Conrad	TC6045	ISA	Box
Thomas-Conrad	TC6142	ISA	Box
Thomas-Conrad	TC6145	ISA	Box
Thomas-Conrad	TC6242	ISA	Box
Thomas-Conrad	TC6245	ISA	Box
Thomas-Conrad	TCTX048 100BASE-TX PCI	PCI	Box
Toshiba Engineering Co.	Noteworthy PCMCIA Token Ring	PCMCIA	Box
Toshiba Engineering Co.	NWETH01 PCMCIA	PCMCIA	Box
Tulip	NCC-16	ISA	WDL
Ungermann Bass	2030 NIUpc	ISA	WDL
Ungermann Bass	3030/NIUps	MCA	WDL
Ungermann Bass	3035 NIUps/EOTP	MCA	WDL
Ungermann Bass	3270 NIUpc	ISA	WDL
Ungermann Bass	4035 NIUpc/EOTP	ISA	WDL
Ungermann Bass	NIC/ps	MCA	WDL
Ungermann Bass	NUIps	MCA	WDL
Ungermann Bass	pcNIU	ISA	WDL
Ungermann Bass	pcNIU/ex 128K	ISA	WDL
Ungermann Bass	pcNIU/ex 512K	ISA	WDL
Xircom	CreditCard Token Ring Adapter IIps	PCMCIA	Box
Xircom	PE3 Pocket Ethernet III	LPT	WDL
Xircom	Pocket Ethernet I (PE1)	LPT	WDL
Xircom	Pocket Ethernet II (PE2)	LPT	WDL
Xircom	Pocket Ethernet III (PE3)	LPT	WDL
ZDS	Z-Note	Chip	WDL
ZDS	Z-Station 500	Chip	Box
ZYNZ	ZX312 EtherAction PCI LAN	PCI	Box

Click here to see the list of logo'd products


Compatible Network/WAN

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Network/WAN

There are no products available at this time for the hardware category you selected.

Click here to see the list of logo'd products


Compatible Printer

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Printer

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Apple	LaserWriter	LPT	Box
Apple	LaserWriter 360	LPT	Box
Apple	LaserWriter II NT	LPT	Box
Apple	LaserWriter II NTX	LPT	Box
Apple	LaserWriter IIf	LPT	Box
Apple	LaserWriter IIg	LPT	Box
Apple	LaserWriter Personal NT	LPT	Box
Apple	LaserWriter Plus	LPT	Box
Apple	LaserWriter Pro 600	LPT	Box
Apple	LaserWriter Pro 630	LPT	Box
Apple	LaserWriter Pro 810	LPT	Box
Apple	Personal LaserWriter NTR	LPT	Box
AST Research	AST TurboLaser/PS	LPT	Box
AT&T	AT&T 435	LPT	Box
AT&T	AT&T 470/475	LPT	Box
AT&T	AT&T 473/478	LPT	Box
Brother	HJ-100	LPT	Box
Brother	HJ-100i	LPT	Box
Brother	HJ-400	LPT	Box
Brother	HJ-770	LPT	Box
Brother	HL-10DV	LPT	Box
Brother	HL-10h	LPT	Box
Brother	HL-10V	LPT	Box
Brother	HL-4	LPT	Box
Brother	HL-4v	LPT	Box
Brother	HL-4ve	LPT	Box
Brother	HL-6	LPT	Box
Brother	HL-6V	LPT	Box
Brother	HL-8	LPT	Box
Brother	HL-8D	LPT	Box
Brother	HL-8e	LPT	Box
Brother	HL-8V	LPT	Box
Brother	M-1309	LPT	Box
Brother	M-1324	LPT	Box
Brother	M-1809	LPT	Box
Brother	M-1818	LPT	Box
Brother	M-1824L	LPT	Box
Brother	M-1909	LPT	Box
Brother	M-1918	LPT	Box
Brother	M-1924L	LPT	Box
Bull	Compuprint PageMaster 1025	LPT	Box
Bull	Compuprint PageMaster 413	LPT	Box
Bull	Compuprint PageMaster 815	LPT	Box
Bull	Compuprint PageMaster 825	LPT	Box
C-Itoh	C-Itoh 8510	LPT	Box
Canon	Bubble-Jet BJ-100	LPT	Box
Canon	Bubble-Jet BJ-10e	LPT	Box
Canon	Bubble-Jet BJ-10ex	LPT	Box
Canon	Bubble-Jet BJ-10sx	LPT	Box
Canon	Bubble-Jet BJ-130	LPT	Box
Canon	Bubble-Jet BJ-130e	LPT	Box
Canon	Bubble-Jet BJ-20	LPT	Box
Canon	Bubble-Jet BJ-200	LPT	Box
Canon	Bubble-Jet BJ-200e	LPT	Box
Canon	Bubble-Jet BJ-230	LPT	Box
Canon	Bubble-Jet BJ-300	LPT	Box
Canon	Bubble-Jet BJC-4000	LPT	Box
Canon	Bubble-Jet BJC-600	LPT	Box
Canon	Bubble-Jet BJC-600E	LPT	Box
Canon	Bubble-Jet BJC-70	LPT	Box
Canon	Bubble-Jet BJC-800	LPT	Box
Canon	LBP-4	LPT	Box
Canon	LBP-4 Lite	LPT	Box
Canon	LBP-4 Plus	LPT	Box
Canon	LBP-430	LPT	Box
Canon	LBP-4i	LPT	Box
Canon	LBP-4sx	LPT	Box
Canon	LBP-4U	LPT	Box
Canon	LBP-8 II	LPT	Box
Canon	LBP-8 III	LPT	Box
Canon	LBP-8 III PLUS	LPT	Box
Canon	LBP-8 IIIR	LPT	Box
Canon	LBP-8 IIIT	LPT	Box
Canon	LBP-8 IIR	LPT	Box
Canon	LBP-8 IIT	LPT	Box
Canon	LBP-8 IV	LPT	Box
Canon	LBP-860	LPT	Box
Canon	LBP-8sx	LPT	Box
Citizen	120D	LPT	Box
Citizen	120D+	LPT	Box
Citizen	124D	LPT	Box
Citizen	180D	LPT	Box
Citizen	200GX	LPT	Box
Citizen	200GX/15	LPT	Box
Citizen	224	LPT	Box
Citizen	ABC ESC/P 2	LPT	Box
Citizen	GSX-130	LPT	Box
Citizen	GSX-140	LPT	Box
Citizen	GSX-140+	LPT	Box
Citizen	GSX-145	LPT	Box
Citizen	GSX-190	LPT	Box
Citizen	GSX-220	LPT	Box
Citizen	GSX-230	LPT	Box
Citizen	GSX-240 ESC P/2	LPT	Box
Citizen	GSX-245 ESC P/2	LPT	Box
Citizen	HSP-500	LPT	Box
Citizen	HSP-550	LPT	Box
Citizen	Notebook Printer II	LPT	Box
Citizen	PN48	LPT	Box
Citizen	Prodot 24	LPT	Box
Citizen	Prodot 9	LPT	Box
Citizen	Prodot 9x	LPT	Box
Citizen	PROjet	LPT	Box
Citizen	Projet II	LPT	Box
Citizen	Prolaser 6000	LPT	Box
Citizen	Swift 200	LPT	Box
Citizen	Swift 24	LPT	Box
Citizen	Swift 240 ESC P/2	LPT	Box
Citizen	Swift 240x ESC P/2	LPT	Box
Citizen	Swift 24e	LPT	Box
Citizen	Swift 24x	LPT	Box
Citizen	Swift 9	LPT	Box
Citizen	Swift 90	LPT	Box
Citizen	Swift 9x	LPT	Box
Compaq	MageMarq 15	LPT	Box
Compaq	MageMarq 15 (Postscript)	LPT	Box
Compaq	MageMarq 20	LPT	Box
Compaq	MageMarq 20 (Postscript)	LPT	Box
Dataproducts	LZR-2665	LPT	Box
DEC	DECcolorwriter 1000  39	LPT	Box
DEC	DEClaser 1100	LPT	Box
DEC	DEClaser 1150	LPT	Box
DEC	DEClaser 1152	LPT	Box
DEC	DEClaser 1152  43 fonts	LPT	Box
DEC	DEClaser 2100	LPT	Box
DEC	DEClaser 2100/Plus	LPT	Box
DEC	DEClaser 2150	LPT	Box
DEC	DEClaser 2150/plus	LPT	Box
DEC	DEClaser 2200	LPT	Box
DEC	DEClaser 2200/Plus	LPT	Box
DEC	DEClaser 2250	LPT	Box
DEC	DEClaser 2250 plus	LPT	Box
DEC	DEClaser 3200	LPT	Box
DEC	DEClaser 3250	LPT	Box
DEC	DEClaser 5100/Net	LPT	WDL
DEC	DECmultiJET 1000	LPT	Box
DEC	DECmultiJET 1500	LPT	Box
DEC	DECmultiJET 2000	LPT	Box
DEC	DECwriter 95	LPT	Box
DEC	LA310	LPT	Box
DEC	LA324	LPT	Box
DEC	LA424	LPT	Box
DEC	LA70	LPT	Box
DEC	LA75	LPT	Box
DEC	LA75 Plus	LPT	Box
DEC	LN03R ScriptPrinter	LPT	Box
DEC	PrintServer 17	LPT	Box
DEC	PrintServer 17  12mb/L2	LPT	Box
DEC	PrintServer 17/12mb/Net	LPT	WDL
DEC	PrintServer 17/600	LPT	Box
DEC	PrintServer 17/600/Net	LPT	WDL
DEC	PrintServer 17/Net	LPT	WDL
DEC	PrintServer 32	LPT	Box
DEC	PrintServer 32/Net	LPT	WDL
DEC	PrintServer 40 Plus	LPT	Box
DEC	PrintServer 40 Plus/Net	LPT	WDL
DEC	Turbo PrintServer 20	LPT	Box
DEC	Turbo PrintServer 20/Net	LPT	WDL
Diconix	150 Plus	LPT	Box
Epson	ActionLaser 1000	LPT	Box
Epson	ActionLaser 1500	LPT	Box
Epson	ActionLaser 1600	LPT	Box
Epson	ActionLaser II	LPT	Box
Epson	ActionLaser Plus	LPT	Box
Epson	AP-2000	LPT	Box
Epson	AP-2250	LPT	Box
Epson	AP-2500	LPT	Box
Epson	AP-3000	LPT	Box
Epson	AP-3250 ESC/P 2	LPT	Box
Epson	AP-3260 ESC/P 2	LPT	Box
Epson	AP-4000	LPT	Box
Epson	AP-4500	LPT	Box
Epson	AP-5000 ESC/P 2	LPT	Box
Epson	AP-5000+ ESC/P 2	LPT	Box
Epson	AP-5500 ESC/P 2	LPT	Box
Epson	AP-5500+ ESC/P 2	LPT	Box
Epson	Compatible 24 pin	LPT	Box
Epson	Compatible 9 pin	LPT	Box
Epson	DFX-5000	LPT	Box
Epson	DFX-8000	LPT	Box
Epson	DLQ-2000	LPT	Box
Epson	EPL-4000	LPT	Box
Epson	EPL-4100	LPT	Box
Epson	EPL-4200	LPT	Box
Epson	EPL-4300	LPT	Box
Epson	EPL-5000	LPT	Box
Epson	EPL-5200	LPT	Box
Epson	EPL-5600	LPT	Box
Epson	EPL-6000	LPT	Box
Epson	EPL-7100	LPT	Box
Epson	EPL-7500	LPT	Box
Epson	EPL-8000	LPT	Box
Epson	EPL-8100	LPT	Box
Epson	EX-1000	LPT	Box
Epson	EX-800	LPT	Box
Epson	FX-100	LPT	Box
Epson	FX-100+	LPT	Box
Epson	FX-1000	LPT	Box
Epson	FX-1050	LPT	Box
Epson	FX-1170	LPT	Box
Epson	FX-185	LPT	Box
Epson	FX-286	LPT	Box
Epson	FX-286e	LPT	Box
Epson	FX-80	LPT	Box
Epson	FX-80+	LPT	Box
Epson	FX-800	LPT	Box
Epson	FX-85	LPT	Box
Epson	FX-850	LPT	Box
Epson	FX-86e	LPT	Box
Epson	FX-870	LPT	Box
Epson	JX-80	LPT	Box
Epson	L-1000	LPT	Box
Epson	L-750	LPT	Box
Epson	LQ-100 ESC/P 2	LPT	Box
Epson	LQ-1000	LPT	Box
Epson	LQ-1010	LPT	Box
Epson	LQ-1050	LPT	Box
Epson	LQ-1050+	LPT	Box
Epson	LQ-1060	LPT	Box
Epson	LQ-1060+	LPT	Box
Epson	LQ-1070 ESC/P 2	LPT	Box
Epson	LQ-1070+ ESC/P 2	LPT	Box
Epson	LQ-1170 ESC/P 2	LPT	Box
Epson	LQ-150 ESC/P 2	LPT	Box
Epson	LQ-1500	LPT	Box
Epson	LQ-200	LPT	Box
Epson	LQ-2500	LPT	Box
Epson	LQ-2550	LPT	Box
Epson	LQ-400	LPT	Box
Epson	LQ-450	LPT	Box
Epson	LQ-500	LPT	Box
Epson	LQ-510	LPT	Box
Epson	LQ-550	LPT	Box
Epson	LQ-560	LPT	Box
Epson	LQ-570 ESC/P 2	LPT	Box
Epson	LQ-570+ ESC/P 2	LPT	Box
Epson	LQ-800	LPT	Box
Epson	LQ-850	LPT	Box
Epson	LQ-850+	LPT	Box
Epson	LQ-860	LPT	Box
Epson	LQ-860+	LPT	Box
Epson	LQ-870 ESC/P 2	LPT	Box
Epson	LQ-950	LPT	Box
Epson	LX-100	LPT	Box
Epson	LX-1050	LPT	Box
Epson	LX-400	LPT	Box
Epson	LX-80	LPT	Box
Epson	LX-800	LPT	Box
Epson	LX-810	LPT	Box
Epson	LX-850	LPT	Box
Epson	LX-850+	LPT	Box
Epson	LX-86	LPT	Box
Epson	MX-100	LPT	Box
Epson	MX-80	LPT	Box
Epson	MX-80 F/T	LPT	Box
Epson	RX-100	LPT	Box
Epson	RX-100+	LPT	Box
Epson	RX-80	LPT	Box
Epson	RX-80 F/T	LPT	Box
Epson	RX-80 F/T+	LPT	Box
Epson	SQ-1170 ESC/P 2	LPT	Box
Epson	SQ-2000	LPT	Box
Epson	SQ-2500	LPT	Box
Epson	SQ-2550	LPT	Box
Epson	SQ-850	LPT	Box
Epson	SQ-870 ESC/P 2	LPT	Box
Epson	Stylus 1000 ESC/P 2	LPT	Box
Epson	Stylus 300 ESC/P 2	LPT	Box
Epson	Stylus 800 ESC/P 2	LPT	Box
Epson	T-1000	LPT	Box
Epson	T-750	LPT	Box
Fujitsu	Breeze 100	LPT	Box
Fujitsu	Breeze 200	LPT	Box
Fujitsu	DL-1100	LPT	Box
Fujitsu	DL-1100 Colour	LPT	Box
Fujitsu	DL-1150	LPT	Box
Fujitsu	DL-1200	LPT	Box
Fujitsu	DL-1250	LPT	Box
Fujitsu	DL-2400	LPT	Box
Fujitsu	DL-2600	LPT	Box
Fujitsu	DL-3300	LPT	Box
Fujitsu	DL-3350	LPT	Box
Fujitsu	DL-3400	LPT	Box
Fujitsu	DL-3450	LPT	Box
Fujitsu	DL-3600	LPT	Box
Fujitsu	DL-4400	LPT	Box
Fujitsu	DL-4600	LPT	Box
Fujitsu	DL-5600	LPT	Box
Fujitsu	DL-900	LPT	Box
Fujitsu	DX 2100	LPT	Box
Fujitsu	DX 2200	LPT	Box
Fujitsu	DX 2300	LPT	Box
Fujitsu	DX 2400	LPT	Box
Fujitsu	RX7100PS	LPT	Box
Hermes	H 606	LPT	Box
Hewlett-Packard	7470A [Plotter]	LPT	Box
Hewlett-Packard	7475A [Plotter]	LPT	Box
Hewlett-Packard	7550A [Plotter]	LPT	Box
Hewlett-Packard	7580A [Plotter]	LPT	Box
Hewlett-Packard	7580B [Plotter]	LPT	Box
Hewlett-Packard	7585A [Plotter]	LPT	Box
Hewlett-Packard	7585B [Plotter]	LPT	Box
Hewlett-Packard	7586B [Plotter]	LPT	Box
Hewlett-Packard	Color LaserJet	LPT	Box
Hewlett-Packard	ColorPro [Plotter]	LPT	Box
Hewlett-Packard	ColorPro with GEC [Plotter]	LPT	Box
Hewlett-Packard	DesignJet 600 w/Stand	LPT	Box
Hewlett-Packard	DeskJet 1200C PostScript	LPT	Box
Hewlett-Packard	DeskJet 310 Printer	LPT	Box
Hewlett-Packard	DeskJet 320 Printer	LPT	Box
Hewlett-Packard	DeskJet 500C Printer	LPT	Box
Hewlett-Packard	DeskJet 520 Printer	LPT	Box
Hewlett-Packard	DeskJet 540	LPT	WDL
Hewlett-Packard	DeskJet 550C Printer	LPT	Box
Hewlett-Packard	DeskJet 560C Printer	LPT	Box
Hewlett-Packard	DeskJet Portable Printer	LPT	Box
Hewlett-Packard	DraftMaster I [Plotter]	LPT	Box
Hewlett-Packard	DraftMaster II [Plotter]	LPT	Box
Hewlett-Packard	DraftPro [Plotter]	LPT	Box
Hewlett-Packard	DraftPro DXL [Plotter]	LPT	Box
Hewlett-Packard	DraftPro EXL [Plotter]	LPT	Box
Hewlett-Packard	LaserJet 4P/MP Postscript	LPT	Box
Hewlett-Packard	LaserJet 4Si/SiMX Postscript	LPT	Box
Hewlett-Packard	LaserJet 5MP Postscript	LPT	Box
Hewlett-Packard	LaserJet IID PostScript Cartridge	LPT	Box
Hewlett-Packard	LaserJet III PostScript Cartridge	LPT	Box
Hewlett-Packard	LaserJet III PostScript Plus	LPT	Box
Hewlett-Packard	LaserJet IIID PostScript Cartridge	LPT	Box
Hewlett-Packard	LaserJet IIID PostScript Plus	LPT	Box
Hewlett-Packard	LaserJet IIIP PostScript Cartridge	LPT	Box
Hewlett-Packard	LaserJet IIIP PostScript Plus	LPT	Box
Hewlett-Packard	LaserJet IIP PostScript	LPT	Box
Hewlett-Packard	Laserjet IV	LPT	Box
Hewlett-Packard	LaserJet Series	LPT	Box
Hewlett-Packard	PaintJet 300XL	LPT	Box
Hewlett-Packard	PaintJet 300XL PostScript	LPT	Box
Hewlett-Packard	Plotter	LPT	Box
Kodak	ColorEase PS	LPT	Box
Kyocera	F-1000	LPT	Box
Kyocera	F-1000A	LPT	Box
Kyocera	F-1010	LPT	Box
Kyocera	F-1200S	LPT	Box
Kyocera	F-1800	LPT	Box
Kyocera	F-1800A	LPT	Box
Kyocera	F-2000A	LPT	Box
Kyocera	F-2010	LPT	Box
Kyocera	F-2200	LPT	Box
Kyocera	F-2200S	LPT	Box
Kyocera	F-3000	LPT	Box
Kyocera	F-3000A	LPT	Box
Kyocera	F-3010	LPT	Box
Kyocera	F-3300	LPT	Box
Kyocera	F-5000	LPT	Box
Kyocera	F-800	LPT	Box
Kyocera	F-800A	LPT	Box
Kyocera	F-820	LPT	Box
Kyocera	FS-1500	LPT	Box
Kyocera	FS-1500A	LPT	Box
Kyocera	FS-1550	LPT	Box
Kyocera	FS-1550A	LPT	Box
Kyocera	FS-3400	LPT	Box
Kyocera	FS-3400A	LPT	Box
Kyocera	FS-3500	LPT	Box
Kyocera	FS-3500A	LPT	Box
Kyocera	FS-400	LPT	Box
Kyocera	FS-400A	LPT	Box
Kyocera	FS-5500	LPT	Box
Kyocera	FS-5500A	LPT	Box
Kyocera	FS-850	LPT	Box
Kyocera	FS-850A	LPT	Box
Lexmark	2390 PS/1	LPT	Box
Lexmark	4019 Laser Printer	LPT	Box
Lexmark	4019 LaserPrinter PS17	LPT	Box
Lexmark	4019 LaserPrinter PS39	LPT	Box
Lexmark	4029 LaserPrinter	LPT	Box
Lexmark	4029 LaserPrinter PS17	LPT	Box
Lexmark	4029 LaserPrinter PS39	LPT	Box
Lexmark	4037 5E	LPT	Box
Lexmark	4039 LaserPrinter	LPT	Box
Lexmark	4039 LaserPrinter Plus	LPT	Box
Lexmark	4039 LaserPrinter PS	LPT	Box
Lexmark	4039 plus PS	LPT	Box
Lexmark	4070 IJ	LPT	Box
Lexmark	4072 ExecJet	LPT	Box
Lexmark	4076 ExecJet II	LPT	Box
Lexmark	4079 Color Jetprinter PS	LPT	Box
Lexmark	4226 Model 30	LPT	Box
Lexmark	Generic IBM Graphics 9Pin	LPT	Box
Lexmark	Generic IBM Graphics 9Pin wide	LPT	Box
Lexmark	Graphics	LPT	Box
Lexmark	Personal Page Printer II-30	LPT	Box
Lexmark	Personal Page Printer II-31	LPT	Box
Lexmark	Personal Pageprinter	LPT	Box
Lexmark	Personal Printer II 2380	LPT	Box
Lexmark	Personal Printer II 2380+	LPT	Box
Lexmark	Personal Printer II 2381	LPT	Box
Lexmark	Personal Printer II 2381+	LPT	Box
Lexmark	Personal Printer II 2390	LPT	Box
Lexmark	Personal Printer II 2390+	LPT	Box
Lexmark	Personal Printer II 2391	LPT	Box
Lexmark	Personal Printer II 2391+	LPT	Box
Lexmark	Portable 5183	LPT	Box
Lexmark	PPDS Laser	LPT	Box
Lexmark	Proprinter	LPT	Box
Lexmark	Proprinter II	LPT	Box
Lexmark	Proprinter III	LPT	Box
Lexmark	Proprinter X24	LPT	Box
Lexmark	Proprinter X24e	LPT	Box
Lexmark	Proprinter XL	LPT	Box
Lexmark	Proprinter XL II	LPT	Box
Lexmark	Proprinter XL III	LPT	Box
Lexmark	Proprinter XL24	LPT	Box
Lexmark	Proprinter XL24e	LPT	Box
Lexmark	PS/1 2205	LPT	Box
Lexmark	QuickWriter 5204	LPT	Box
Lexmark	QuietWriter III	LPT	Box
Lexmark	Valuewriter 300	LPT	Box
Lexmark	Valuewriter 600	LPT	Box
Linotronic	100	LPT	Box
Linotronic	200	LPT	Box
Linotronic	300 v47.1	LPT	Box
Linotronic	330	LPT	Box
Linotronic	500	LPT	Box
Linotronic	530	LPT	Box
Linotronic	630_630P	LPT	Box
Mannesman Tally	MT 130/24	LPT	Box
Mannesman Tally	MT 130/9	LPT	Box
Mannesman Tally	MT 131/24	LPT	Box
Mannesman Tally	MT 131/9	LPT	Box
Mannesman Tally	MT 150/24	LPT	Box
Mannesman Tally	MT 150/9	LPT	Box
Mannesman Tally	MT 151/24	LPT	Box
Mannesman Tally	MT 151/9	LPT	Box
Mannesman Tally	MT 230/18	LPT	Box
Mannesman Tally	MT 230/24	LPT	Box
Mannesman Tally	MT 230/9	LPT	Box
Mannesman Tally	MT 290	LPT	Box
Mannesman Tally	MT 330	LPT	Box
Mannesman Tally	MT 340	LPT	Box
Mannesman Tally	MT 350	LPT	Box
Mannesman Tally	MT 360	LPT	Box
Mannesman Tally	MT 730	LPT	Box
Mannesman Tally	MT 735	LPT	Box
Mannesman Tally	MT 81	LPT	Box
Mannesman Tally	MT 82	LPT	Box
Mannesman Tally	MT 83	LPT	Box
Mannesman Tally	MT 84	LPT	Box
Mannesman Tally	MT 90	LPT	Box
Mannesman Tally	MT 904 Plus	LPT	Box
Mannesman Tally	MT 908	LPT	Box
Mannesman Tally	MT 91	LPT	Box
Mannesman Tally	MT 92	LPT	Box
Mannesman Tally	MT 92C	LPT	Box
Mannesman Tally	MT 93	LPT	Box
Mannesman Tally	MT 94	LPT	Box
Mannesman Tally	MT 98	LPT	Box
Mannesman Tally	MT 99	LPT	Box
Mannesman Tally	MT Lite	LPT	Box
Mannesman Tally	T7010	LPT	Box
Mannesman Tally	T7018	LPT	Box
Mannesman Tally	T7040 (Color)	LPT	Box
Mannesman Tally	T7040 (Monochrome)	LPT	Box
Mannesman Tally	T9005	LPT	Box
Mannesman Tally	T9017	LPT	Box
Mannesmann Tally	T6045	LPT	Box
Microsoft	LPT Printer with bidirect communication	LPT	WDL
Microtek	TrueLaser	LPT	Box
Minolta	SP 3000	LPT	Box
Minolta	SP 3500	LPT	Box
NEC	Colormate PS/40	LPT	Box
NEC	Colormate PS/80	LPT	Box
NEC	Jetmate 400	LPT	Box
NEC	Jetmate 800	LPT	Box
NEC	Pinwriter CP6	LPT	Box
NEC	Pinwriter CP7	LPT	Box
NEC	Pinwriter P2 Plus	LPT	Box
NEC	Pinwriter P20	LPT	Box
NEC	Pinwriter P2200	LPT	Box
NEC	Pinwriter P30	LPT	Box
NEC	Pinwriter P3200	LPT	Box
NEC	Pinwriter P3300	LPT	Box
NEC	Pinwriter P5200	LPT	Box
NEC	Pinwriter P5300	LPT	Box
NEC	Pinwriter P5XL	LPT	Box
NEC	Pinwriter P6	LPT	Box
NEC	Pinwriter P6 Plus	LPT	Box
NEC	Pinwriter P60	LPT	Box
NEC	Pinwriter P6200	LPT	Box
NEC	Pinwriter P6300	LPT	Box
NEC	Pinwriter P7	LPT	Box
NEC	Pinwriter P7 Plus	LPT	Box
NEC	Pinwriter P70	LPT	Box
NEC	Pinwriter P90	LPT	Box
NEC	Pinwriter P9300	LPT	Box
NEC	Pinwriter P9XL	LPT	Box
NEC	Silentwriter 95	LPT	Box
NEC	Silentwriter LC 860 Plus	LPT	Box
NEC	Silentwriter LC890	LPT	Box
NEC	Silentwriter LC890XL	LPT	Box
NEC	Silentwriter S102	LPT	Box
NEC	Silentwriter2 290	LPT	Box
NEC	Silentwriter2 990	LPT	Box
NEC	Silentwriter2 Model 90	LPT	Box
OceColor	G5241 PS	LPT	Box
OceColor	G5242 PS	LPT	Box
Okidata	LaserLine 6	LPT	Box
Okidata	ML 182 Elite (IBM)	LPT	Box
Okidata	ML 192	LPT	Box
Okidata	ML 192 Elite (IBM)	LPT	Box
Okidata	ML 192 Elite (Microline)	LPT	Box
Okidata	ML 192 Plus	LPT	Box
Okidata	ML 192-IBM	LPT	Box
Okidata	ML 193	LPT	Box
Okidata	ML 193 Elite (IBM)	LPT	Box
Okidata	ML 193 Elite (Microline)	LPT	Box
Okidata	ML 193 Plus	LPT	Box
Okidata	ML 193-IBM	LPT	Box
Okidata	ML 280 Elite (IBM)	LPT	Box
Okidata	ML 320	LPT	Box
Okidata	ML 320 Elite (IBM)	LPT	Box
Okidata	ML 320 Elite (Microline)	LPT	Box
Okidata	ML 320-IBM	LPT	Box
Okidata	ML 321	LPT	Box
Okidata	ML 321 Elite (IBM)	LPT	Box
Okidata	ML 321 Elite (Microline)	LPT	Box
Okidata	ML 321-IBM	LPT	Box
Okidata	ML 3410 Elite (IBM)	LPT	Box
Okidata	ML 380	LPT	Box
Okidata	ML 380 Elite	LPT	Box
Okidata	ML 390	LPT	Box
Okidata	ML 390 Elite	LPT	Box
Okidata	ML 390 Plus	LPT	Box
Okidata	ML 391	LPT	Box
Okidata	ML 391 Plus	LPT	Box
Okidata	ML 393	LPT	Box
Okidata	ML 393 Plus	LPT	Box
Okidata	ML 393C	LPT	Box
Okidata	ML 393C Elite	LPT	Box
Okidata	ML 393C Plus	LPT	Box
Okidata	ML 395	LPT	Box
Okidata	ML 395 Elite	LPT	Box
Okidata	ML 395C	LPT	Box
Okidata	ML 395C Elite	LPT	Box
Okidata	ML 520	LPT	Box
Okidata	ML 520 IBM	LPT	Box
Okidata	ML 520 Microline	LPT	Box
Okidata	ML 521	LPT	Box
Okidata	ML 521 IBM	LPT	Box
Okidata	ML 521 Microline	LPT	Box
Okidata	ML 590	LPT	Box
Okidata	ML 590 Elite	LPT	Box
Okidata	ML 590C	LPT	Box
Okidata	ML 590C Elite	LPT	Box
Okidata	ML 591	LPT	Box
Okidata	ML 591 Elite	LPT	Box
Okidata	ML 591C	LPT	Box
Okidata	ML 591C Elite	LPT	Box
Okidata	ML 92 IBM	LPT	Box
Okidata	ML 93 IBM	LPT	Box
Okidata	ML Pacemark 3410	LPT	Box
Okidata	OL-400	LPT	Box
Okidata	OL-400E	LPT	Box
Okidata	OL-410	LPT	Box
Okidata	OL-410E	LPT	Box
Okidata	OL-410EX	LPT	Box
Okidata	OL-800	LPT	Box
Okidata	OL-810	LPT	Box
Okidata	OL-830	LPT	Box
Okidata	OL-830 PCL	LPT	Box
Okidata	OL-830 PostScript	LPT	Box
Okidata	OL-840	LPT	Box
Okidata	OL-840 PostScript	LPT	Box
Okidata	OL-850	LPT	Box
Okidata	OL-850 PostScript	LPT	Box
Okidata	OL-870	LPT	Box
Okidata	OL830/PS	LPT	Box
Okidata	OL840/PS	LPT	Box
Okidata	OL850/PS	LPT	Box
Okidata	OL870/PS	LPT	Box
Olivetti	DM 109	LPT	Box
Olivetti	DM 119	LPT	Box
Olivetti	DM 124	LPT	Box
Olivetti	DM 124 C	LPT	Box
Olivetti	DM 124 L	LPT	Box
Olivetti	DM 209 L	LPT	Box
Olivetti	DM 224 L	LPT	Box
Olivetti	DM 309	LPT	Box
Olivetti	DM 309 L	LPT	Box
Olivetti	DM 309 S	LPT	Box
Olivetti	DM 309 SL	LPT	Box
Olivetti	DM 324	LPT	Box
Olivetti	DM 324 L	LPT	Box
Olivetti	DM 324 S	LPT	Box
Olivetti	DM 324 SL	LPT	Box
Olivetti	DM 600	LPT	Box
Olivetti	DM 600 S	LPT	Box
Olivetti	DM 624	LPT	Box
Olivetti	DM 95	LPT	Box
Olivetti	ETV 5000	LPT	Box
Olivetti	JP 150	LPT	Box
Olivetti	JP 150 WS	LPT	Box
Olivetti	JP 250	LPT	Box
Olivetti	JP 350	LPT	Box
Olivetti	JP 350S	LPT	Box
Olivetti	JP 360 (Color)	LPT	Box
Olivetti	JP 360 (Monochrome)	LPT	Box
Olivetti	JP 450 (Color)	LPT	Box
Olivetti	JP 450 (Monochrome)	LPT	Box
Olivetti	JP 50	LPT	Box
Olivetti	PG 108	LPT	Box
Olivetti	PG 208 M2	LPT	Box
Olivetti	PG 306	LPT	Box
Olivetti	PG 308	LPT	Box
Olivetti	PG 404	LPT	Box
Olivetti	PG 408	LPT	Box
Panasonic	KX-P1081	LPT	Box
Panasonic	KX-P1121	LPT	Box
Panasonic	KX-P1123	LPT	Box
Panasonic	KX-P1124	LPT	Box
Panasonic	KX-P1124i	LPT	Box
Panasonic	KX-P1150	LPT	Box
Panasonic	KX-P1170	LPT	Box
Panasonic	KX-P1180	LPT	Box
Panasonic	KX-P1624	LPT	Box
Panasonic	KX-P1654	LPT	Box
Panasonic	KX-P1695	LPT	Box
Panasonic	KX-P2023	LPT	Box
Panasonic	KX-P2123	LPT	Box
Panasonic	KX-P2124	LPT	Box
Panasonic	KX-P2180	LPT	Box
Panasonic	KX-P2624	LPT	Box
Panasonic	KX-P3123	LPT	Box
Panasonic	KX-P3124	LPT	Box
Panasonic	KX-P3134	LPT	Box
Panasonic	KX-P3634	LPT	Box
Panasonic	KX-P4400	LPT	Box
Panasonic	KX-P4410	LPT	Box
Panasonic	KX-P4420	LPT	Box
Panasonic	KX-P4430	LPT	Box
Panasonic	KX-P4440	LPT	Box
Panasonic	KX-P4450	LPT	Box
Panasonic	KX-P4450i	LPT	Box
Panasonic	KX-P4451	LPT	Box
Panasonic	KX-P4455 v51.4	LPT	Box
Panasonic	KX-P5400	LPT	Box
Panasonic	KX-P5410	LPT	Box
QMS	3225 Print System	LPT	Box
QMS	420 Print System	LPT	Box
QMS	4525 Print System	LPT	Box
QMS	860 Print System	LPT	Box
QMS	860+ Print System	LPT	Box
QMS	ColorScript 100 Model 10	LPT	Box
QMS	ColorScript 100 Model 30	LPT	Box
QMS	ColorScript 210	LPT	Box
QMS	ColorScript 230	LPT	Box
QMS	ColorScript Laser 1000	LPT	Box
QMS	PS 1700	LPT	Box
QMS	PS 1725 Print System	LPT	Box
QMS	PS 2210	LPT	Box
QMS	PS 2220	LPT	Box
QMS	PS 410	LPT	Box
QMS	PS 800	LPT	Box
QMS	PS 800 Plus	LPT	Box
QMS	PS 810	LPT	Box
QMS	PS 810 Turbo	LPT	Box
QMS	PS 820	LPT	Box
QMS	PS 820 Turbo	LPT	Box
QMS	PS 825 MR	LPT	Box
QuadLaser	QuadLaser I	LPT	Box
Ricoh	LP-1200	LPT	Box
Royal	CJP 450	LPT	Box
Seiko	ColorPoint2 PSF	LPT	Box
Seiko	Personal ColorPoint	LPT	Box
Seiko	Personal ColorPoint PS	LPT	Box
Seiko	Personal ColorPoint PSN	LPT	Box
Seiko	Personal ColorPoint PSX	LPT	Box
Seiko	Pro ColorPoint PSH	LPT	Box
Seikosha	LT-20	LPT	Box
Seikosha	SL-80 IP	LPT	Box
Seikosha	SL-92	LPT	Box
Seikosha	SL-92 Plus	LPT	Box
Seikosha	SL-95 Color	LPT	Box
Seikosha	SP-1900	LPT	Box
Seikosha	SP-1900+	LPT	Box
Seikosha	SP-2000	LPT	Box
Seikosha	SP-2400	LPT	Box
Seikosha	SP-2415	LPT	Box
Seikosha	SpeedJET 200	LPT	Box
Sharp	JX-9300	LPT	Box
Sharp	JX-9460	LPT	Box
Sharp	JX-9500	LPT	Box
Sharp	JX-9500E	LPT	Box
Sharp	JX-9500H	LPT	Box
Sharp	JX-9660	LPT	Box
Sharp	JX-9700	LPT	Box
Sharp	JX-9700E	LPT	Box
Star	FR-10	LPT	Box
Star	FR-15	LPT	Box
Star	Laserprinter 4	LPT	Box
Star	LaserPrinter 4 StarScript	LPT	Box
Star	LaserPrinter 4III	LPT	Box
Star	LaserPrinter 5	LPT	Box
Star	LaserPrinter 5 TT/UK	LPT	Box
Star	LaserPrinter 5EX	LPT	Box
Star	Laserprinter 8	LPT	Box
Star	Laserprinter 8 DB	LPT	Box
Star	Laserprinter 8 DX	LPT	Box
Star	Laserprinter 8 II	LPT	Box
Star	LaserPrinter 8 III	LPT	Box
Star	LaserPrinter 8 LincPage	LPT	Box
Star	LC-10	LPT	Box
Star	LC-10 Colour	LPT	Box
Star	LC-100 Colour	LPT	Box
Star	LC-15	LPT	Box
Star	LC-20	LPT	Box
Star	LC-200	LPT	Box
Star	LC24-10	LPT	Box
Star	LC24-100	LPT	Box
Star	LC24-15	LPT	Box
Star	LC24-15 II	LPT	Box
Star	LC24-20	LPT	Box
Star	LC24-200	LPT	Box
Star	LC24-200 Colour	LPT	Box
Star	LC24-22	LPT	Box
Star	LC24-30	LPT	Box
Star	LC24-300	LPT	Box
Star	NB24-10	LPT	Box
Star	NB24-15	LPT	Box
Star	NL-10	LPT	Box
Star	NX-1000	LPT	Box
Star	NX-1000 Rainbow	LPT	Box
Star	NX-1001	LPT	Box
Star	NX-1020 Rainbow	LPT	Box
Star	NX-1500	LPT	Box
Star	NX-2400	LPT	Box
Star	NX-2410	LPT	Box
Star	NX-2415	LPT	Box
Star	NX-2415 II	LPT	Box
Star	NX-2420	LPT	Box
Star	NX-2420 Rainbow	LPT	Box
Star	NX-2420 Rainbow II	LPT	Box
Star	NX-2430	LPT	Box
Star	NX-2450	LPT	Box
Star	NX-2480	LPT	Box
Star	SJ-144	LPT	Box
Star	SJ-48	LPT	Box
Star	XB-2410	LPT	Box
Star	XB-2415	LPT	Box
Star	XB-2420	LPT	Box
Star	XB-2425	LPT	Box
Star	XB24-10	LPT	Box
Star	XB24-15	LPT	Box
Star	XB24-200	LPT	Box
Star	XB24-250	LPT	Box
Star	XR-1000	LPT	Box
Star	XR-1020	LPT	Box
Star	XR-1500	LPT	Box
Star	XR-1520	LPT	Box
Star	ZA-200	LPT	Box
Star	ZA-250	LPT	Box
Tegra	Genesis	LPT	Box
Tektronix	Phaser 140	LPT	WDL
Tektronix	Phaser 200i(4)	LPT	Box
Tektronix	Phaser 220i	LPT	Box
Tektronix	Phaser 300i	LPT	Box
Tektronix	Phaser 440	LPT	WDL
Tektronix	Phaser 480	LPT	Box
Tektronix	Phaser 480X	LPT	WDL
Tektronix	Phaser II PX	LPT	Box
Tektronix	Phaser II PXi	LPT	Box
Tektronix	Phaser III PXi	LPT	Box
Tektronix	Phaser IISDX	LPT	Box
Texas Instruments	850/855	LPT	Box
Texas Instruments	microLaser 600	LPT	Box
Texas Instruments	microLaser Pro 600 2014 PS23	LPT	Box
Texas Instruments	microLaser PS17	LPT	Box
Texas Instruments	microLaser PS35	LPT	Box
Toshiba Engineering Co.	ExpressWriter 420	LPT	Box
Toshiba Engineering Co.	ExpressWriter 440	LPT	Box
Toshiba Engineering Co.	GX-400	LPT	Box
Toshiba Engineering Co.	P1351	LPT	Box
Toshiba Engineering Co.	P351	LPT	Box
Toshiba Engineering Co.	P351SX	LPT	Box
Toshiba Engineering Co.	PageLaser12	LPT	Box
Triumph	Adler SDR 7706	LPT	Box
Triumph	Adler SDR 7706 PS13	LPT	Box
Triumph	Adler SDR 7706 PS35	LPT	Box
TTY	Generic / Text Only	LPT	Box
Unisys	AP-9210	LPT	Box
Unisys	AP-9415	LPT	Box
Varityper	VT-600	LPT	Box
Wang	LDP8	LPT	Box
Xerox	Color Laser 4900	LPT	WDL
Xerox	Color Laser 4915	LPT	WDL
Xerox	Color Laser 4920	LPT	WDL

Click here to see the list of logo'd products


Compatible Storage/CD-ROM Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/CD-ROM Drive

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Chinon	CDS431	SCSI	Box
Chinon	CDS435	SCSI	Box
Chinon	CDS525I	IDE	Box
Chinon	CDS531	SCSI	Box
Chinon	CDS535	SCSI	Box
Hitachi	CDR-1750	SCSI	Box
Hitachi	CDR-6750	SCSI	Box
Matsushita-Kotobuki Electronics	LK-MC605S	SCSI	Box
Matsushita-Kotobuki Electronics	LK-RC504AZ1	SCSI	Box
Matsushita-Kotobuki Electronics	LK-RC504NZ1	SCSI	Box
Matsushita-Kotobuki Electronics	LK-RC504ZZ1	SCSI	Box
Microsoft	Same IDE channel in CD-ROM and Hard Drives	IDE	WDL
Mitsumi	FX-001D	Prop.	Box
Mitsumi	FX-001D1	Prop.	Box
Mitsumi	FX-001D2	Prop.	Box
Mitsumi	FX-300	IDE	Box
Mitsumi	FX-400	IDE	Box
Mitsumi	LU005S	Prop.	Box
NEC	CDR-260	IDE	Box
NEC	CDR-260GW	IDE	Box
NEC	CDR-260R	IDE	Box
NEC	CDR-502	SCSI	Box
NEC	CDR-602	SCSI	Box
NEC	CR-401	SCSI	Box
NEC	CR-510	SCSI	Box
NEC	CR-601	SCSI	Box
NEC	Multispin 2x Changer	SCSI	Box
Panasonic	CR-503	SCSI	Box
Panasonic	CR-509	SCSI	Box
Panasonic	CR-521	Prop.	Box
Panasonic	CR-522	Prop.	Box
Panasonic	CR-562	Prop.	Box
Panasonic	CR-563	Prop.	Box
Panasonic	CR-571	IDE	Box
Panasonic	CR-572	IDE	Box
Panasonic	CR-574	IDE	Box
Panasonic	CR-581	IDE	Box
Philips	CM-207	IDE	Box
Plextor/Texel	4-Plex	SCSI	Box
Plextor/Texel	6-Plex	SCSI	Box
Plextor/Texel	DM-302X	SCSI	Box
Sanyo	CDR-S1G	IDE	Box
Sanyo	CDR-S3G	IDE	Box
Sony	CDU31A	Prop.	Box
Sony	CDU33A	Prop.	Box
Sony	CDU541	SCSI	Box
Sony	CDU55E	IDE	Box
Sony	CDU55S	SCSI	Box
Sony	CDU561	SCSI	Box
Sony	CDU76E	IDE	Box
Sony	CDU76S	SCSI	Box
Teac	CD-55E	IDE	Box
Toshiba Engineering Co.	T/XM-32XX	SCSI	Box
Toshiba Engineering Co.	T/XM-35XX	SCSI	Box
Toshiba Engineering Co.	T/XM-36XX	SCSI	Box
Toshiba Engineering Co.	T/XM-41XX	SCSI	Box
Toshiba Engineering Co.	T/XM-5301	SCSI	Box
Toshiba Engineering Co.	T/XM-5302	IDE	Box

Click here to see the list of logo'd products


Compatible Storage/Hard Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/Hard Drive

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Maxtor	MXT-540S	SCSI	Box

Click here to see the list of logo'd products


Compatible Storage/IDE Controller

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/IDE Controller

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Acculogic	PCIpport 2D/4D	PCI	Box
Acculogic	sIDE-2/PCI	PCI	Box
Acculogic	sIDE-4/VL	VL	Box
Acer Labs	M5215N	PCI	Box
Acer Labs	M5217	PCI	Box
American Megatrends	(PCI device ID: 9030)	PCI	Box
American Megatrends	(PCI device ID: 9031)	PCI	Box
American Megatrends	(PCI device ID: 9032)	PCI	Box
Arco Computer Products	AC-1077	MCA	Box
Arco Computer Products	AC-32VL+	VL	Box
Arco Computer Products	AC-DROM	VL	Box
Arco Computer Products	AC32PC+	PCI	Box
Arco Computer Products	AC32PCI	PCI	Box
Arco Computer Products	ACideJL+	ISA	Box
Arco Computer Products	ACMirror	ISA	Box
ATronics International	ATI IDEal-PCI	PCI	Box
ATronics International	ATI-IDEal VL-Cache	VL	Box
ATronics International	ATI-VL Bus-IDE/IO	VL	Box
ATTO Technology	SiliconExpress 4D	IDE	Box
ATTO Technology	VantagePCI MCd	PCI	Box
Bek-Tronic Technology	UN-1075	ISA	Box
Boca Research	IDE Plus (IDEG22)	ISA	Box
Boca Research	IDE Plus (IDEVL2)	VL	Box
BusLogic	KT-410A	VL	Box
BusLogic	KT-510A	ISA	Box
BusLogic	KT-910A	PCI	Box
CMD Technologies	CSA-6210	VL	Box
CMD Technologies	CSA-6400	PCI	Box
CMD Technologies	CSA-6408	PCI	Box
CMD Technologies	CSA-6460	PCI	Box
CMD Technologies	PCI0-640A	PCI	Box
CMD Technologies	PCI0-640B	PCI	Box
CMD Technologies	PCI0-640X	PCI	Box
CMD Technologies	PCI0-642	PCI	Box
CMD Technologies	PCI0-643	PCI	Box
CMD Technologies	PCI0-646	PCI	Box
Crest Microsystems	Enhanced Super	PCI	Box
DTC Data Technology	DTC 2130	PCI	Box
DTC Data Technology	DTC 2132D	PCI	Box
DTC Data Technology	DTC 2177A	VL	Box
DTC Data Technology	DTC 2183	ISA	Box
DTC Data Technology	DTC 2277VL	VL	Box
DTC Data Technology	DTC 2278	ISA	Box
DTC Data Technology	DTC 2280	ISA	Box
Elitegroup Computer Systems	DI-602	VL	Box
Elitegroup Computer Systems	DP-100	PCI	Box
Elitegroup Computer Systems	SP-810	PCI	Box
FarPoint Commmunications	F/PortIDE	ISA	Box
Future Domain	IDE-16002	ISA	Box
Future Domain	IDE-16030	ISA	Box
Future Domain	IDE-32000	VL	Box
Future Domain	IDE-32100	PCI	Box
gsi	Model 1645-V2	VL	Box
gsi	Model 18	ISA	Box
gsi	Model 21	ISA	Box
gsi	Model 32-V	ISA	Box
gsi	Model 4C	ISA	Box
Infomedia	(PCI device ID: 0000)	PCI	Box
Infomedia	(PCI device ID: 000B)	PCI	Box
JDR Microdevices	MCT-EFH	EISA	Box
JDR Microdevices	MCT-IDEIO	ISA	Box
JDR Microdevices	MCT-SIDE	ISA	Box
JDR Microdevices	MCT-SIO	ISA	Box
JDR Microdevices	MCT-VCFH	VL	Box
JDR Microdevices	MCT-VCIO	VL	Box
JDR Microdevices	MCT-VIO+	VL	Box
LeadingSpect	Spect Turbo PCI	PCI	Box
Morse	IDE Blazer VL	VL	Box
Ontrack	Rocket v1.1	IDE	Box
OPTi	82C621	PCI	Box
Prolink Computer	ProLink-IDE/O-UMC	VL	Box
Promise Technology	DC200	ISA	Box
Promise Technology	DC2300	VL	Box
Promise Technology	DC4030VL	VL	Box
Promise Technology	DC420	VL	Box
Promise Technology	DC500	PCI	Box
Promise Technology	DC5030/4030	PCI B/M	Box
Promise Technology	EIDE2300plus	VL	Box
Promise Technology	EIDE4030PLUS	VL	Box
Promise Technology	PCMCIA	PCMCIA	Box
QDI	QD-8500	PCI	Box
QDI	QD-8580	PCI	Box
Silicon Integrated Systems	SiS5513	Chip	Box
Silicon Valley Computer	ADP111VL	VL	Box
Silicon Valley Computer	ADP70LB	ISA	Box
Silicon Valley Computer	ADP80VL	VL	Box
Silicon Valley Computer	ADP90BVL	VL	Box
Silicon Valley Computer	ADP90VL	VL	Box
Symphony Laboratories	SL82C101P	PCI	Box
Symphony Laboratories	SL82C101V	VL	Box
Symphony Laboratories	SL82C103	PCI	Box
Symphony Laboratories	SL82C105	PCI B/M	Box
Tekram Technology	DC-200S	ISA	Box
Tekram Technology	DC-290N	PCI	Box
Tekram Technology	DC-290S	PCI	Box
Tekram Technology	DC-600C	ISA	Box
Tekram Technology	DC-600C/F	ISA	Box
Tekram Technology	DC-620B	EISA	Box
Tekram Technology	DC-680C	VL	Box
Tekram Technology	DC-690C	PCI	Box
Tekram Technology	TRM290	PCI	Box
Tyan Computers	PCI device ID: 1566	PCI	Box
Via Technologies	Fast PCI/IDE	PCI	Box
Via Technologies	VT83C561	PCI	Box
Via Technologies	VT83C571	PCI	Box
Winbond Electronics	VESA IDE	VL	Box

Click here to see the list of logo'd products


Compatible Storage/Raid

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/Raid

There are no products available at this time for the hardware category you selected.

Click here to see the list of logo'd products


Compatible Storage/Removable Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/Removable Drive

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Iomega	Parallel Port (Zip100) Interface	LPT	Box
Iomega	Zip 100	LPT	WDL
Iomega	Zip 100 Parallel Port	LPT/SCSI	Box
Sony	SMO-F331	SCSI	Box
Sony	SMO-F521	SCSI	Box
Sony	SMO-F531	SCSI	Box
SyQuest Technology	EZ135A	IDE	WDL
SyQuest Technology	EZ135S (135 MB)	SCSI	WDL
SyQuest Technology	SQ3270A (270 MB)	IDE	WDL
SyQuest Technology	SQ3270S (270 MB)	SCSI	WDL

Click here to see the list of logo'd products


Compatible Storage/SCSI Controller

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/SCSI Controller

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Acer	P815	SCSI	Box
Adaptec	AHA-1510	ISA	Box
Adaptec	AHA-1520	ISA	Box
Adaptec	AHA-1522	ISA	Box
Adaptec	AHA-1532P	ISA	Box
Adaptec	AHA-1540B	ISA	Box
Adaptec	AHA-1540C	ISA	Box
Adaptec	AHA-1542B	ISA	Box
Adaptec	AHA-1542C	ISA	Box
Adaptec	AHA-1542CF	ISA	Box
Adaptec	AHA-1640	MCA	Box
Adaptec	AHA-1740	EISA	Box
Adaptec	AHA-1742	EISA	Box
Adaptec	AHA-1744	EISA	Box
Adaptec	AHA-2740	EISA	Box
Adaptec	AHA-2742	EISA	Box
Adaptec	AHA-2742AT	EISA	Box
Adaptec	AHA-2840	VL	Box
Adaptec	AHA-2842	VL	Box
Adaptec	AHA-2944	PCI	Box
Adaptec	AHA-3940	PCI	Box
Adaptec	AHA-3980	PCI	Box
Adaptec	AHA-3985	PCI	Box
Adaptec	AIC-6260	Chip	Box
Adaptec	AIC-7770	Chip	Box
Adaptec	AIC-7850	PCI	Box
Adaptec	AIC-7870	PCI	Box
Adaptec	APA-348	LPT	Box
Adaptec	APA-358A	LPT	Box
Adaptec	AVA-1505	ISA	Box
Adaptec	SlimSCSI	PCMCIA	Box
Adaptec	Trantor T128	ISA	WDL
Adaptec	Trantor T130	ISA	WDL
Adaptec	Trantor T160	ISA	Box
Adaptec	Trantor T260	MCA	Box
Adaptec	Trantor T338	LPT	WDL
Adaptec	Trantor T348	LPT	Box
Adaptec	Trantor T358	LPT	Box
Adaptec	Trantor T460	PCMCIA	Box
Always	IN-2000	ISA	Box
AMD	PC-net SCSI	PCI	Box
AMD	PC/SCSI	PCI	Box
AMI	Series 44	ISA	Box
AMI	Series 441	EISA	Box
BusLogic	BT-445C	VLB	Box
BusLogic	BT-445S	VL	Box
BusLogic	BT-542B/D	ISA	Box
BusLogic	BT-545C	ISA-16	Box
BusLogic	BT-545S	ISA	Box
BusLogic	BT-640A	MCA	Box
BusLogic	BT-646D/S	MCA	Box
BusLogic	BT-742A	EISA	Box
BusLogic	BT-747C	EISA	Box
BusLogic	BT-747S	EISA	Box
BusLogic	BT-757C/CD	EISA	Box
BusLogic	BT-946C	PCI	Box
BusLogic	BT-956C/CD	PCI	Box
Compaq	32-Bit Fast-Wide SCSI-2/E	EISA	WDL
Compaq	32-Bit Fast-Wide SCSI-2/P	PCI	Box
Crest Microsystem	Performer-ISA	ISA	Box
Crest Microsystem	Performer-VESA	VLB	Box
DPT	2011/90	ISA	Box
DPT	2011/95	ISA	Box
DPT	2012/90	EISA	Box
DPT	2012/95	EISA	Box
DPT	2021/90	ISA	Box
DPT	2021/95	ISA	Box
DPT	2022/90	EISA	Box
DPT	2022/95	EISA	Box
DPT	PM2024	PCI	Box
DPT	PM2122	PCI	Box
DPT	PM2124	EISA	Box
DPT	PM3222	PCI	Box
DPT	PM3224	PCI	Box
Future Domain	MCS 600	MCA	Box
Future Domain	MCS 700	MCA	Box
Future Domain	TMC 1610	ISA	Box
Future Domain	TMC 1650	ISA	Box
Future Domain	TMC 1660	ISA	Box
Future Domain	TMC 1670	ISA	Box
Future Domain	TMC 1680	ISA	Box
Future Domain	TMC 1695 Plug and Play	ISA	Box
Future Domain	TMC 1790	EISA	Box
Future Domain	TMC 1795	EISA	Box
Future Domain	TMC 7000EX	EISA	Box
Future Domain	TMC 850M	ISA	Box
Future Domain	TMC 850MER	ISA	Box
Future Domain	TMC 850MEX	ISA	Box
Future Domain	TMC 860M	ISA	Box
Future Domain	TMC 885M	ISA	Box
Iomega	PC2	ISA	Box
Iomega	PC800B	ISA	WDL
New Media	Bus Toaster	PCMCIA	Box
QLogic	Fast!SCSI EISA	EISA	WDL
QLogic	Fast!SCSI IQ PCI	PCI	WDL
QLogic	Fast!SCSI IQ PCI-10	PCI	WDL
QLogic	Fast!SCSI ISA	ISA	WDL
QLogic	Fast!SCSI PCI Basic	PCI	WDL
QLogic	Fast!SCSI VESA Local	VLB	WDL
Rancho Technology	RT1600	ISA	WDL
Symbios Logic	53C700	ISA	Box
Symbios Logic	53C710	ISA	Box
Symbios Logic	53C720	ISA	Box
Symbios Logic	53C810	PCI	Box
Symbios Logic	53C820	PCI	Box
Symbios Logic	53C90	ISA	Box
Symbios Logic	53C94	ISA	Box
Symbios Logic	PnP 8100s	PCI	Box
Symbios Logic	PnP 8150s	PCI	Box
Symbios Logic	PnP 8250s	PCI	Box
Symbios Logic	PnP 8251d	PCI	Box
Symbios Logic	PnP 8251s	PCI	Box
Ultrastor	124F	EISA	Box
Ultrastor	14F	ISA	Box
Ultrastor	14FB	ISA	Box
Ultrastor	24FA	EISA	Box
Ultrastor	24FG	EISA	Box
Ultrastor	34F	VL	Box

Click here to see the list of logo'd products


Compatible Storage/Tape Drive

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : Storage/Tape Drive

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Conner Peripherals	TST800R Internal Tape Store 800MB	FLOPPY	Box
Sony	SDT-2000	SCSI	Box
Sony	SDT-4000	SCSI	Box
Sony	SDT-5000	SCSI	Box
Sony	SDT-5200	SCSI	Box

Click here to see the list of logo'd products


Compatible System/Desktop

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : System/Desktop

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Achme Computer , Inc.	U-Tron 250 series	ISA	Box
ACMA	Spower	ISA/PCI	Box
ACMA	Zpower	ISA/PCI	Box
AIWA Co., Ltd	PC-MT575 (infortainment 575)	ISA/PCI	Box
Amax Engineering	P-90E	ISA/PCI	Box
Amax Engineering	P-90Z	ISA/PCI	Box
AMS, Inc.	AMS NB	ISA	Box
AMS, Inc.	AMS NBM3	ISA	Box
AMS, Inc.	AMS NBPC	ISA	Box
Apple	Macintosh LC 630 DOS Compatible	ISA	Box
Apple	Macintosh Perform 640 CD	ISA	Box
Apple	Power Macintosh 6100/66 DOS Compatible	ISA	Box
Apricot Computers Limited	Apricot Epx 486	ISA	Box
Apricot Computers Limited	Apricot EPX Pentium 590	ISA	Box
Apricot Computers Limited	Apricot Qi 486	ISA	Box
Apricot Computers Limited	Apricot XEN LS-11	ISA	Box
AT&T	Globalyst 3371/3372/3374	ISA	Box
AT&T	Globalyst 360 TPC	ISA	Box
AT&T	Globalyst 510/515	ISA	Box
AT&T	Globalyst 510E/515E	ISA	Box
AT&T	Globalyst 520	ISA	Box
AT&T	Globalyst 520/530	ISA	Box
AT&T	Globalyst 525	ISA	Box
AT&T	Globalyst 580	ISA	Box
AT&T	Globalyst 590	ISA	Box
AT&T	Globalyst 600	ISA	Box
AT&T	Globalyst 620	ISA	Box
AT&T	Globalyst 620/630/362 TPC	ISA	Box
AT&T	NCR System 3000 Model 3227	ISA	Box
AT&T	NCR System 3000 Model 3230	ISA	Box
AT&T	NCR System 3000 Model 3230 LB	ISA	Box
AT&T	NCR System 3000 Model 3325	ISA	Box
AT&T	NCR System 3000 Model 3333	ISA	Box
AT&T	NCR System 3000 Model 3345	ISA	Box
AT&T	NCR System 3000 Model 3350	ISA	Box
Compaq	Comtura Aero 4/33C	ISA	Box
Compaq	Contura 400CX	ISA	Box
Compaq	Contura 410CX	ISA	Box
Compaq	Contura 420CX	ISA	Box
Compaq	Contura Aero 4/25	ISA	Box
Compaq	Deskpro 4000 6180	ISA/PCI	Box
Compaq	Deskpro 4000 6200	ISA/PCI	Box
Compaq	DeskPro 575	ISA	Box
Compaq	Deskpro 6000 6200	ISA/PCI	Box
Compaq	DeskPro XE 4100	ISA	Box
Compaq	DeskPro XE 466	ISA	Box
Compaq	DeskPro XE 560	ISA	Box
Compaq	DeskPro XL 590	ISA	Box
Compaq	LTE Elite 4/50CX	ISA	Box
Compaq	LTE Elite 5/75 CXL	ISA	Box
Compaq	Presario 425	ISA	Box
Compaq	Presario 520 CDS	ISA	Box
Compaq	Presario 524	ISA	Box
Compaq	Presario 528 CDTV	ISA	Box
Compaq	Presario 660	ISA	Box
Compaq	Presario 724 CDTV	ISA	Box
Compaq	Presario 744 CDS	ISA	Box
Compaq	Presario 866	ISA	Box
Compaq	Presario 920 CDS	ISA	Box
Compaq	Presario 954 CDS	ISA	Box
Compaq	Presario CDS 520	ISA	Box
Compaq	ProLiant 1500 5/100	ISA	Box
Compaq	ProLiant 1500 5/75	ISA	Box
Compaq	Prolinea 4/33 CDS	ISA	Box
Compaq	Prolinea 4/66	ISA	Box
Compaq	Prolinea 590	ISA	Box
Compaq	Prolinea MT 4/66	ISA	Box
Compaq	Prolinea MT CDS	ISA	Box
Compaq	ProSignia 300 5/75	ISA	Box
Compaq	ProSignia 300 5/90	ISA	Box
Compaq	ProSignia 486DX/33	ISA	Box
Compaq	ProSignia 486DX2/66	ISA	Box
Compaq	ProSignia 5/60	ISA	Box
Compaq	ProSignia 500 5/90	ISA	Box
Compaq	ProSignia VS 486DX/33	ISA	Box
Compaq	ProSignia VS 486DX2/66	ISA	Box
Compaq	ProSignia VS 486SX/33	ISA	Box
Computrend	Premi Express Server	ISA	Box
Computrend	Premio 4145 Series (etc.)	ISA	Box
Computrend	Premio BTPIINTP5	ISA	Box
Computrend	Premio Denali BT	ISA	Box
Computrend	Premio Denali DT	ISA	Box
Computrend	Premio Denali MT	ISA	Box
Computrend	Premio Denali Series	ISA	Box
Computrend	Premio DTPCIINTP5	ISA	Box
Computrend	Premio Express Rocket PC	ISA	Box
Computrend	Premio Express station	ISA	Box
Computrend	Premio Express Vitesse CAD Station	ISA	Box
Computrend	Premio MTPCIINTP5	ISA	Box
Computrend	Premio Pentium (5112)	ISA	Box
Computrend	Premio Triton	ISA	Box
Computrend Systems, Inc.	Premio 219E	ISA	Box
Computrend Systems, Inc.	Premio 219F	ISA	Box
Computrend Systems, Inc.	Premio 5124	ISA	Box
Cubix Corporation	BC5095	ISA	Box
Dan Technology plc	Dan dantum/100	ISA	Box
Dan Technology plc	Dan dantum/120	ISA	Box
Dan Technology plc	Dan dantum/133	ISA	Box
Dan Technology plc	Dan dantum/150	ISA	Box
Dan Technology plc	Dan dantum/166	ISA	Box
Dan Technology plc	Dan dantum/75	ISA	Box
Dan Technology plc	Dan dantum/90	ISA	Box
Dan Technology plc	Dan dantum95/120	ISA	Box
Dan Technology plc	Dan dantum95/133	ISA	Box
Dan Technology plc	Dan dantum95/150	ISA	Box
Dan Technology plc	Dan dantum95/166	ISA	Box
Dan Technology plc	Dan dantum95/75	ISA	Box
Dan Technology plc	Dan dantum95/90	ISA	Box
Dan Technology plc	Dan danutm95/100	ISA	Box
Dan Technology plc	Dan home PC/100	ISA	Box
Dan Technology plc	Dan home PC/120	ISA	Box
Dan Technology plc	Dan home PC/133	ISA	Box
Dan Technology plc	Dan home PC/150	ISA	Box
Dan Technology plc	Dan home PC/166	ISA	Box
Dan Technology plc	Dan home PC/4100	ISA	Box
Dan Technology plc	Dan home PC/466	ISA	Box
Dan Technology plc	Dan home PC/75	ISA	Box
Dan Technology plc	Dan home PC/90	ISA	Box
Dan Technology plc	Dan premium/4100	ISA	Box
Dan Technology plc	Dan premium/466	ISA	Box
Dan Technology plc	Dan premium/SC100	ISA	Box
Dan Technology plc	Dan Ultimate/100	ISA	Box
Dan Technology plc	Dan Ultimate/120	ISA	Box
Dan Technology plc	Dan Ultimate/133	ISA	Box
Dan Technology plc	Dan Ultimate/150	ISA	Box
Dan Technology plc	Dan Ultimate/166	ISA	Box
Digital Equipment	Celebris 4100	ISA	WDL
Digital Equipment	Celebris 466	ISA	WDL
Digital Equipment	DECpc  425 ST	ISA	WDL
Digital Equipment	DECpc  433 dx LP	ISA	WDL
Digital Equipment	DECpc  433 ST	ISA	WDL
Digital Equipment	DECpc  450 d2LP	ISA	WDL
Digital Equipment	DECpc  450 ST	ISA	WDL
Digital Equipment	DECpc  450d2 ST	ISA	WDL
Digital Equipment	DECpc  466 D2LP	ISA	WDL
Digital Equipment	DECpc  466 ST	ISA	WDL
Digital Equipment	DECpc  560 ST	ISA	WDL
Digital Equipment	DECpc  LPv 425sx	ISA	WDL
Digital Equipment	DECpc  LPv 433sx	ISA	WDL
Digital Equipment	DECpc  LPx 4100	ISA	WDL
Digital Equipment	DECpc  LPx 433dx	ISA	WDL
Digital Equipment	DECpc  LPx 450 d2	ISA	WDL
Digital Equipment	DECpc  LPx 466 d2	ISA	WDL
Digital Equipment	DECpc 4100 MTE	ISA	WDL
Digital Equipment	DECpc 433dx MTE	ISA	WDL
Digital Equipment	DECpc 466d2 MTE	ISA	WDL
Digital Equipment	DECpc LC 450 slc2	ISA	Box
Digital Equipment	DECpc LPv + 433sx	ISA	Box
Digital Equipment	DECpc LPv 4100	ISA	WDL
Digital Equipment	DECpc LPv 433 dx	ISA	WDL
Digital Equipment	DECpc LPv 450d2	ISA	WDL
Digital Equipment	DECpc LPv 466d2	ISA	WDL
Digital Equipment	DECpc LPv+ 4100	ISA	WDL
Digital Equipment	DECpc LPv+ 433dx	ISA	WDL
Digital Equipment	DECpc LPv+ 450d2	ISA	WDL
Digital Equipment	DECpc LPv+ 466d2	ISA	WDL
Digital Equipment	DECpc LPx + 4100	ISA	Box
Digital Equipment	DECpc LPx + 466d2	ISA	Box
Digital Equipment	DECpc LPx + sx50	ISA	WDL
Digital Equipment	DECpc LPx 433sx	ISA	WDL
Digital Equipment	DECpc LPx 560	ISA	Box
Digital Equipment	DECpc LPx 566	ISA	Box
Digital Equipment	DECpc LPx+ 433sx	ISA	WDL
Digital Equipment	DECpc XL 4100	ISA	WDL
Digital Equipment	DECpc XL 433	ISA	WDL
Digital Equipment	DECpc XL 466	ISA	WDL
Digital Equipment	DECpc XL 560	ISA	WDL
Digital Equipment	DECpc XL 590	ISA	Box
Digital Equipment	DECpd LPx + 433dx	ISA	Box
Digital Equipment	Digital Celebris 560	ISA	WDL
Digital Equipment	Starion 200	ISA	Box
Digital Equipment	Starion 300	ISA	Box
Digital Equipment	Starion 400	ISA	Box
Digital Equipment	Starion 500	ISA	Box
Digital Equipment	Starion 700	ISA	Box
Digital Equipment	Venturs 560	ISA	WDL
DVM	DVM Machine MXI 54P Base	ISA	Box
DVM	DVM Machine MXI 54P Classic	ISA	Box
DVM	DVM Machine MXI 54P Easy Publisher	ISA	Box
DVM	DVM machine MXi 5P Base	ISA	Box
DVM	DVM machine MXi 5P Classic	ISA	Box
DVM	DVM machine MXi 5P Graphite	ISA	Box
DVM	DVM machine MXi 5P Partner	ISA	Box
DVM computer	DVM Machine MXi 54 H Junior	ISA	Box
Everex Systems, Inc.	AGI series	ISA	Box
Everex Systems, Inc.	FIC 486 Pak-2	ISA	Box
Everex Systems, Inc.	FIC 486 PVT-IO	ISA	Box
Everex Systems, Inc.	Tempo VLG Series	ISA	Box
Everex Systems, Inc.	TempoStation Series	ISA	Box
Forte Company S.R.L.	Delta 1.0sx Forte	ISA	Box
Forte Company S.R.L.	Delta 4.0sx Forte	ISA	Box
Forte Company S.R.L.	Delta 6.6 Forte	ISA	Box
Forte Company S.R.L.	Epsilon 7.5 Forte	ISA	Box
Forte Company S.R.L.	Epsilon 9.0 Forte	ISA	Box
Fujitsu	FM Pennote L3	ISA	Box
Fujitsu	FMV-4100C2	ISA	Box
Fujitsu	FMV-425D	ISA/PCI	Box
Fujitsu	FMV-425sD2	ISA/PCI	Box
Fujitsu	FMV-433D	ISA/PCI	Box
Fujitsu	FMV-433N/T2	ISA	Box
Fujitsu	FMV-433sD2	ISA/PCI	Box
Fujitsu	FMV-450sD2	ISA/PCI	Box
Fujitsu	FMV-450sD3	ISA/PCI	Box
Fujitsu	FMV-466C	ISA	Box
Fujitsu	FMV-466D	ISA	Box
Fujitsu	FMV-466D2	ISA/PCI	Box
Fujitsu	FMV-466D3	ISA/PCI	Box
Fujitsu	FMV-475N/T2	ISA	Box
Fujitsu	FMV-475NL/T	ISA	Box
Fujitsu	FMV-499D2	ISA	Box
Fujitsu	FMV-499D3	ISA/PCI	Box
Fujitsu	FMV-560D3	ISA	Box
Fujitsu	FMV-560DE	ISA/PCI	Box
Fujitsu	FMV-590D2	ISA/PCI	Box
Fujitsu	FMV-590D3	ISA/PCI	Box
Fujitsu	FMV-590DE	ISA/PCI	Box
Fujitsu	FMV-590T	ISA/PCI	Box
Fujitsu	FMV-590T2sp	ISA	Box
Fujitsu	FMV-590Tsp	ISA/PCI	Box
Fujitsu	Oasys 48VA-111	ISA	Box
Fujitsu	Oasys 48VL-101	ISA	Box
Fujitsu	Oasys V-450sB	ISA	Box
Fujitsu	Oasys V-466D3	ISA	Box
Fujitsu	Oasys V-466D4	ISA	Box
Fujitsu	Oasys V-5100D4	ISA	Box
Fujitsu	Oasys V-590D3	ISA	Box
Fujitsu ICL	ErgoPro C4/33 V	ISA	Box
Fujitsu ICL	ErgoPro C4/33e P	ISA	Box
Fujitsu ICL	ErgoPro C4/66d V	ISA	Box
Fujitsu ICL	ErgoPro D4/33 V	ISA	Box
Fujitsu ICL	ErgoPro D4/50 V	ISA	Box
Fujitsu ICL	ErgoPro D4/50d V	ISA	Box
Fujitsu ICL	ErgoPro D4/50de P	ISA	Box
Fujitsu ICL	ErgoPro D4/66d P	ISA	Box
Fujitsu ICL	ErgoPro D5/60 P	ISA	Box
Fujitsu ICL	ErgoPro D5/90 P	ISA	Box
Future Tech International	Concerto, Maestro	ISA	Box
Future Tech International	Markvision	ISA	Box
Future Tech International	Markvision Computer	ISA	Box
Hewlett-Packard	HP Vectra VT 6/150 PC	ISA/PCI	Box
Hewlett-Packard	HP Vectra XU 6/150	ISA/PCI	Box
Hewlett-Packard	HP Vectra XU 6/150 PC	ISA/PCI	Box
Hewlett-Packard	Vectra 486/66/N PC	ISA	Box
Hewlett-Packard	Vectra M2 4/50s PC	ISA	Box
Hewlett-Packard	Vectra M2 4/50si PC	ISA	Box
Hewlett-Packard	Vectra N2 4/100i PC	ISA	Box
Hewlett-Packard	Vectra XM2 4/100i PC	ISA	Box
Hitachi Ltd.	Flora 500VC	ISA	Box
Hitachi Ltd.	Flora 500VD	ISA	Box
Hitachi Ltd.	Flora1010DG 60M5	ISA	Box
Hitachi Ltd.	Flora1010DG 95D5	ISA	Box
Hitachi Ltd.	Flora1010DG 95M5	ISA	Box
Hitachi Ltd.	Flora1010DJ 60D5	ISA	Box
Hitachi Ltd.	Flora1010DJ 60M5	ISA	Box
Hitachi Ltd.	Flora1010DJ 95D5	ISA	Box
Hitachi Ltd.	Flora1010DJ 95M5	ISA	Box
Hitachi Ltd.	Flora1010DK 60D5	ISA	Box
Hitachi Ltd.	Flora1010DK 60M5	ISA	Box
Hitachi Ltd.	Flora1010DL 60D5	ISA	Box
Hitachi Ltd.	Flora1010Dl 60M5	ISA	Box
Hitachi Ltd.	Flora1010DM 60D5	ISA	Box
Hitachi Ltd.	Flora1010DM 60M5	ISA	Box
Hitachi Ltd.	Flora1010DN 80D5	ISA	Box
Hitachi Ltd.	Flora1010DN 80M5	ISA	Box
Hitachi Ltd.	Flora1010NE 54L5	ISA	Box
Hitachi Ltd.	Flora1010NE 64D5	ISA	Box
Hitachi Ltd.	Flora1010NE 65L5	ISA	Box
Hitachi Ltd.	Flora1010NE 66L5	ISA	Box
Hitachi Ltd.	Flora1010NF 64D5	ISA	Box
Hitachi Ltd.	Flora1010NF 65D5	ISA	Box
Hitachi Ltd.	Flora101DG 60D5	ISA	Box
Hitachi Ltd.	Flora3010CT 5DE5	ISA	Box
Hitachi Ltd.	Flora3010CT 68D5	ISA	Box
Hitachi Ltd.	Flora3010CU 58A5	ISA	Box
Hitachi Ltd.	Flora3010DU 88S5	ISA	Box
Hitachi Ltd.	Flora3010DV	ISA	Box
Hitachi Ltd.	Flora3010DW 60M5	ISA	Box
Hitachi Ltd.	Flora301CT 5DM5	ISA	Box
Hitachi Ltd.	Flora500VB	ISA	Box
IBM	7587-001	ISA/PCI	Box
IBM	IBM PC Stream 5538	ISA	Box
IBM	IBM PC720 6860-J	MCA	Box
IBM	IBM PC730 6876 Pent 100	MCA	Box
IBM	IBM PC730 6876 Pent 120	MCA	Box
IBM	IBM PC730 6876 Pent 133	MCA	Box
IBM	IBM PC730 6876 Pent 75	MCA	Box
IBM	IBM PC730 6876 Pent 90	MCA	Box
IBM	IBM PC750 6886 Pent 100	MCA	Box
IBM	IBM PC750 6886 Pent 120	MCA	Box
IBM	IBM PC750 6886 Pent 133	MCA	Box
IBM	IBM PC750 6886 Pent 75	MCA	Box
IBM	IBM PC750 6886 Pent 90	MCA	Box
IBM	IBM PC750 6886/Pent133 MH	MCA	Box
IBM	IBM PS/2 Model 76i 9576 486 DX2/100	MCA	Box
IBM	IBM PS/2 Model 76i 9576 486 DX2/50	MCA	Box
IBM	IBM PS/2 Model 76i 9576 486 DX2/66	MCA	Box
IBM	IBM PS/2 Model 77i 9576 486 DX2/100	MCA	Box
IBM	IBM PS/2 Model 77i 9576 486 DX2/50	MCA	Box
IBM	IBM PS/2 Model 77i 9576 486 DX2/66	MCA	Box
IBM	IBM PS/V Vision 2408	ISA	Box
IBM	IBM Valuepoint Performance Series 6472/486DX2/50MH	ISA	Box
IBM	IBM Valuepoint Performance Series 6472/486DX4/100MH	ISA	Box
IBM	IBM Valuepoint Performance Series 6482/486DX2/50	ISA	Box
IBM	IBM Valuepoint Performance Series 6482/486DX4/100	ISA	Box
IBM	IBM Valuepoint Performance Series 6492/486DX2/50MH	ISA	Box
IBM	IBM Valuepoint Performance Series 6492/486DX4/100	ISA	Box
Intergraph	TD-10 Personal Workstation Pentium/75MHz	ISA/PCI/PCMCIA	AMI (7420E)
Intergraph	TD-30 Personal Workstation Pentium/100MHz	ISA/PCI/PCMCIA	AMI (7420E)
Intergraph	TD-30 Personal Workstation Pentium/133Mhz	ISA/PCI/PCMCIA	AMI (7420E)
Maximus Computers	Max-Media	ISA	Box
Maximus Computers	Media 95	ISA	Box
Maximus Computers	Mega Media	ISA	Box
MIND	Mind Value 4-100	ISA	Box
Mitac International Corporation	IH4077D	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3436-A124	ISA	WDL
Mitsubishi Electric Corp.	XEN-LSII M3514-A108	ISA	WDL
Mitsubishi Electric Corp.	XEN-LSII M3514-A112	ISA	WDL
Mitsubishi Electric Corp.	XEN-LSII M3514-B108	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3514-B112	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3514-C108	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3514-D117	ISA	WDL
Mitsubishi Electric Corp.	XEN-LSII M3524-A112	ISA	WDL
Mitsubishi Electric Corp.	XEN-LSII M3524-A121	ISA	WDL
Mitsubishi Electric Corp.	XEN-LSII M3524-B112	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3524-B121	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3524-C116	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3524-C124	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3534-B112	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3534-B121	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3534-B150	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3534-C116	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3534-C150	ISA	Box
Mitsubishi Electric Corp.	XEN-LSII M3534-D127	ISA	WDL
Mitsubishi Electric Corp.	XEN-LSII M3534-D152	ISA	WDL
Mitsubishi Electric Corp.	XEN-PC M3416-B121	ISA	Box
Mitsubishi Electric Corp.	XEN-PC M3436-B127W	ISA	Box
NEC	Image P90	ISA	Box
NEC	Image P90D	ISA	Box
NEC	Image P90E	ISA	Box
NEC	PowerMate V466	ISA	Box
NEC	Ready 9010	ISA	Box
NEC	Ready 9520	ISA	Box
Omni Tech	OTC-8600	ISA	Box
Omni Tech	OTC-8900	ISA	Box
Packard Bell	Executive LX 1001	ISA/PCI	Box
Packard Bell	Executive LX 1001 CD	ISA/PCI	Box
Packard Bell	Executive LX 1001 CDT	ISA/PCI	Box
Packard Bell	Executive LX 1001 T	ISA/PCI	Box
Packard Bell	Executive LX 1002 CD	ISA/PCI	Box
Packard Bell	Executive LX 1002 CDT	ISA/PCI	Box
Packard Bell	Executive LX 1331	ISA/PCI	Box
Packard Bell	Executive LX 1331 CD	ISA/PCI	Box
Packard Bell	Executive LX 1331 CDT	ISA/PCI	Box
Packard Bell	Executive LX 1331 T	ISA/PCI	Box
Packard Bell	Executive LX 1332 CD	ISA/PCI	Box
Packard Bell	Executive LX 1332 CDT	ISA/PCI	Box
Packard Bell	Executive LX 1501	ISA/PCI	Box
Packard Bell	Executive LX 1501 CD	ISA/PCI	Box
Packard Bell	Executive LX 1501 CDT	ISA/PCI	Box
Packard Bell	Executive LX 1501 T	ISA/PCI	Box
Packard Bell	Executive LX 1502 CD	ISA/PCI	Box
Packard Bell	Executive LX 1502 CDT	ISA/PCI	Box
Packard Bell	Executive LX 1502CDT	ISA	Box
Packard Bell	Executive LX 1661	ISA/PCI	Box
Packard Bell	Executive LX 1661 CD	ISA/PCI	Box
Packard Bell	Executive LX 1661 CDT	ISA/PCI	Box
Packard Bell	Executive LX 1661T	ISA/PCI	Box
Packard Bell	Executive LX 1662 CD	ISA/PCI	Box
Packard Bell	Executive LX 1662CDT	ISA	Box
Packard Bell	Executive LX 1662CDT	ISA/PCI	Box
Powerland Computers	Power 486	ISA/PCI	Box
Powerland Computers	Power Pentium	ISA	Box
Sanyo Electric Co.,Ltd	MBC-21CV10	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9D499AC080	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9D499AC08E	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9D499BC08E	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P512AS160	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P512AS16G	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P513AS160	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P513AS16G	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P575A0080	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P575AP080	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P575AV080	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P575AV08E	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P575B008E	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P575BP08D	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P575BV08E	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P599AS080	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P599AS08G	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P599AV08F	ISA	Box
Seanix Technology Inc.	Seanix ASI 9000 9P599BS08G	ISA	Box
Seanix Technology Inc.	Seanix SONORA SD499AC08D	ISA	Box
Seanix Technology Inc.	Seanix SONORA SD499BC08D	ISA	Box
Seanix Technology Inc.	Seanix SONORA SP575AN08D	ISA	Box
Seanix Technology Inc.	Seanix SONORA SP575BN08D	ISA	Box
Seanix Technology Inc.	Seanix SONORA SP599A008E	ISA	Box
Seanix Technology Inc.	Seanix SONORA SP599B008F	ISA	Box
Sharp Corporation	PC-3010	ISA/PCMCIA	Box
Sharp Corporation	PC-3010J	ISA/PCMCIA	Box
Sharp Corporation	PC-3050	ISA/PCMCIA	Box
Sharp Corporation	PC-3050J	ISA/PCMCIA	Box
Sharp Corporation	PC-7850	ISA/PCMCIA	Box
Sharp Corporation	PC-7902J	ISA/PCMCIA	Box
Sharp Corporation	PC-7903J	ISA/PCMCIA	Box
Sharp Corporation	PC-8150	ISA/PCMCIA	Box
Sharp Corporation	PC-8650	ISA/PCMCIA	Box
Sharp Corporation	PC-8650MK2	ISA/PCMCIA	Box
Sharp Corporation	PC-8660	ISA/PCMCIA	Box
Sharp Corporation	PC-8700	ISA/PCMCIA	Box
Sharp Corporation	PC-8800	ISA/PCMCIA	Box
Sharp Corporation	PC-8900	ISA/PCMCIA	Box
Sharp Corporation	PC-8900J	ISA/PCMCIA	Box
Sharp Corporation	PC-8901J	ISA/PCMCIA	Box
Solid AB	Solicard Rita	ISA	Box
STD	Pentium 100	ISA	Box
STD	STD Compupartner P100	ISA	Box
STD	STD P100	ISA	Box
Tatung	TCS-5>30	ISA	Box
Tatung	TCS-5210	ISA	Box
Tatung	TCS-5720	ISA	Box
Tatung	TCS-9345	ISA	Box
Tatung	TCS-9510	ISA	Box
Tatung	TCS-9570	ISA	Box
Tatung	TCS-9730	ISA	Box
Tatung	TCS-9850	ISA	Box
Tatung	TMP-9000	ISA	Box
Techmedia Computer Systems Co.	MTS-750T	ISA/PCI	Box
Techmedia Computer Systems Co.	TMS-1000T	ISA/PCI	Box
Techmedia Computer Systems Co.	TMS-1330T	ISA/PCI	Box
Techware Computer Europe	aAT-P075M	ISA	Box
Toshiba Corporation	J-3100PV 590	ISA	Box
Toshiba Engineering Co.	Dyna bood V 486 FV 475 TW	ISA	Box
Toshiba Engineering Co.	Dyna book V 486A J-3100 VS	ISA	Box
Toshiba Engineering Co.	Dyna BookV486 FV 433	ISA	Box
Toshiba Engineering Co.	Dyna BookV486 FV 4330CD	ISA	Box
Toshiba Engineering Co.	Dyna BookV486 FV 4332CW	ISA	Box
Toshiba Engineering Co.	Dyna BookV486 FV 4333CW	ISA	Box
Toshiba Engineering Co.	Dyna BookV486 FV 450	ISA	Box
Toshiba Engineering Co.	Dyna BookV486 FV 4502TW	ISA	Box
Toshiba Engineering Co.	Dyna BookV486 FV 4503TW	ISA	Box
Toshiba Engineering Co.	Dyna BookV486A J-1300 VX	ISA	Box
Toshiba Engineering Co.	Dyna BookV486A J-1300 VX121CW	ISA	Box
Toshiba Engineering Co.	Dyna BookV486A J-1300 VX201CW	ISA	Box
Toshiba Engineering Co.	Dyna BookV486A J-1300 VX201TW	ISA	Box
Toshiba Engineering Co.	Dyna BookV486A J-1300 VX341TW	ISA	Box
Toshiba Engineering Co.	J-1300 PV2 433 251 M3	ISA	Box
Toshiba Engineering Co.	J-1300 PV2 433 251V3	ISA	Box
Toshiba Engineering Co.	J-3100 PV2 466	ISA	Box
Toshiba Engineering Co.	J-3100 PV2499	ISA	Box
Toshiba Engineering Co.	T2100cs/350	ISA	Box
Toshiba Engineering Co.	T2400cs/320	ISA	Box
Toshiba Engineering Co.	T2450ct/320	ISA	Box
Toshiba Engineering Co.	T3600ct/500	ISA	Box
Toshiba Engineering Co.	T4700ct/320	ISA	Box
Toshiba Engineering Co.	T4800ct/500	ISA	Box
Toshiba Engineering Co.	T4850ct/500	ISA	Box
Toshiba Engineering Co.	T4900ct/810	ISA	Box
Xycom	8430	ISA	Box
Xycom	9450 Industrial Computer	ISA	Box
Xycom	9485	ISA	Box
Xycom	9486	ISA	Box
Xycom	9487	ISA	Box
Yardi	Professional Property Mgmt Update version 1.024	ISA	Box
Zenith Data Systems	433SN	ISA	Box
Zenith Data Systems	Z-Select 100	ISA	Box
Zenith Data Systems	Z-Station 500 Desktop	ISA	Box
Zenith Data Systems	Z-Station 500 Mini-tower	ISA	Box

Click here to see the list of logo'd products


Compatible System/Mobile

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : System/Mobile

Hardware Vendor	Device Name	Device Bus	Driver BIOS
Everex	STEP Note 4 Series	ISA	Box
FIC	LEO 486-PAA	ISA	Box
FIC	LEO 486-PAK2	ISA	Box
FIC	LEO 486-PI02	ISA	Box
FIC	LEO 486-PVT	ISA	Box
FIC	LEO 486-PVT-IO	ISA	Box
FIC	Leo Designote VP	ISA	Box
Fujitsu	FMV-425N	ISA/PCI	Box
Fujitsu	FMV-425N/T1	ISA/PCI	Box
Fujitsu	FMV-433N/S1	ISA/PCI	Box
Fujitsu	FMV-450N/S1	ISA/PCI	Box
Fujitsu	FMV-450NL	ISA/PCI	Box
Fujitsu	FMV-450NL/S	ISA/PCI	Box
Fujitsu	FMV-450NL/T	ISA/PCI	Box
Fujitsu	FMV-475NL/S	ISA/PCI	Box
Fujitsu	OASYS 48VA-111C	ISA/PCI	Box
Fujitsu	OASYS 48VA-112	ISA/PCI	Box
Fujitsu	OASYS 48VL-331C	ISA/PCI	Box
Fujitsu	OASYS V-450sB/S2P	ISA/PCI	Box
Fujitsu	OASYS V-466B/T2	ISA/PCI	Box
Mitsubishi Electric Corp.	apricotNOTE NS M3422-A112	PCMCIA	WDL
Mitsubishi Electric Corp.	apricotNOTE NS M3442-A120	PCMCIA	Box
Mitsubishi Electric Corp.	apricotNOTE NS M3452-A120	PCMCIA	WDL
Mitsubishi Electric Corp.	apricotNOTE NS M3452-B134	PCMCIA	WDL
Mitsubishi Electric Corp.	apricotNOTE NS M3462-A120	PCMCIA	WDL
Mitsubishi Electric Corp.	apricotNOTE NS M3472-B152	PCMCIA	WDL
Mitsubishi Electric Corp.	XEN-LSII M3534-C124	ISA	Box
NEC	Versa V/50	ISA	Box
Samsung Electronics	SPC 5900R	ISA/PCI/PCMCIA	Box
Sanyo Electric	MBC-2/CV1Q	ISA	Box
Sanyo Electric	MBC-NJP7H5	ISA	Box
Tatung	TNB-940	ISA	Box
Toshiba Corporation	DynaBook GT450 341CW	ISA	Box
Toshiba Corporation	DynaBook GT475 521TW	ISA	Box
Travelmate	4000M	ISA	Box
Twinhead	Mozart Slimnote-3	ISA	Box
Twinhead	Slimnote 5	ISA	Box
Twinhead	Slimnote 5100C	ISA	Box
Twinhead	Slimnote-5100M	ISA	Box
Twinhead	Slimnote-5100T	ISA	Box
Twinhead	Slimnote-575C	ISA	Box
Twinhead	Slimnote-575M	ISA	Box
Twinhead	Slimnote-575T	ISA	Box
Twinhead	Slimnote-6100C	ISA	Box
Twinhead	Slimnote-6100CX	ISA	Box
Twinhead	Slimnote-6100T	ISA	Box
Twinhead	Slimnote-6100TX	ISA	Box
Twinhead	Slimnote-680C	ISA	Box
Twinhead	Slimnote-680T	ISA	Box
Twinhead	Slimnote-680TX	ISA	Box
Zenith Data Systems	Z-400	ISA	Box
Zenith Data Systems	Z-400+	ISA	Box
Zenith Data Systems	Z-NOTE 325L	ISA	Box
Zenith Data Systems	Z-Note 425 LN	ISA	Box
Zenith Data Systems	Z-Note 433/Lnc+	ISA	Box
Zenith Data Systems	Z-Note Flex DX2/50	ISA	Box
Zenith Data Systems	Z-Note LB	ISA	Box
Zenith Data Systems	Z-NoteFlex DX4/100	ISA	Box
Zenith Data Systems	Z-Star 433 VL	ISA	Box
Zenith Data Systems	Z-Star EX with HandiPoint and Intel DX2/50 processor	ISA	Box
Zenith Data Systems	Z-Star EX with J-Mouse and Cyrix processor	ISA	Box
Zenith Data Systems	Z-Star EX with J-Mouse and Intel DX2/50 processor	ISA	Box

Click here to see the list of logo'd products


Compatible UPS

Windows 95 Hardware Compatibility List

The following hardware has been tested by Microsoft And have been found To be compatible with Windows 95, but do Not carry the Designed For Windows 95 logo. In the (Drivers/BIOS) column (Box) means that the driver is in the Windows 95 product and that the hardware does not require additional drivers to be installed; (CD) means that the driver has to be manually installed from the DRIVERS directory on the Windows 95 CD (or from the Internet); (WDL) means that the driver has to be manually installed from the Windows Driver Library (WDL) residing on the Internet; for systems, BIOS vendor and version number is given instead of driver information. If you click on the hot-links in the (Product Name) column, you get additional (foot note) information about product testing, installation, and usage.

Hardware Category : UPS

There are no products available at this time for the hardware category you selected.

Click here to see the list of logo'd products


Special Notes for Enhanced Am486DX4-100 - Chip

Win95

Comments:

This processor was tested for Windows 95 and Windows NT 3.51 compatibility on the reference systems AMD supplied.


Special Notes for Nx586 Processor P100 - Chip

Win95

Comments:

This processor was tested for Windows 95 and Windows NT 3.51 compatibility on the reference systems NexGen supplied.

Windows 95 detects Nx586 as 80386 processor.  Some applications that require high-end x86 processors may refuse to run if they detect Nx586 as 80386.  For example, Microsoft Hover won't run because it requires a 80486 or above to run.  Contact NextGen Inc. for more information.


Special Notes for TI 486DX2-80 - COM

Win95

Comments:

This processor was tested for Windows 95 and Windows NT 3.51 compatibility on the reference systems Texa Instruments supplied.


Special Notes for P30 - PCI

Win95

Comments:

Set monitor timing using the S3REFRSH.EXE utility


Special Notes for P50E - PCI

Win95

Comments:

Set monitor timing using the CLMODE.EXE utility.

Highest resolution that supports 75Hz refresh rate is 1024x768x256 colors


Special Notes for P60 - PCI

Win95

Comments:

Set monitor timing using the S3REFRSH.EXE utility


Special Notes for ProMotion - PCI

Win95

Comments:

Run the PM_FONT.COM TSR to install EGA fonts if needed.


Special Notes for 1000PV - PCI

Win95

Comments:

Highest resolution that supports 75Hz refresh rate is 1024x768x256 colors.


Special Notes for Graphics Pro Turbo PCI Mach64 - PCI

Win95

Comments:

Adapter will not function with the ATI drivers provided in Windows 95 if the relocatable I/O jumper is enabled.


Special Notes for ALG 2301 PCI - PCI

Win95

Comments:

Set monitor timing using the ASCAN.EXE utility


Special Notes for ALG 2302 PCI - PCI

Win95

Comments:

Set monitor timing using the ASCAN.EXE utility


Special Notes for SuperX VGA - PCI

Win95

Comments:

Set monitor timing using the CLMODE.EXE utility.


Special Notes for Voyager 64 - PCI

Win95

Comments:

Set monitor timing using the VREFRESH.EXE utility.


Special Notes for F65548 PCI - PCI

Win95

Comments:

Use the CT.COM utility to disable screen panning when display is connected to a monitor.


Special Notes for GD5430 Demo Board Kit - PCI

Win95

Comments:

Set Monitor refresh rates using the CLMODE.EXE utility.


Special Notes for GD5434 PCI Demo Board Kit - PCI

Win95

Comments:

Set monitor refresh rates using the CLMODE.EXE utility.


Special Notes for GD54M30 PCI Demo Board Kit - PCI

Win95

Comments:

Set monitor refresh rates using the CLMODE.EXE utility.


Special Notes for MGA Millennium - PCI

Win95

Comments:

Tested on 2MB configuration.

DDC may not work on pre-production bios. Contact Matrox regarding the availability of bios updates.


Special Notes for #9GXE64 - PCI - PCI

Win95

Comments:

Set refresh rate using the RFRSH95.EXE utility provided by Number Nine.


Special Notes for 9FX Motion 531 - PCI - PCI

Win95

Comments:

Set refresh rate using the RFRSH95.EXE utility provided by Number Nine.


Special Notes for 9FX Motion 771 - PCI - PCI

Win95

Comments:

Set refresh rate using the RFRSH95.EXE utility provided by Number Nine.


Special Notes for 9FX Vision 330 - PCI - PCI

Win95

Comments:

Set refresh rate using the RFRSH95.EXE utility provided by Number Nine.


Special Notes for Spitfire 64107D2 - PCI

Win95

Comments:

Set refresh rate using Control Panel applet.


Special Notes for Trio64V+ - PCI

Win95

Comments:

The S3 765 is detected as a S3 764 but will only work in 640x480 16 color mode until the S3_2.DRV is installed.


Special Notes for TGUI 9660 XGi - PCI - PCI

Win95

Comments:

Set monitor timing using SMONITOR.EXE utility.


Special Notes for TGUI 9680 - PCI

Win95

Comments:

Set monitor timing using SMONITOR.EXE utility.


Special Notes for GrafixStar 300 - PCI

Win95

Comments:

Installs by default as a S3 Trio 32/64. Use display control panel setting to change drivers.

Refresh rate is set from the display control panel advanced tab.


Special Notes for GrafixStar 700 - PCI

Win95

Comments:

Installs by default as a S3 968. Use display control panel setting to change drivers.

Refresh rate is set from the display control panel advanced tab.


Special Notes for FlexScan F2.15/33F/F351 - DDC

Win95

Comments:

Requires DDC adapter to be installed on Display Adapter port.

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for FlexScan F2.17/52F/F553 - DDC

Win95

Comments:

Requires DDC adapter to be installed on Display Adapter port.

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for FlexScan F2.17EX/F563 - DDC

Win95

Comments:

Requires DDC adapter to be installed on Display Adapter port.

1280x1024 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for FlexScan F2.21/77F/F764 - DDC

Win95

Comments:

Requires DDC adapter to be installed on Display Adapter port.

1280x1024 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for FlexScan FX2-21 / 88F / F784 - DDC

Win95

Comments:

Requires DDC adapter to be installed on Display Adapter port.

1280x1024 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for FlexScan T2.17/56T/T563 - DDC

Win95

Comments:

Requires DDC adapter to be installed on Display Adapter port.

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for FlexScan T2.17TS/54T/T562 - DDC

Win95

Comments:

Requires DDC adapter to be installed on Display Adapter port.

1280x1024 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for FlexScan T2.20/68T/T662 - DDC

Win95

Comments:

Requires DDC adapter to be installed on Display Adapter port.

1280x1024 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for MultiSync XE15 - DDC

Win95

Comments:

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for MultiSync XE17 - DDC

Win95

Comments:

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for MultiSync XV14 - DDC

Win95

Comments:

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.

Detects as a "VESA DDC monitor" use display control panel to select the XV14 monitor


Special Notes for MultiSync XV15 - DDC

Win95

Comments:

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.

Detects as a "VESA DDC monitor" use display control panel to select the XV15


Special Notes for MultiSync XV17 - DDC

Win95

Comments:

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for SyncMaster 15GLe - DDC

Win95

Comments:

800x600 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for SyncMaster 15GLi - DDC

Win95

Comments:

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for SyncMaster 17GLi - DDC

Win95

Comments:

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for 14ES - DDC

Win95

Comments:

800x600 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for 17GA - DDC

Win95

Comments:

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for 17GS - DDC

Win95

Comments:

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for Optiquest 1000S - DDC

Win95

Comments:

800x600 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for Optiquest 1769DC - DDC

Win95

Comments:

1024x768 is the highest resolution that supports VESA 75 Hz monitor timing standard.


Special Notes for RT-91xxx Multimedia - Keyboard

Win95

Anomalies found:

The Mute button on the keyboard generates a loud bang through the speakers every time it is pressed.  The speaker input adapter (that plugs into system's mic out) cannot be inserted fully; doing so will cause the right channel to become disconnected.  If the adapter is pulled out slightly, then both left and right channels work.


Special Notes for SENS 810 - EISA

Win95

This modem passed VoiceView tests.


Special Notes for Sound Expression 14.4 SRS - EISA

Win95

This modem passed VoiceView tests.


Special Notes for Sound Expression V.34 SRS - EISA

Win95

This modem passed VoiceView tests.


Special Notes for Supra 288i SP - ISA

Win95

Passed PnP, and Data/FAX testing.


Special Notes for XJ2288 28.8/14.4 PCCard Modem - PCMCIA

Win95

Comments:

This modem is supported by Windows 95.  No driver files are needed for the customers.


Special Notes for DeskPorte FAST - COM/LPT

Win95

Comments:

This modem supports both serial and parallel connections.  If the user cannot get parallel connection to work, try different parallel transfer mode which is normally available in BIOS setup.

To allow 16-bit communication software work with the modem, the user needs to run a vendor supplied program.  Please read installation document for more details.


Special Notes for TR14401 Trumpcard Jack of Diamonds 14.4 - PCMCIA

Win95

Comments:

In order to allow Windows NT to detect the modem properly, the user needs to follow the installation guide and append the vendor provided INF file to the end of MODEM.INF shipped in Windows NT.  This is a by design behavior.


Special Notes for TR14403 Trumpcard Jack of Diamonds 28.8 - PCMCIA

Win95

Comments:

In order to allow Windows NT to detect the modem properly, the user needs to follow the installation guide and append the vendor provided INF file to the end of MODEM.INF shipped in Windows NT.  This is a by design behavior.


Special Notes for RCV144ACF - ISA

Win95

Comments:

This modem is detected by Windows 95 automatically and you will be prompted to install the driver.  Insert the vendor supplied installation disk and then press Enter.

Some Plug and Play BIOSes may not be able to configure this ISA Plug and Play adapter properly.  If the modem doesn't work after the installation, go to Control Panel and then select Systems.  Highlight the modem and click on Properties.  This modem has three configurations (config 0 - 2).  Uncheck Automatic Settings and then select configuration 2.  You can choose proper IRQ or I/O settings and change the resource configuration on the fly.

This is an 8-bit ISA card so the IRQ support is limited.


Special Notes for 28.8 PnP Data/Fax/Voice Speaker Phone - ISA

Win95

Device was not tested with Unimodem/V or MS Phone


Special Notes for SupraExpress 144i PnP - ISA

Win95

Comments:

The modem is hosted on an ISA Plug and Play adapter which is automatically detected and installed by Windows 95.


Special Notes for SupraFAXModem 288i PnP - ISA

Win95

Comments:

The modem is hosted on an ISA Plug and Play adapter.  It will be automatically detected and installed by Windows 95.


Special Notes for (G. Diehl ISDN) DIVA/PCM Adapter - PCMCIA

Win95

This was tested with ISDN Pack 1.0, before the release of 1.1.


Special Notes for DIVA PCM - PCMCIA

Win95

This was tested with ISDN Pack 1.0, before the release of 1.1.


Special Notes for DocuPrint 4517 - LPT

Win95

1/22/96 - 2 X 32meg memory arrives for the 4517 only

1/19/96 - setup and ready for test. PS and PCL


Special Notes for AcerCD 645A - IDE

Win95

CD Extra compatible


Special Notes for AcerCD 655A - IDE

Win95

This device does NOT support CD Extra


Special Notes for AcerCD 665A - IDE

Win95

This device does NOT support CD Extra


Special Notes for CD-743E - IDE

Win95

This device does NOT support CD Extra


Special Notes for CD-747E - IDE

Win95

This device does NOT support CD Extra


Special Notes for CD-767E - IDE

Win95

CD Extra compatible


Special Notes for CDA268-03ISE - IDE

Win95

CD Extra compatible


Special Notes for CDA468-02I - IDE

Win95

CD Extra compatible


Special Notes for CDA668-01I - IDE

Win95

CD Extra compatible


Special Notes for ODC 6101 - IDE

Win95

CD Extra compatible


Special Notes for E2650 - IDE

Win95

CD Extra compatible


Special Notes for 8X CD-ROM CDR-7930 - IDE

Win95

CD Extra compatible


Special Notes for GCD-R542B - IDE

Win95

CD Extra compatible


Special Notes for GCD-R560B - IDE

Win95

CD Extra compatible


Special Notes for CR-504-J - SCSI

Win95

CD Extra compatible


Special Notes for CR-581-M - IDE

Win95

CD Extra compatible


Special Notes for LK-MC684 - IDE

Win95

CD Extra compatible


Special Notes for LK-RC504AB1 - SCSI

Win95

CD Extra compatible


Special Notes for CRMC-FX400 - IDE

Win95

This device does NOT support CD Extra


Special Notes for CRMC-FX400B - IDE

Win95

This device does NOT support CD Extra


Special Notes for CRMC-FX400D - IDE

Win95

This device does NOT support CD Extra


Special Notes for CDR-1300A - IDE

Win95

CD Extra compatible


Special Notes for CDR-222 - SCSI

Win95

CD Extra compatible


Special Notes for CDR-271 - IDE

Win95

This CD-ROM drive does NOT support CD Extra


Special Notes for CDR-272 - ATAPI

Win95

This device does NOT support CD Extra


Special Notes for CDR-273 - IDE

Win95

This device does NOT support CD Extra


Special Notes for MultiSpin 6v (CDR-1350) - IDE

Win95

CD Extra compatible


Special Notes for Multispin Tower - SCSI

Win95

This device does NOT support CD Extra


Special Notes for LF-1000 PD - SCSI

Win95

CD Extra compatible


Special Notes for PCA62CR 6X CDROM - IDE

Win95

CD Extra compatible


Special Notes for PCA82CR/M2 8X - IDE

Win95

CD Extra compatible


Special Notes for 4PleX Plus PX-45CE (external) - SCSI

Win95

CD Extra compatible


Special Notes for 4PlexX Plus PX-43CE (internal) - SCSI

Win95

CD Extra compatible


Special Notes for 6PleX PX-63CS (internal) - SCSI

Win95

CD Extra compatible


Special Notes for SCR-730 - IDE

Win95

CD Extra compatible


Special Notes for SCR-830 - IDE

Win95

CD Extra compatible


Special Notes for CRD-256P - IDE

Win95

CD Extra compatible


Special Notes for 4X Notebook CD-ROM drive, model CD-44E (IDE) - IDE

Win95

CD Extra compatible


Special Notes for CD-40E - IDE

Win95

CD Extra compatible


Special Notes for CD-40S - SCSI

Win95

This device does NOT support CD Extra


Special Notes for CD-56E - IDE

Win95

This device does NOT support CD Extra


Special Notes for CD-56S - SCSI

Win95

CD Extra compatible


Special Notes for XM-3701 - SCSI

Win95

CD Extra compatible


Special Notes for XM-5302B - IDE

Win95

This CD-ROM drive does NOT support CD Extra


Special Notes for CDD-620 - COM

Win95

CD Extra compatible


Special Notes for AHA-1530P - ISA

Win95

This adapter is detected and installed by Windows 95 automatically.  As a result, the in-box driver will be loaded.  In order to make use of the SCAM features, the user needs to replace the in-box driver located in \windows\system\iosubsys\SPARROW.MPD by the new driver in WDL.


Special Notes for AHA-1542CP - ISA

Win95

This adapter is detected and installed by Windows 95 automatically.  As a result, the in-box driver will be loaded.  In order to make use of the SCAM features, the user needs to replace the in-box driver located in \windows\system\iosubsys\AHA154X.MPD by the new driver in WDL.

This applies to all SCSI adapters that support MS-DOS and Windows 3.x.  If the system was using real-mode drivers loaded in CONFIG.SYS before upgrading to Windows 95, you might want to make sure you are actually  using the 32-bit protection-mode drivers by going to Start | Settings | Control Panel and then click on Systems.  When Systems is up, click on Performace.   The text in the dialog box should not say that  you are using MS-DOS compatible devices.  If you see the complaint, and if it points to the devices connected to the SCSI adapter,  you can comment out the real-mode drivers in the CONFIG.SYS file.


Special Notes for P5490-95 - PCI

Win95

Sent two copies of office in place of keyboard and mouse on 12/19/95.


Special Notes for Kim - PCI

Win95

This system passes all WHQL testing.


Special Notes for Pentium 100 - PCI

Win95

This system passes all WHQL testing.


Special Notes for Pentium 120 - PCI

Win95

This system passes all WHQL testing.


Special Notes for Pentium 75 - PCI

Win95

This system passes all WHQL testing.


Special Notes for Family Magic - ISA/PCI

Win95

Also sent back the other two Family Magic systems, one passed the other and extra.


Special Notes for Helios DT, MT & FT - ISA/PCI

Win95

Also sent back the other two Family Magic systems, one passed the other and extra.


Special Notes for Value Magic - ISA/PCI

Win95

Also sent back the other two Family Magic systems, one passed the other and extra.


Special Notes for OTC-5200 - ISA/PCI

Win95

Keep per phone conversation w/Toni Ruel, and Melody O'Tyrady.


Special Notes for OTC-5200 - ISA/PCI

Win95

Keep per phone conversation w/Toni Ruel, and Melody O'Tyrady.


Special Notes for OTC-5300 - ISA/PCI

Win95

Keep per phone conversation w/Toni Ruel, and Melody O'Tyrady.


Special Notes for OTC-5300 - ISA/PCI

Win95

Keep per phone conversation w/Toni Ruel, and Melody O'Tyrady.


Special Notes for OTC-5300 - ISA/PCI

Win95

Keep per phone conversation w/Toni Ruel, and Melody O'Tyrady.


Special Notes for OTC-5400 - ISA/PCI

Win95

Keep per phone conversation w/Toni Ruel, and Melody O'Tyrady.


Special Notes for OTC-5500 - ISA/PCI

Win95

Keep per phone conversation w/Toni Ruel, and Melody O'Tyrady.


Special Notes for OTC-5600 - ISA/PCI

Win95

Keep per phone conversation w/Toni Ruel, and Melody O'Tyrady.


Special Notes for OTC-5700 - ISA/PCI

Win95

Keep per phone conversation w/Toni Ruel, and Melody O'Tyrady.


Special Notes for OTC-5800 - ISA/PCI

Win95

Keep per phone conversation w/Toni Ruel, and Melody O'Tyrady.


Special Notes for Opti-UPS 1400E - COM

Win95

Manufacturer's Cable Part # : Supplied by Vendor

Power Failure Signal : Negative

Low Battery Signal : Negative

Remote UPS Shutdown : Positive